<template>
  <div>
    <el-button type="primary" @click="checkData">一键核对</el-button>
    <div id="dialysis-print-box-1">
      <div
        id="dialysis-print-box-1-1"
        class="dialysis-print-order print-template-two print_page_main_content"
      >
          <div class="order-yy-name" style="font-weight:bold;font-size:28px;">{{ orgname }}</div>
          <div style="display:inline-block;width:100%;text-align:center;">
              <div
              class="order-title"
              style="letter-spacing: 0;font-weight:600;font-size:22px;display:inline-block;"
              >
              血液净化治疗记录单
              </div>
          </div>
          <div class="row" style="border-bottom:1px solid #000;">
            <div class="inline_block">
                  透析号：
                  <div class="under_line" style="width: 70px;text-align: center;">
                      {{ patientInfo.dialysis_no }}
                  </div>
              </div>
              <div class="inline_block">
                  姓名：
                  <div class="under_line" style="width: 70px;text-align: center;">
                      {{ patientInfo.name }}
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;">
                  性别：
                  <div class="under_line" style="width: 50px;text-align: center;">
                      {{ patientInfo_gender_1 ? "男" : "女" }}
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;">
                  年龄：
                  <div class="under_line" style="width: 50px;text-align: center;">
                      {{ getAge(patientInfo) }}
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;">
                  透析日期：
                  <div class="under_line" style="width: 90px;text-align: center;">
                      {{ queryParams.xtdate }}
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;">
                  透析次数：
                  <div class="under_line" style="width: 80px;text-align: center;">
                      {{ patientInfo.total_dialysis + patientInfo.user_sys_before_count }}
                  </div>
              </div>
          </div>
          <div style="border:1px solid #000;margin-top:5px;padding:0 10px;">
              <div class="row">
                  <div class="inline_block">
                      T(°C):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ predialysis.temperature ? predialysis.temperature : "/" }}
                      </div>
                  </div>
                  <div class="inline_block">
                      P(次/分):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ predialysis.pulse_frequency ? predialysis.pulse_frequency : "/" }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      R(次/分):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ predialysis.breathing_rate ? predialysis.breathing_rate : "/" }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      BP(mmHg):
                      <div class="under_line" style="width: 70px;text-align: center;">
                        {{ predialysis.systolic_blood_pressure ? predialysis.systolic_blood_pressure : "" }}/
                        {{ predialysis.diastolic_blood_pressure ? predialysis.diastolic_blood_pressure : "" }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      透析机号:
                      <div class="under_line" style="width: 90px;text-align: center;">
                          {{ dialysisOrder && dialysisOrder.DeviceNumber && dialysisOrder.DeviceNumber.number.length > 0 ? dialysisOrder.DeviceNumber.number : patientInfo.DialysisSchedule.device_number.number }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      透析时长：
                      <div class="under_line" style="width: 40px;text-align: center;">
                          {{ prescription.dialysis_duration_hour ? prescription.dialysis_duration_hour : "0" }}
                      </div>h
                      <div class="under_line" style="width: 40px;text-align: center;">
                          {{ prescription.dialysis_duration_minute ? prescription.dialysis_duration_minute : "0" }}
                      </div>min
                  </div>
              </div>
              <div class="row">
                  <div class="inline_block">
                      透前体重(Kg):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ predialysis.weight_before ? predialysis.weight_before : "/" }}
                      </div>
                  </div>
                  <div class="inline_block">
                      干体重(Kg):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ predialysis.dry_weight ? predialysis.dry_weight : "/" }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      目标脱水量(ml):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ prescription.target_ultrafiltration ? prescription.target_ultrafiltration : '/' }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      透析方式:
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="!prescription.mode_id">
                      /
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 1">
                      HD
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 2">
                      HDF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 3">
                      HD+HP
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 4">
                      HP
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 5">
                      HF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 6">
                      SCUF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 7">
                      IUF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 8">
                      HFHD
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 9">
                      HFHD+HP
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 10">
                      PHF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 11">
                      HFR
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 12">
                      HDF+HP
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 13">
                      CRRT
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 14">
                      腹水回输
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 15">
                      HD前置换
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 16">
                      HD后置换
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 17">
                      HDF前置换
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 18">
                      HDF后置换
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 19">
                      IUF+HD
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 20">
                      UF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 21">
                      HD+
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 22">
                      血浆胆红素吸附+HDF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 23">
                      血浆胆红素吸附
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 24">
                      I-HDF
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 25">
                      HD高通
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 26">
                      CVVH
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 27">
                      CVVHD
                      </div>
                      <div class="under_line" style="width: 70px;text-align: center;font-weight:600;" v-if="prescription.mode_id == 28">
                      CVVHDF
                      </div>
                  </div>
              </div>
              <div class="row">
                  <div class="inline_block">
                      透析液(mmol/L):
                      <div class="under_line" style="width: 400px;text-align: center;">
                          K：{{ prescription.kalium ? prescription.kalium : "/" }}&nbsp;&nbsp;
                          Ca：{{ prescription.calcium ? prescription.calcium : "/" }}&nbsp;&nbsp;
                          Na：{{ prescription.sodium ? prescription.sodium : "/" }}&nbsp;&nbsp;
                          HCO3：{{ prescription.bicarbonate ? prescription.bicarbonate : "/" }}&nbsp;&nbsp;
                          糖：{{ prescription.amylaceum ? prescription.amylaceum : "/" }}&nbsp;&nbsp;
                      </div>
                  </div>
                  <div class="inline_block">
                      透析器:
                      <div class="under_line" style="width: 200px;text-align: center;">
                          {{ prescription.dialyzer_perfusion_apparatus ? prescription.dialyzer_perfusion_apparatus : "/" }}
                      </div>
                  </div>
              </div>
              <div class="row">
                  <div class="inline_block">
                      抗凝剂:
                      <div class="under_line" style="width: 400px;text-align: center;">
                          {{ prescription.anticoagulant_name ? prescription.anticoagulant_name : "/" }}
                      </div>
                  </div>
                  <div class="inline_block">
                      首剂(UI):
                      <div class="under_line" style="width: 100px;text-align: center;">
                          {{ prescription.anticoagulant_shouji ? prescription.anticoagulant_shouji : "/" }}
                      </div>
                  </div>
                  <div class="inline_block">
                      追加(UI):
                      <div class="under_line" style="width: 100px;text-align: center;">
                          {{ prescription.anticoagulant_weichi ? prescription.anticoagulant_weichi : "/" }}
                      </div>
                  </div>
              </div>
              <div class="row">
                  <div class="inline_block">
                      血管通路:
                      <div class="under_line" style="width: 200px;text-align: center;">
                          {{ predialysis.blood_access_part_opera_name ? predialysis.blood_access_part_opera_name : '/' }}
                      </div>
                  </div>
                  <div class="inline_block">
                      置换方式:
                      <div class="under_line" style="width: 100px;text-align: center;">
                          <span v-if="prescription.displace_liqui_part == ''">/</span>
                          <span v-if="prescription.displace_liqui_part == 1">前置换</span>
                          <span v-if="prescription.displace_liqui_part == 2">后置换</span>
                      </div>
                  </div>
                  <div class="inline_block">
                      置换液总量(L):
                      <div class="under_line" style="width: 100px;text-align: center;">
                          {{ prescription.displace_liqui_value ? prescription.displace_liqui_value : "/" }}
                      </div>
                  </div>
                  <div class="inline_block">
                      血流速(ml/min):
                      <div class="under_line" style="width: 100px;text-align: center;">
                          {{ prescription.blood_flow_volume ? prescription.blood_flow_volume : "/" }}
                      </div>
                  </div>
              </div>
              <div class="row" style="line-height: 30px;">
                  <div class="inline_block" style="width:100%;display:flex;">
                      透前病情:
                      <div class="under_line" style="border:1px solid #000;width:100%;flex:1;text-align:left;white-space: initial;">
                          {{ predialysis.symptom_before_dialysis ? predialysis.symptom_before_dialysis : '/' }}
                      </div>
                  </div>
              </div>
              <div class="row" style="line-height: 30px;">
                  <div class="inline_block" style="width:100%;display:flex;">
                      诊断:
                      <div class="under_line" style="border:1px solid #000;width:100%;flex:1;text-align:left;white-space: initial;">
                          {{ patientInfo.diagnose ? patientInfo.diagnose : '/' }}
                      </div>
                  </div>
              </div>
          </div>
          <div style="text-align:center;letter-spacing:10px;line-height:40px;font-size:20px;">治疗记录</div>
          <table class="print-table" border="1" style="line-height:30px;">
              <tbody>
              <tr>
                  <td width="60">时间</td>
                  <td width="80" style="height:20px;line-height:20px">血压<br />mmHg</td>
                  <td width="60" style="height:20px;line-height:20px">脉搏<br />(次/分)</td>
                  <td width="60" style="height:20px;line-height:20px">KTV</td>
                  <td width="60" style="height:20px;line-height:20px">血流量<br />(ml/min)</td>
                  <td width="60" style="height:20px;line-height:20px">静脉压<br />mmHg</td>
                  <td width="60" style="height:20px;line-height:20px">动脉压<br />mmHg</td>
                  <td width="60" style="height:20px;line-height:20px">跨膜压<br />mmHg</td>
                  <td width="60" style="height:20px;line-height:20px">温度<br />°C</td>
                  <td width="60" style="height:20px;line-height:20px">超滤率<br />ml/h</td>
                  <td width="60" style="height:20px;line-height:20px">超滤量<br />ml</td>
<!--                  <td width="60" style="height:20px;line-height:20px" v-if="prescription.mode_id == 2">置换率<br /><br />ml/h</td>-->
<!--                  <td width="60" style="height:20px;line-height:20px" v-if="prescription.mode_id == 2">置换量<br /><br />ml</td>-->
                  <!-- <td width="60" style="height:20px;line-height:20px">血容量<br />ml</td> -->
                  <td width="">病情变化及处理</td>
              </tr>

              <tr v-for="monitor in monitors" :key="monitor.id">
                  <td style="height:32px;line-height:32px;">&nbsp;{{ getTime(monitor.operate_time, "{h}:{i}") }}</td>
                  <td>
                      <span v-if="monitor.systolic_blood_pressure || monitor.diastolic_blood_pressure">
                          &nbsp;{{ monitor.systolic_blood_pressure ? monitor.systolic_blood_pressure : "" }}/
                          {{ monitor.diastolic_blood_pressure ? monitor.diastolic_blood_pressure : "" }}
                      </span>
                  </td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.pulse_frequency ? monitor.pulse_frequency : "/" }}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.ktv ? monitor.ktv : "/" }}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.blood_flow_volume ? monitor.blood_flow_volume : "/" }}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.venous_pressure ? monitor.venous_pressure : "/" }}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.arterial_pressure ? monitor.arterial_pressure : "/" }}</span></td>

                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.transmembrane_pressure ? monitor.transmembrane_pressure : "/" }}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{monitor.dialysate_temperature ? monitor.dialysate_temperature : '/'}}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.ultrafiltration_rate ? monitor.ultrafiltration_rate : '/'}}</span></td>
                  <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.ultrafiltration_volume ? monitor.ultrafiltration_volume : "/" }}</span></td>
<!--                  <td v-if="prescription.mode_id == 2">&nbsp;<span v-if="monitor.operate_time">{{ monitor.replacement_rate ? monitor.replacement_rate : '/'}}</span></td>-->
<!--                  <td v-if="prescription.mode_id == 2">&nbsp;<span v-if="monitor.operate_time">{{ monitor.displacement_quantity ? monitor.displacement_quantity : "/" }}</span></td>-->
                  <!-- <td>&nbsp;<span v-if="monitor.operate_time">{{ monitor.accumulated_blood_volume ? monitor.accumulated_blood_volume : "/" }}</span></td> -->
                  <td style="text-align:left;padding-left:10px;">
                      <div style="line-height:20px;text-align: left;display: inline-block;">
                          &nbsp;{{ monitor.symptom }}{{ monitor.dispose }}{{ monitor.result }}
                      </div>
                  </td>
              </tr>
              </tbody>
          </table>
          <div class="row" style="display: flex;justify-content: space-around;">
              <div class="inline_block" style="display: flex;align-items: flex-end;">
                  预冲者：
                  <div class="under_line" style="width: 100px;text-align: center;">
                      <span style="display: inline-block;" v-if="setAdminUserES(dialysisOrder==null?0:dialysisOrder.washpipe_nurse) == ''">{{getAdminUser(dialysisOrder==null?0:dialysisOrder.washpipe_nurse)}}</span>
                      <img class="es-img" style="height:30px" :src="setAdminUserES(dialysisOrder==null?0:dialysisOrder.washpipe_nurse)" alt="" srcset="" v-else>
                  </div>
              </div>
              <div class="inline_block" style="display: flex;align-items: flex-end;">
                  穿刺者：
                  <div class="under_line" style="width: 100px;text-align: center;">
                      <span style="display: inline-block;" v-if="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.puncture_nurse) == ''">
                      {{ getAdminUser(dialysisOrder == null ? 0 : dialysisOrder.puncture_nurse) }}
                      </span>
                      <img class="es-img" style="height:30px" :src="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.puncture_nurse)" alt srcset v-else />
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;display: flex;align-items: flex-end;">
                  上机者：
                  <div class="under_line" style="width: 100px;text-align: center;">
                      <span style="display: inline-block;" v-if="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.start_nurse) == ''">
                      {{ getAdminUser(dialysisOrder == null ? 0 : dialysisOrder.start_nurse) }}</span>
                      <img style="height:30px;" :src="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.start_nurse)" alt="" srcset="" v-else />
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;display: flex;align-items: flex-end;">
                  下机者：
                  <div class="under_line" style="width: 100px;text-align: center;">
                      <span style="display: inline-block;" v-if="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.finish_nurse) == ''">
                          {{ getAdminUser(dialysisOrder == null ? 0 : dialysisOrder.finish_nurse) }}
                      </span>
                      <img style="height:30px;" :src="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.finish_nurse)" alt="" srcset="" v-else />
                  </div>
              </div>
          </div>
          <table class="print-table" border="1" style="line-height:30px;">
              <tbody>
              <tr style="height:32px;">
                  <td style="font-size: 16px" width="10%">时间</td>
                  <td style="font-size: 16px" colspan="2" width="45%">临时医嘱单</td>
                  <td style="font-size: 16px" width="10%">医生签名</td>
                  <td style="font-size: 16px" width="10%">执行护士</td>
                  <td style="font-size: 16px" width="10%">执行时间</td>
              </tr>
              <!-- <template v-for="group in doctor_advices" > -->

              <tr v-for="(advice, advice_index) in doctor_advices" :key="advice_index">
                  <td height="32px;padding:1px 1px">
                  <span v-if="advice.start_time">
                      {{ getTime(advice.start_time, "{h}:{i}") }}
                  </span>
                  <!-- <span v-else>&nbsp;<br/>&nbsp;</span> -->
                  </td>
                  <td height="32px" colspan="2" class="advice-name" style="padding-left:7px;">
                  <span v-if="advice.parent_id > 0">---></span>
                  <span>{{ advice.advice_name }}</span>
                  <span v-if="advice && advice.advice_desc">({{ advice.advice_desc }}{{ advice.drug_spec_unit }})</span>
                  <span v-if="advice.prescribing_number">&nbsp;&nbsp; {{ advice.prescribing_number }}{{ advice.prescribing_number_unit }}</span>
                  <span v-if="advice.single_dose != 0">{{ advice.single_dose }}{{ advice.single_dose_unit }}</span>
                  <span v-if="advice.parent_id == 0">{{ advice.delivery_way }}</span>
                  <span v-if="advice.parent_id == 0">{{ advice.execution_frequency }}</span>
                  <span v-if="advice.parent_id == 0 && advice.remark.length > 0">({{ advice.remark }})</span>
                  </td>
                  <!-- <td colspan="2" height="60px" style="text-align: center" v-else >
              <span>{{advice.delivery_way}}</span>
              <span>{{advice.execution_frequency}}</span>
              <span v-if="advice.remark.length > 0">({{advice.remark}})</span>
              </td> -->
                  <!-- <td width="10%" v-if="(advice.children && advice.children.length > 0 || advice.parent_id > 0) && advice.isShow == 2" ></td> -->
                  <td height="32px">
                      <span v-if="setAdminUserES(advice.advice_doctor) == ''">{{ getAdminUser(advice.advice_doctor) }}</span>
                      <img style="height:30px" :src="setAdminUserES(advice.advice_doctor)" alt="" srcset="" v-else />
                  </td>
                  <!-- <td height="35px">
              <span v-if="setAdminUserES(advice.checker) == ''">{{getAdminUser(advice.checker)}}</span>
              <img style="height:20px;" :src="setAdminUserES(advice.checker)" alt="" srcset="" v-else>
              </td> -->
                  <td height="32px">
                      <span v-if="setAdminUserES(advice.execution_staff) == ''">{{ getAdminUser(advice.execution_staff) }}</span>
                      <img style="height:30px" :src="setAdminUserES(advice.execution_staff)" alt="" srcset="" v-else />
                  </td>
                  <td height="32px">
                  <span v-if="advice.execution_time">{{ getTime(advice.execution_time, "{h}:{i}") }}</span>
                  </td>
              </tr>
              <tr v-for="(advice, advice_index) in projects" :key="advice_index">
                  <td height="32px;padding:1px 1px">
                  <span v-if="advice.start_time">
                      {{ getTime(advice.start_time, "{h}:{i}") }}
                  </span>
                  </td>
                  <td height="32px" colspan="2" class="advice-name" style="padding-left:7px;">
                    <span>{{ advice && advice.project ? advice.project.project_name : '' }}</span>
                  </td>
                  <td height="32px">
                      <span v-if="setAdminUserES(advice.doctor) == ''">{{ getAdminUser(advice.doctor) }}</span>
                      <img style="height:30px" :src="setAdminUserES(advice.doctor)" alt="" srcset="" v-else />
                  </td>
                  <td height="32px">
                      <span v-if="setAdminUserES(advice.execution_staff) == ''">{{ getAdminUser(advice.execution_staff) }}</span>
                      <img style="height:30px" :src="setAdminUserES(advice.execution_staff)" alt="" srcset="" v-else />
                  </td>
                  <td height="32px">
                  <span v-if="advice.execution_time">{{ getTime(advice.execution_time, "{h}:{i}") }}</span>
                  </td>
              </tr>
              </tbody>
          </table>
          <div style="border:1px solid #000;margin-top:5px;padding:0 10px;">
              <div class="row">
                  <div class="inline_block">
                      透后体重(Kg):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ afterdialysis.weight_after ? afterdialysis.weight_after : "/" }}
                      </div>
                  </div>
                  <div class="inline_block">
                      实际脱水量(ml):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ afterdialysis.actual_ultrafiltration ? afterdialysis.actual_ultrafiltration : "/" }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      实际透析时长(h):
                      <div class="under_line" style="width: 50px;text-align: center;">
                          {{ afterdialysis.actual_treatment_hour ? afterdialysis.actual_treatment_hour : "0" }}
                      </div>h
                      <div class="under_line" style="width: 50px;text-align: center;">
                          {{ afterdialysis.actual_treatment_minute ? afterdialysis.actual_treatment_minute : "0" }}
                      </div>min
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      BP(mmHg):
                      <div class="under_line" style="width: 70px;text-align: center;">
                        {{ afterdialysis.systolic_blood_pressure ? afterdialysis.systolic_blood_pressure : "" }}/
                        {{ afterdialysis.diastolic_blood_pressure ? afterdialysis.diastolic_blood_pressure : "" }}
                      </div>
                  </div>
                  <div class="inline_block" style="margin-left: 10px;">
                      P(次/分):
                      <div class="under_line" style="width: 70px;text-align: center;">
                          {{ afterdialysis.pulse_frequency ? afterdialysis.pulse_frequency : "/" }}
                      </div>
                  </div>
              </div>
              <div class="row" style="line-height: 30px;">
                  <div class="inline_block" style="width:100%;display:flex;">
                      小结：
                      <div class="under_line" style="border:1px solid #000;width:100%;flex:1;text-align:left;white-space: initial;">
                          {{ summary.dialysis_summary ? summary.dialysis_summary : "/" }}
                      </div>
                  </div>
              </div>
          </div>
          <div class="row" style="border-bottom:1px solid #000;display:flex;margin-top:50px;">
            <div class="inline_block" style="width:33%">
                  医生签名：
                  <div class="under_line" style="width: 70px;text-align: center;">
                      <span style="height: 30px;display: inline-block;" v-if="setAdminUserES(prescription.creater) == ''">
                          {{ getAdminUser(prescription.creater) }}
                      </span>
                      <img style="height:30px;" :src="setAdminUserES(prescription.creater)" alt="" srcset="" v-else />
                  </div>
              </div>
              <div class="inline_block" style="width:33%">
                  责任护士：
                  <div class="under_line" style="width: 70px;text-align: center;">
                      <span style="height: 30px;display: inline-block;" v-if="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.start_nurse) == ''">
                          {{ getAdminUser(dialysisOrder == null ? 0 : dialysisOrder.start_nurse) }}</span>
                      <img style="height:30px;" :src="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.start_nurse)" alt="" srcset="" v-else />
                  </div>
              </div>
              <div class="inline_block" style="margin-left: 10px;width:33%">
                  查对护士：
                  <div class="under_line" style="width: 80px;text-align: center" v-if="dialysisOrder == null">
                      <span style="height: 30px;display: inline-block;" v-if="setAdminUserES(check == null ? 0 : check.creater) == ''">
                      {{ getAdminUser(check == null ? 0 : check.creater) }}
                      </span>
                      <img style="height:30px;" :src="setAdminUserES(check == null ? 0 : check.creater)" alt="" srcset="" v-else />
                  </div>
                  <div class="under_line" style="width: 80px;text-align: center" v-if="dialysisOrder != null && dialysisOrder.start_nurse == check.modifier">
                      <span style="height: 30px;display: inline-block;" v-if="setAdminUserES(check == null ? 0 : check.creater) == ''">
                      {{ getAdminUser(check == null ? 0 : check.creater) }}
                      </span>
                      <img style="height:30px;" :src="setAdminUserES(check == null ? 0 : check.creater)" alt="" srcset="" v-else />
                  </div>
                  <div class="under_line" style="width: 80px;text-align: center" v-if="dialysisOrder != null && dialysisOrder.start_nurse == check.creater">
                      <span style="height: 30px;display: inline-block;" v-if="setAdminUserES(check == null ? 0 : check.modifier) == ''">
                      {{ getAdminUser(check == null ? 0 : check.modifier) }}
                      </span>
                      <img style="height:30px;" :src="setAdminUserES(check == null ? 0 : check.modifier)" alt="" srcset="" v-else />
                  </div>
                  <div class="under_line" style="width: 80px;text-align: center" v-if="dialysisOrder != null && dialysisOrder.start_nurse != check.creater && dialysisOrder.start_nurse != check.modifier">
                      <span style="height: 30px;display: inline-block;" v-if="setAdminUserES(check == null ? 0 : check.creater) == ''">
                      {{ getAdminUser(check == null ? 0 : check.creater) }}
                      </span>
                      <img style="height:30px;" :src="setAdminUserES(check == null ? 0 : check.creater)" alt="" srcset="" v-else />
                  </div>
              </div>
          </div>
      </div>
    </div>
  </div>
</template>

<script>
import CheckBox from '../batch_print/option_check_box'
import { getDialysisRecord } from '@/api/dialysis'
import { getDataConfig } from '@/utils/data'
import { jsGetAge, uParseTime } from '@/utils/tools'
import LabelBox from '../printItem/LabelBox'
import BreadCrumb from '@/xt_pages/components/bread-crumb'
// import DialysisPrintOrderOne from './template/dialysisPrintOrderOne'
// import DialysisPrintOrderTwo from './template/dialysisPrintOrderTwo'
import print from 'print-js'

export default {
  name: 'dialysisPrintOrderSix',
  props: ['childResponse'],
  components: {
    // DialysisPrintOrderOne,
    // DialysisPrintOrderTwo,
    CheckBox,
    LabelBox,
    BreadCrumb
  },
  data() {
    return {
      way_arr: [],
      consciousness_arr: [],
      appetite_arr: [],
      posture_arr: [],
      sick_condition_arr: [],
      precaution_arr: [],
      intake_arr: [],
      nutrition_arr: [],

      crumbs: [
        { path: false, name: '透析管理' },
        { path: false, name: '打印单' }
      ],
      operators: [],
      adminUser: [],
      check: {},
      xtdate: '',
      dialysisOrder: {
        DeviceNumber: []
      },
      displaceLiquiPartOptions: [],
      operatorMaps: {},
      complications: [
        '低血压',
        '高血压',
        '心律失常',
        '头晕',
        '头痛',
        '呕吐',
        '抽搐',
        '出血',
        '心衰',
        '腹痛'
      ],
      jilurow: 0,
      advice_jilurow: 0,
      loading: false,
      orgname: '',
      patientInfo_gender_1: false,
      patientInfo_gender_2: false,
      patientInfo_source_2: false,
      patientInfo_source_1: false,
      modeOptions: {},
      replacementWays: [],
      perfusionApparatus: [],
      anticoagulantsConfit: {},
      bloodAccessParOpera: {},
      dialysateFormulationOptions: {},
      totollength: 0,
      queryParams: {
        xtdate: '',
        xtno: ''
      },
      patientInfo: {
        birth: '',
        age: '',
        DialysisSchedule: {
          device_number: { number: '' },
          device_zone: { name: '' }
        },
        gender: 0
      },
      predialysis: {
        score: '',
        internal_fistula: '',
        internal_fistula_skin: '',
        catheter: '',
        blood_access_part_opera_name: ''
      },
      afterdialysis: {
        complications_index: ''
      },
      lastafterdialysis: {},
      prescription: {
        dialysate_formulation_name: '',
        device: {}
      },
      advices: [],
      users: [],
      monitors: [],
      monitors2: [],
      summary: {},
      receiverTreatmentAccess: {},
      org_template_info: {},

      doctor_advices: [],
      doctor_advices_2: [],
      advice_groups: [],
      advice_groups_2: [],
      print_length: 0,
      blood_access_part: [],
      blood_access_part_opera: [],

      AlPanel: {
        id: 0,
        name: '',
        type: 1,
        shouji: 2,
        weichi: 2,
        zongliang: 2,
        gaimingcheng: -1,
        gaijiliang: -1,
        shouji_unit: 'mg',
        weichi_unit: 'mg/h',
        zongliang_unit: 'mg',
        gaimingcheng_unit: '',
        gaijiliang_unit: ''
      },
      org_id:0,
      projects:[]
    }
  },
  methods: {
    checkData(){
      if(this.predialysis.temperature == ""){
        this.$message.error('透前体温未填')
      }else if(this.predialysis.pulse_frequency == ""){
        this.$message.error('透前脉搏未填')
      }else if(this.predialysis.breathing_rate == ""){
        this.$message.error('透前呼吸频率未填')
      }else if(this.predialysis.systolic_blood_pressure == 0 || this.predialysis.diastolic_blood_pressure == 0){
        this.$message.error('透前血压未填完整')
      }else if(this.prescription.dialysis_duration_hour == 0 && this.prescription.dialysis_duration_minute == 0){
        this.$message.error('透析时长未填')
      }else if(this.predialysis.weight_before == 0){
        this.$message.error('透前体重未填')
      }else if(this.predialysis.dry_weight == 0){
        this.$message.error('干体重未填')
      }else if(this.prescription.target_ultrafiltration == 0){
        this.$message.error('目标脱水量未填')
      }else if(this.prescription.mode_id == ""){
        this.$message.error('透析方式未填')
      }else if(this.prescription.kalium == 0){
        this.$message.error('钾未填')
      }else if(this.prescription.calcium == 0){
        this.$message.error('钙未填')
      }else if(this.prescription.sodium == 0){
        this.$message.error('钠未填')
      }else if(this.prescription.bicarbonate == 0){
        this.$message.error('碳酸氢根未填')
      }else if(this.prescription.amylaceum == 0){
        this.$message.error('糖未填')
      }else if(this.prescription.dialyzer_perfusion_apparatus == ""){
        this.$message.error('透析器未填')
      }else if(this.prescription.anticoagulant == 0){
        this.$message.error('抗凝剂未填')
      }else if(this.predialysis.blood_access_part_opera_name == ''){
        this.$message.error('血管通路未填')
      }else if(this.prescription.mode_id == 2 && this.prescription.displace_liqui_part == 0){
        this.$message.error('置换方式未填')
      }else if(this.prescription.mode_id == 2 && this.prescription.displace_liqui_value == 0){
        this.$message.error('置换液总量未填')
      }else if(this.prescription.blood_flow_volume == 0){
        this.$message.error('血流速未填')
      }else if(this.predialysis.symptom_before_dialysis == ""){
        this.$message.error('透前病情未填')
      }else if(this.dialysisOrder == null || this.dialysisOrder.washpipe_nurse == 0){
        this.$message.error('预冲者未填')
      }else if(this.dialysisOrder == null || this.dialysisOrder.puncture_nurse == 0){
        this.$message.error('穿刺者未填')
      }else if(this.dialysisOrder == null || this.dialysisOrder.start_nurse == 0){
        this.$message.error('上机者未填')
      }else if(this.dialysisOrder == null || this.dialysisOrder.finish_nurse == 0){
        this.$message.error('下机者未填')
      }else if(this.afterdialysis.weight_after == 0){
        this.$message.error('透后体重未填')
      }else if(this.afterdialysis.actual_ultrafiltration == 0){
        this.$message.error('实际脱水量未填')
      }else if(this.afterdialysis.actual_treatment_hour == 0 && this.afterdialysis.actual_treatment_minute == 0){
        this.$message.error('实际透析时长未填')
      }else if(this.afterdialysis.systolic_blood_pressure == 0 || this.afterdialysis.diastolic_blood_pressure == 0){
        this.$message.error('透后血压未填完整')
      }else if(this.afterdialysis.pulse_frequency == 0){
        this.$message.error('透后脉搏未填')
      }else if(this.summary.dialysis_summary == ""){
        this.$message.error('小结未填')
      }else if(this.prescription.creater == 0){
        this.$message.error('医生签名未填')
      }else if(this.dialysisOrder == null && this.check.creater == 0){
        this.$message.error('查对护士未填')
      }else if(this.dialysisOrder != null && this.dialysisOrder.start_nurse == this.check.modifier && this.check.creater == 0){
        this.$message.error('查对护士未填')
      }else if(this.dialysisOrder != null && this.dialysisOrder.start_nurse == this.check.creater && this.check.modifier == 0){
        this.$message.error('查对护士未填')
      }else if(this.dialysisOrder != null && this.dialysisOrder.start_nurse != this.check.creater && this.dialysisOrder.start_nurse != this.check.modifier && this.check.creater == 0){
        this.$message.error('查对护士未填')
      }else if(this.tableAdvice.length > 0){
        let num = 0
        if(this.tableAdvice.length > 0){
          this.tableAdvice.map(item => {
            if(item.id > 0 && (item.created_time || item.start_time)){
              this.users.map(it => {
                if(it.id == item.advice_doctor){
                  if(it.user_type == 3){
                    num++
                    this.$message.closeAll()
                    this.$message.error('存在不是医生保存的医嘱')
                  }else if(it.id == item.execution_staff && item.execution_staff > 0){
                    if(it.user_type == 2){
                      num++
                      this.$message.closeAll()
                      this.$message.error('存在不是护士执行的医嘱')
                    }
                  }else if(it.id == item.checker && item.checker > 0){
                    if(it.user_type == 2){
                      num++
                      this.$message.closeAll()
                      this.$message.error('存在不是护士核对的医嘱')
                    }
                  }
                }else if(it.id == item.execution_staff && item.execution_staff > 0){
                  if(it.user_type == 2){
                    num++
                    this.$message.closeAll()
                    this.$message.error('存在不是护士执行的医嘱')
                  }
                }else if(it.id == item.checker && item.checker > 0){
                  if(it.user_type == 2){
                    num++
                    this.$message.closeAll()
                    this.$message.error('存在不是护士核对的医嘱')
                  }
                }
              })
            }
        })
        }

        if(num == 0){
          this.$message.success('核对完成')
        }
      }else{
        this.$message.success('核对完成')
      }
    },
    getDisplaceLiquiPart: function(val) {
      let displace_liqui_part_name = '/'
      const displace_liqui_part = this.displaceLiquiPartOptions
      for (let i = 0; i < displace_liqui_part.length; i++) {
        if (displace_liqui_part[i].id == val) {
          displace_liqui_part_name = displace_liqui_part[i].name
        }
      }
      return displace_liqui_part_name
    },
    replacementWaysById: function(val) {
      let replacementWaysname = '/'
      // let vascular_access = getDataConfig('hemodialysis', 'vascular_access')

      for (let i = 0; i < this.replacementWays.length; i++) {
        if (this.replacementWays[i].id == val) {
          replacementWaysname = this.replacementWays[i].name
        }
      }
      return replacementWaysname
    },
    QueryPartById: function(val) {
      let vascular_access_part_name = '/'
      const vascular_access = getDataConfig('hemodialysis', 'vascular_access')

      for (let i = 0; i < vascular_access.length; i++) {
        if (vascular_access[i].id == val) {
          vascular_access_part_name = vascular_access[i].name
        }
      }
      return vascular_access_part_name
    },
    getAdminUser(id) {
      if (id == 0) {
        return ''
      }
      if (id == undefined) {
        return ''
      }
      for (let i = 0; i < this.adminUser.length; i++) {
        if (this.adminUser[i].id == id) {
          return this.adminUser[i].name
        }
      }
    },
    getTime(value, temp) {
      if (value == 0) {
        return ''
      }
      if (value != undefined) {
        return uParseTime(value, temp)
      }
      return ''
    },
    getUnit: function(val) {
      switch (val) {
        case 1:
          return 'g'
          break
        case 2:
          return 'ml'
          break
      }
    },
    printThisPage() {
      var ptime = Math.round(new Date().getTime() / 1000)
      this.print_time = uParseTime(ptime, '{y}-{m}-{d} {h}:{i}')

      const style =
        '@media print {.dialysis-print-order{width:960px;margin:0 auto}.dialysis-print-order .order-yy-name{margin:auto;text-align:center;font-size:20px;letter-spacing:5px}.dialysis-print-order .order-title{margin:auto;font-weight:600;text-align:center;font-size:22px;padding:10px}.dialysis-print-order .table-box{width:100%;line-height:23px;font-size:14px}.dialysis-print-order .print-table{width:100%;text-align:center;border-collapse:collapse;line-height:25px;font-size:14px}.dialysis-print-order .print-table-no{width:100%;text-align:left;border-collapse:collapse;font-size:14px} .dialysis-print-order .under_line {display: inline-block;border-bottom: 1px solid #999;text-align:left;white-space: nowrap;width: 50%;} .dialysis-print-order .title-box{text-align:center;font-size:16px;border:1px solid #666}.dialysis-print-order .radio-lebel-box{font-weight:400;cursor:pointer}.dialysis-print-order .radio-no{opacity:0;outline:0;position:absolute;margin:0;width:0;height:0;z-index:-1}.dialysis-print-order .radio-inner{white-space:nowrap;cursor:pointer;outline:0;display:inline-block;line-height:1;position:relative;vertical-align:middle}.dialysis-print-order .radio-fang{display:inline-block;position:relative;border:1px solid #000;box-sizing:border-box;width:14px;height:14px;background-color:#fff;z-index:1;transition:border-color .25s cubic-bezier(.71,-.46,.29,1.46),background-color .25s cubic-bezier(.71,-.46,.29,1.46)}.dialysis-print-order .is-checked-radio::after{content:"√";font-size:15px}}.dialysis-print-order .print-table-no tr td { padding: 8px 5px; line-height: 25px; }.es-img{height: 20px; }.advice-name{text-align: left;}.advice-children{display:flex;} .dialysis-print-order .print-table tr td{padding: 0px 0px;} .print-template-two tr {line-height: 30px;}   .title-box-pro{border: 0 #fff;line-height: 40px;height: 40px;text-align: left;padding-left: 10px !important;}  .text-align-left{text-align: left !important;padding-left:10px !important;font-size: 14px !important;line-height: 25px;}'

      if (this.org_template_info.template_id == 1) {
        printJS({
          printable: 'dialysis-print-box',
          type: 'html',
          style: style,
          scanStyles: false
        })
      } else if (
        this.org_template_info.template_id == 2 ||
        this.org_template_info.template_id == 0
      ) {
        printJS({
          printable: 'dialysis-print-box-1',
          type: 'html',
          style: style,
          scanStyles: false
        })
      }
    },
    getNumber() {
      if (this.dialysisOrder != null) {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.dialysisOrder.DeviceNumber.number
        )
      } else {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.patientInfo.DialysisSchedule.device_number.number
        )
      }
    },

    getXuserName(id) {
      if (id <= 0) {
        return ''
      }
      var name = ''
      if (this.users == null || typeof this.users.length === 'undefined') {
        return name
      }
      var leng = this.users.length
      if (leng == 0) {
        return name
      }
      for (let index = 0; index < leng; index++) {
        if (this.users[index].id == id) {
          name = this.users[index].name
          break
        }
      }
      return name
    },
    setAdminUserES(id) {
      if (id == 0) {
        return ''
      }
      if (id in this.operatorMaps) {
        return this.operatorMaps[id].url
      } else {
        return ''
      }
    },
    modeName(mode_id) {
      return typeof this.modeOptions[mode_id] !== 'undefined' &&
        typeof this.modeOptions[mode_id].name !== 'undefined'
        ? this.modeOptions[mode_id].name
        : ''
    },
    getDialysisRecord() {
      this.loading = true

      // getDialysisRecord(this.queryParams).then(response => {
      var response = this.childResponse
      if (response.data.state == 1) {
        this.adminUser = response.data.data.users

        this.users = response.data.data.users
        this.patientInfo = response.data.data.patientInfo

        this.patientInfo.birth = uParseTime(
          this.patientInfo.birthday,
          '{y}-{m}-{d}'
        )
        // this.patientInfo.age = jsGetAge(this.patientInfo.birth, '-')
        if (response.data.data.patientInfo.first_dialysis_date != 0) {
          this.patientInfo.first_dialysis_date = uParseTime(
            response.data.data.patientInfo.first_dialysis_date,
            '{y}-{m}-{d}'
          )
        } else {
          this.patientInfo.first_dialysis_date = ''
        }
        this.check = response.data.data.check
        this.xtdate = response.data.data.xtdate
        this.predialysis = response.data.data.PredialysisEvaluation
        this.predialysis.blood_access_part_opera_name = this.bloodAccessParOperaName(
          this.predialysis.blood_access_part_opera_id
        )
        this.afterdialysis = response.data.data.AssessmentAfterDislysis
        // console.log('透后体重', this.afterdialysis)
        this.lastafterdialysis = response.data.data.assessmentAfterDislysis
        this.operators = response.data.data.operators
        console.log('operators', this.operators)
        this.dialysisOrder =
          response.data.data.dialysisOrder === null
            ? null
            : response.data.data.dialysisOrder

        if (this.operators.length > 0) {
          var operatorsLen = this.operators.length
          for (var index = 0; index < operatorsLen; index++) {
            this.$set(
              this.operatorMaps,
              this.operators[index].creator,
              this.operators[index]
            )
          }
        }

        this.afterdialysis.txqnx = -1
        if (this.afterdialysis.cruor.indexOf('0度') > -1) {
          this.afterdialysis.txqnx = 0
        }
        if (this.afterdialysis.cruor.indexOf('Ⅰ度') > -1) {
          this.afterdialysis.txqnx = 1
        }
        if (this.afterdialysis.cruor.indexOf('Ⅱ度') > -1) {
          this.afterdialysis.txqnx = 2
        }
        if (this.afterdialysis.cruor.indexOf('Ⅲ度') > -1) {
          this.afterdialysis.txqnx = 3
        }

        this.afterdialysis.complications = this.afterdialysis.complication.split(
          ','
        )
        this.afterdialysis.complications_other = []
        this.afterdialysis.complications_index = []
        var acllen = this.afterdialysis.complications.length
        for (let index = 0; index < acllen; index++) {
          if (
            this.complications.indexOf(
              this.afterdialysis.complications[index]
            ) >= 0
          ) {
            this.afterdialysis.complications_index.push(
              this.afterdialysis.complications[index]
            )
          } else if (
            this.complications.indexOf(
              this.afterdialysis.complications[index]
            ) < 0 &&
            this.afterdialysis.complications_other.indexOf(
              this.afterdialysis.complications[index]
            ) < 0
          ) {
            this.afterdialysis.complications_other.push(
              this.afterdialysis.complications[index]
            )
          }
        }
        this.afterdialysis.complications_other = this.afterdialysis.complications_other.join(
          ','
        )

        this.prescription = response.data.data.dialysisPrescription
        console.log('透析处方', this.prescription)
        this.receiverTreatmentAccess =
          response.data.data.receiverTreatmentAccess
        this.prescription.mode = this.modeName(this.prescription.mode_id)
        var rwLen = this.replacementWays.length
        this.prescription.replacement = ''
        for (let index = 0; index < rwLen; index++) {
          if (
            this.replacementWays[index].id == this.prescription.replacement_way
          ) {
            this.prescription.replacement = this.replacementWays[index].name
            break
          }
        }

        this.prescription.dialysate_formulation_name = this.dialysateFormulationName(
          this.prescription.dialysate_formulation
        )

        var paLen = this.perfusionApparatus.length
        this.prescription.perfusion_apparatus_name = ''
        for (let index = 0; index < paLen; index++) {
          if (
            this.perfusionApparatus[index].id ==
            this.prescription.perfusion_apparatus
          ) {
            this.prescription.perfusion_apparatus_name = this.perfusionApparatus[
              index
            ].name
            break
          }
        }

        var acLen = this.anticoagulantsConfit.length
        var thisALID = this.prescription.anticoagulant
        this.prescription.anticoagulant_name = ''

        if (
          typeof this.anticoagulantsConfit[thisALID] !== 'undefined' &&
          this.anticoagulantsConfit[thisALID] != null
        ) {
          this.prescription.anticoagulant_name = this.anticoagulantsConfit[
            thisALID
          ].name
          this.AlPanel = this.anticoagulantsConfit[thisALID]
        }

        this.advices = response.data.data.advices
        this.tableAdvice = response.data.data.advices;
        console.log("医嘱数据2222222222",this.advices)
        this.monitors = response.data.data.monitors
        this.summary = response.data.data.summary
        this.org_template_info = response.data.data.org_template_info

        if (this.monitors.length < 7) {
            var nl = 7 - this.monitors.length
            for (let index = 0; index < nl; index++) {
              this.monitors.push([])
            }
        }

        var tempmonitorflag = true
        for (let index = 0; index < this.monitors.length; index++) {
          const monitor = this.monitors[index]
          this.monitors[index].end = ''
          if (Object.keys(monitor).length > 0 && index > 1) {
            if (this.dialysisOrder && monitor.operate_time == this.dialysisOrder.end_time) {
              this.monitors[index].end = '【结束透析】'
              tempmonitorflag = false
            }
            if (tempmonitorflag && index == this.monitors.length - 1) {
              this.monitors[index].end = '【结束透析】'
            }
          }
        }

        this.jilurow = this.monitors.length + 1

        this.advice_jilurow = this.advices.length + 1

        var childMap = {}
        for (const index in this.advices) {
          if (this.advices[index].parent_id == 0) {
            continue
          }
          if (!(this.advices[index].parent_id in childMap)) {
            childMap[this.advices[index].parent_id] = []
          }
          childMap[this.advices[index].parent_id].push(this.advices[index])
        }

        var advices = []
        for (const index in this.advices) {
          if (this.advices[index].parent_id > 0) {
            continue
          }
          var item = this.advices[index]
          if (item.id in childMap) {
            item.children = childMap[item.id]
          } else {
            item.children = []
          }
          advices.push(item)
        }

        var leftAdvice = []
        var rightAdvice = []
        var adlen = advices.length

        var halfLen = adlen % 2 == 0 ? adlen / 2 : (adlen + 1) / 2
        for (var i = 0; i < halfLen; i++) {
          leftAdvice.push(advices[i])
          rightAdvice.push(advices[i + halfLen])
        }
        if (halfLen < 5) {
          var nl = 5 - leftAdvice.length
          for (let index = 0; index < nl; index++) {
            leftAdvice.push([])
          }
          var nl = 5 - rightAdvice.length
          for (let index = 0; index < nl; index++) {
            rightAdvice.push([])
          }
        }

        this.advices = []
        for (var i = 0; i < halfLen; i++) {
          var item = []
          item.push(leftAdvice[i])
          item.push(rightAdvice[i])
          this.advices.push(item)
        }
        this.loading = false
        this.doctor_advices =
          response.data.data.advices == null ? [] : JSON.parse(JSON.stringify(response.data.data.advices))
        for (let index = 0; index < this.doctor_advices.length; index++) {
          this.doctor_advices[index]['isShow'] = 2
        }

        // if (this.doctor_advices.length > 0) {
        //   var group = this.newAdviceGroupObject()
        //   var initGroupBlock = function(group, advice) {
        //     group.group_no = advice.groupno
        //   }
        //   for (let index = this.doctor_advices.length - 1; index >= 0; index--) {
        //     var new_advice_index = 0

        //     if ('children' in this.doctor_advices[index] && this.doctor_advices[index].children.length > 0) {
        //       new_advice_index = index + this.doctor_advices[index].children.length + 1

        //       var doctor_advice = {
        //         delivery_way: this.doctor_advices[index].delivery_way,
        //         execution_frequency: this.doctor_advices[index].execution_frequency,
        //         groupno: this.doctor_advices[index].groupno,
        //         id: this.doctor_advices[index].id,
        //         parent_id: this.doctor_advices[index].parent_id,
        //         children: this.doctor_advices[index].children,
        //         remark: this.doctor_advices[index].remark,
        //         execution_staff: this.doctor_advices[index].execution_staff,
        //         checker: this.doctor_advices[index].checker,
        //         execution_time: this.doctor_advices[index].execution_time,
        //         advice_doctor: this.doctor_advices[index].advice_doctor

        //       }
        //       doctor_advice['isShow'] = 1
        //       this.doctor_advices.splice(new_advice_index, 0, doctor_advice)
        //       // this.doctor_advices.push(doctor_advice)
        //     }
        //   }

        //   for (let index = 0; index < this.doctor_advices.length; index++) {
        //     const advice = this.doctor_advices[index]
        //     if (advice.groupno == 0) {
        //       // 老版本的医嘱没有分组的概念，所以这一个 if 是解决这个问题的，将每个无分组的医嘱各自归为一组
        //       if (advice.parent_id > 0) {
        //         if (this.advice_groups.length > 0) {
        //           var parent_group = this.advice_groups[
        //             this.advice_groups.length - 1
        //           ]
        //           if (parent_group.advices.length > 0) {
        //             if (parent_group.advices[0].id == advice.parent_id) {
        //               parent_group.advices.push(advice)
        //             }
        //           }
        //         }
        //         continue
        //       } else {
        //         if (group.group_no > 0) {
        //           this.advice_groups.push(group)
        //           group = this.newAdviceGroupObject()
        //         }

        //         initGroupBlock(group, advice)
        //         group.advices.push(advice)
        //         this.advice_groups.push(group)
        //         group = this.newAdviceGroupObject()
        //         continue
        //       }
        //     }

        //     if (group.group_no > 0 && group.group_no != advice.groupno) {
        //       this.advice_groups.push(group)
        //       group = this.newAdviceGroupObject()
        //     }
        //     if (group.group_no == 0) {
        //       initGroupBlock(group, advice)
        //     }
        //     if (group.group_no == advice.groupno) {
        //       group.advices.push(advice)
        //     }
        //   }

        //   if (group.group_no > 0) {
        //     // 上述的算法会导致最后一组没有加到advice_groups，这里要手动加上
        //    this.advice_groups.push(group)
        //   }
        // }

        let projects = []
        response.data.data.projects.map(item => {
          if(item.type == 2){
            projects.push(item)
          }
        })
        this.projects = projects
        if ((this.doctor_advices.length + this.projects.length) <= 6) {
          var nl = 6 - (this.doctor_advices.length + this.projects.length)
          this.print_length = 6

          for (let index = 0; index < nl; index++) {
            if (
              this.projects[index] == undefined ||
              this.projects[index].length <= 0
            ) {
              this.projects.push([])
            } else {
              continue
            }
          }
        }

        console.log('this.projects',this.projects)

        // this.totollength = this.doctor_advices.length + this.monitors.length
        // if (this.totollength > 18) {
        //   var temp_advice_length = 17 - this.monitors.length
        //   var doctor_advices_1 = []
        //   var doctor_advices_2 = []
        //   for (let index = 0; index < this.doctor_advices.length; index++) {
        //     const element = this.doctor_advices[index]
        //     if (temp_advice_length > index) {
        //       doctor_advices_1.push(element)
        //     } else {
        //       doctor_advices_2.push(element)
        //     }
        //   }
        //   this.doctor_advices = doctor_advices_1
        //   this.doctor_advices_2 = doctor_advices_2
        // }
        console.log(this.advice_groups)
      } else {
        this.loading = false
        this.$message.error('请求数据失败')
        return false
      }
      // })
    },

    bloodAccessParOperaName(id) {
      if (id in this.bloodAccessParOpera) {
        return this.bloodAccessParOpera[id].name
      }
      return ''
    },
    dialysateFormulationName(id) {
      if (id in this.dialysateFormulationOptions) {
        return this.dialysateFormulationOptions[id].name
      }
      return ''
    },
    getAge: function(val) {
      if (
        this.org_template_info.template_id == 2 ||
        this.org_template_info.template_id == 0
      ) {
        if (val.age == 0) {
          return jsGetAge(val.birth, '-')
        } else {
          return val.age
        }
      } else {
        return jsGetAge(val.birth, '-')
      }
    },
    newAdviceGroupObject: function() {
      return Object.assign(
        {},
        {
          group_no: 0,
          // advice_doctor: 0,
          // start_time: 0,
          advices: []
          // exec_staff: 0,
          // exec_time: 0,
          // checker: 0,
        }
      )
    },
    getFloat: function(x) {
      if (x == 0) {
        return '/'
      }
      if (x != '.') {
        var f = Math.round(x * 100) / 100
        var s = f.toString()
        var rs = s.indexOf('.')
        if (rs <= 0) {
          rs = s.length
          s += '.'
        }
        while (s.length <= rs + 1) {
          s += '0'
        }
        return s
      } else {
        return '0.0'
      }
    }
  },
  watch: {
    'patientInfo.gender': function() {
      if (this.patientInfo.gender == 1) {
        this.patientInfo_gender_1 = true
        this.patientInfo_gender_2 = false
      } else if (this.patientInfo.gender == 2) {
        this.patientInfo_gender_2 = true
        this.patientInfo_gender_1 = false
      } else {
        this.patientInfo_gender_2 = false
        this.patientInfo_gender_1 = false
      }
    },
    'patientInfo.source': function() {
      if (this.patientInfo.source == 1) {
        this.patientInfo_source_1 = true
        this.patientInfo_source_2 = false
      } else if (this.patientInfo.source == 2) {
        this.patientInfo_source_2 = true
        this.patientInfo_source_1 = false
      } else {
        this.patientInfo_source_2 = false
        this.patientInfo_source_1 = false
      }
    }
  },
  created() {
    this.way_arr = getDataConfig('hemodialysis', 'way')
    this.consciousness_arr = getDataConfig('hemodialysis', 'consciousness')
    this.appetite_arr = getDataConfig('hemodialysis', 'appetite')
    this.posture_arr = getDataConfig('hemodialysis', 'posture')
    this.sick_condition_arr = getDataConfig('hemodialysis', 'sick_condition')
    this.precaution_arr = getDataConfig('hemodialysis', 'precaution')
    this.intake_arr = getDataConfig('hemodialysis', 'intake')
    this.nutrition_arr = getDataConfig('hemodialysis', 'nutrition')

    var xtuser = this.$store.getters.xt_user
    this.orgname = xtuser.org.org_name
    // this.orgname = "遂溪方济医院";
    this.modeOptions = this.$store.getters.treatment_mode
    this.replacementWays = this.$store.getters.replacement_ways
    this.perfusionApparatus = this.$store.getters.perfusion_apparatus
    this.anticoagulantsConfit = this.$store.getters.anticoagulants_confit
    this.displaceLiquiPartOptions = this.$store.getters.displace_liqui

    this.blood_access_part = getDataConfig('hemodialysis', 'vascular_access')
    this.blood_access_part_opera = getDataConfig(
      'hemodialysis',
      'vascular_access_desc'
    )
     this.org_id = this.$store.getters.xt_user.org.id
     console.log("=====",this.org_id)
    // this.bloodAccessParOpera = getDataConfig('hemodialysis', 'vascular_access_desc')

    var bloodAccessParOpera = getDataConfig(
      'hemodialysis',
      'vascular_access_desc'
    )
    for (var key in bloodAccessParOpera) {
      this.bloodAccessParOpera[bloodAccessParOpera[key].id] =
        bloodAccessParOpera[key]
    }

    var dialysateFormulationOptions = getDataConfig(
      'hemodialysis',
      'dialysate_formulation'
    )
    for (var key in dialysateFormulationOptions) {
      this.dialysateFormulationOptions[dialysateFormulationOptions[key].id] =
        dialysateFormulationOptions[key]
    }

    const xtdate = this.$route.query && this.$route.query.xtdate
    console.log('xtdate', xtdate)
    const xtno = this.$route.query && this.$route.query.xtno
    console.log('xtno', xtno)
    if (
      typeof xtdate === 'string' &&
      xtdate.length > 0 &&
      typeof xtno === 'string' &&
      xtno.length > 0
    ) {
      this.queryParams.xtdate = xtdate
      this.queryParams.xtno = xtno
      this.getDialysisRecord()
    } else {
      this.$message.error('参数不齐')
      return false
    }
  }
}
</script>

<style>
.print_page_main_content {
  background-color: white;
  width: 960px;
  margin: 0 auto 50px;
  padding: 0 0 0 0;
  page-break-after: always;
}

.print_page_main_content .order-yy-name {
  margin: auto;
  text-align: center;
  font-size: 20px;
  letter-spacing: 5px;
}

.dialysis-print-order .order-title {
  margin: auto;
  font-weight: 600;
  text-align: center;
  font-size: 22px;
  padding: 10px;
}

.print_page_main_content .order_title {
  text-align: center;
  font-size: 23px;
  line-height: 50px;
  font-weight: 500;
}

.row {
  font-size: 14px;
  line-height: 20px;
  padding: 5px 0;
}

.inline_block {
  display: inline-block;
}
.under_line_two {
  display: inline-block;
  border-bottom: 1px solid #999;
  text-align: left;
  white-space: nowrap;
  width: 50%;
}

.under_line_two::before {
  content: "\00A0";
}

.under_line_two::after {
  content: "\00A0";
}

.under_line {
  display: inline-block;
  border-bottom: 1px solid #999;
  text-align: center;
  white-space: nowrap;
  width: 50%;
}

.under_line::before {
  content: "\00A0";
}

.under_line::after {
  content: "\00A0";
}

.flex {
  display: -webkit-box;
  display: -moz-box;
  display: -ms-flexbox;
  display: -webkit-flex;
  display: flex;
  align-items: center;
  -webkit-align-items: center;
  box-align: center;
  -moz-box-align: center;
  -webkit-box-align: center;
  text-align: center;
  -webkit-justify-content: space-between;
  justify-content: space-between;
  -moz-box-pack: space-between;
  -webkit--moz-box-pack: space-between;
  box-pack: space-between;
}

.print_page_main_content .proj_table {
  width: 100%;
  border: 1px solid;
  border-collapse: collapse;
  padding: 2px;
}

.print_page_main_content .proj_table tbody tr td {
  border: 1px solid;
  /* text-align: center; */
  font-size: 16px;
  padding: 5px 8px;
  line-height: 30px;
}

.print_page_main_content .proj_table .inside_table {
  width: 100%;
  border: hidden; /* 解决边框冲突 */
  border-collapse: collapse;
}

.print_page_main_content .proj_table .inside_table tr td {
  border: 1px solid;
  text-align: center;
  font-size: 14px;
  padding: 6px 5px;
  line-height: 16px;
}

.print-table-no {
  width: 100%;
  text-align: center;
  border-collapse: collapse;
  font-size: 14px;
}

.es-img {
  height: 20px;
}

.advice-name {
  text-align: left !important;
  line-height: 16px !important;
}

.advice-children {
  display: flex;
}
.margin-bottom-50 {
}
.margin-bottom-300 {
  margin-bottom: 450px;
}
.margin-bottom-600 {
  margin-bottom: 600px;
}
.margin-bottom-900 {
  margin-bottom: 900px;
}
.print-yema {
  position: absolute;
  left: 50%;
}
.print-yema2 {
  position: absolute;
  left: 50%;
}
.print-yema3 {
  position: absolute;
  left: 50%;
}
.print-yema4 {
  position: absolute;
  left: 50%;
}
.check_box_panel .did_checke::after {
  font-size: 8px;
  margin-left: 2px;
  margin-top: 2px;
  position: absolute;
}
</style>
