<template>
  <div>
    <el-button type="primary" @click="checkData">一键核对</el-button>
    <div id="dialysis-print-box">
      <div class="dialysis-print-order">
        <div class="order-yy-name" style="text-align: center;font-size: 20px;">{{ orgname }}</div>
        <div class="order-title">血液透析(滤过)记录表单</div>
        <table border="1" class="table-box" style="border-collapse: collapse;text-align: center;width: 99%;">
          <tbody>
            <tr>
              <td width="80" style="line-height:30px;">治疗日期: <span>{{ year }}</span>年<span>{{ months }}</span>月<span>{{
                day }}</span>日</td>
            </tr>
          </tbody>
        </table>
        <table border="1" class="table-box" style="border-collapse: collapse;width: 99%;">
          <tbody>
            <tr>
              <td colspan="3">
                <div style="display: flex;line-height:30px;">
                  <div style="flex: 1;">
                    姓名:{{ patientInfo.name ? patientInfo.name : "/" }}
                  </div>
                  <div style="flex: 1;">
                    性别:{{ patientInfo.gender ? patientInfo.gender : "/" }}
                  </div>
                  <div style="flex: 1;">
                    年龄:{{ patientInfo.age }} 岁
                  </div>
                  <div style="flex: 1;">
                    透析机号:
                    {{ dialysisOrder && dialysisOrder.DeviceNumber && dialysisOrder.DeviceNumber.number.length > 0 ?
                      dialysisOrder.DeviceNumber.number : patientInfo.DialysisSchedule.device_number.number }}
                  </div>
                  <div style="flex: 1;">
                    透析频次:
                    <span style="display: inline-block;width: 50px;">
                      {{ predialysis.dialysis_count}}
                    </span>
                  </div>
                </div>
              </td>
            </tr>
            <tr>
              <td colspan="3">
                <div style="line-height:30px;display: inline-block;">
                  上机前病情:
                  <!-- <label-box :isChecked="predialysis.symptom_before_dialysis == '' ? true : false"
                    showValue="无特殊"></label-box>&nbsp;
                  <label-box :isChecked="predialysis.symptom_before_dialysis != '' ? true : false"
                  showValue="其他:"></label-box> -->
                  <div class="inline_block" style="flex: 0.8;">
                    <div class="under_line" style="width: 50px; text-align: center">
                      {{
                        predialysis.befor_symptoms
                          ? predialysis.befor_symptoms
                          : "/"
                      }}
                    </div>
                  </div>
                </div>
              </td>
            </tr>

            <tr>
              <td colspan="3">
            
                <div class="row" style="padding: 2px 0; line-height: 23px;display: inline-block;" >
                  <div class="inline_block" style="flex: 0.8;">
                    T：
                    <div class="under_line" style="width: 50px; text-align: center">
                      {{
                        predialysis.temperature
                          ? predialysis.temperature
                          : "/"
                      }}
                    </div>
                    °C
                  </div>
                  <div class="inline_block" style="flex: 0.8;">
                    P：
                    <div class="under_line" style="width: 50px; text-align: center">
                      {{
                        predialysis.pulse_frequency
                          ? predialysis.pulse_frequency
                          : "/"
                      }}
                    </div>
                    次/分
                  </div>
                  <div class="inline_block" style="flex: 1;">
                    R：
                    <div class="under_line" style="width: 50px; text-align: center">
                      {{
                        predialysis.breathing_rate
                          ? predialysis.breathing_rate
                          : "/"
                      }}
                    </div>
                    次/分
                  </div>
                  <div class="inline_block" style="flex: 1.3;">
                    BP：
                    <div class="under_line" style="width: 50px; text-align: center">
                      {{
                        predialysis.systolic_blood_pressure
                          ? predialysis.systolic_blood_pressure
                          : "/"
                      }}
                    </div>
                    /
                    <div class="under_line" style="width: 50px; text-align: center">
                      {{
                        predialysis.diastolic_blood_pressure
                          ? predialysis.diastolic_blood_pressure
                          : "/"
                      }}
                    </div>
                    mmHg
                  </div>
                </div>
              </td>
            </tr>

            <tr>
              <td colspan="2">
                <div style="line-height:30px;">
                  治疗方式:
                  <label-box :isChecked="prescription.mode == 'HD' ? true : false" showValue="HD"></label-box>&nbsp;
                  <label-box :isChecked="prescription.mode == 'HDF' ? true : false" showValue="HDF"></label-box>
                  (<label-box
                    :isChecked="prescription.mode == 'HDF' && prescription.displace_liqui_part == 1 ? true : false"
                    showValue="前稀释"></label-box>&nbsp;
                  <label-box
                    :isChecked="prescription.mode == 'HDF' && prescription.displace_liqui_part == 2 ? true : false"
                    showValue="后稀释,"></label-box>&nbsp;
                  <span>置换量: {{ prescription.displace_liqui_value ? prescription.displace_liqui_value : "/" }} ml</span>
                  )&nbsp;
                  <label-box :isChecked="prescription.mode == 'HF' ? true : false" showValue="HF"></label-box>
                  <label-box :isChecked="prescription.mode == 'UF' ? true : false" showValue="UF"></label-box>
                  <label-box :isChecked="prescription.mode == 'HD+HP' ? true : false" showValue="HD+HP"></label-box>
                </div>
              </td>
              <td style="line-height:30px;">
                治疗时间：
                {{ prescription.dialysis_duration_hour ? prescription.dialysis_duration_hour : "0" }}小时
                {{ prescription.dialysis_duration_minute ? prescription.dialysis_duration_minute : 0 }}分
              </td>
            </tr>

            <tr>
              <td colspan="3">
                <div style="display: flex;line-height:30px;">
                  <span>治疗抗凝:</span>
                  <label-box :isChecked="prescription.anticoagulant_name.indexOf('低分子肝素') != -1 ? true : false"
                    showValue="低分子肝素:"></label-box>&nbsp;
                  <span v-if="prescription.anticoagulant_name.indexOf('低分子肝素') != -1">
                    {{ prescription.anticoagulant_zongliang ? prescription.anticoagulant_zongliang : "0" }}
                  </span>U&nbsp;&nbsp;
                  <!-- <span v-if="prescription.anticoagulant !='普通肝素' && prescription.anticoagulant!='无肝素' && prescription.anticoagulant!='枸橼酸'">

                  </span>U &nbsp;&nbsp; -->
                  <label-box :isChecked="prescription.anticoagulant_name == '普通肝素' ? true : false"
                    showValue="普通肝素:"></label-box>&nbsp;
                  <div style="display: inline-block;">
                    首剂：
                    <span v-if="prescription.anticoagulant_name == '普通肝素'">
                      {{ prescription.anticoagulant_shouji ? prescription.anticoagulant_shouji : "0" }}
                    </span>mg &nbsp;&nbsp;
                    追加：
                    <span v-if="prescription.anticoagulant_name == '普通肝素'">
                      {{ prescription.anticoagulant_weichi ? prescription.anticoagulant_weichi : "0" }}
                    </span>mg/h &nbsp;&nbsp;
                    总量：
                    <span v-if="prescription.anticoagulant_name == '普通肝素'">
                      {{ prescription.anticoagulant_zongliang ? prescription.anticoagulant_zongliang : "0" }}
                    </span>mg
                  </div>
                  &nbsp;&nbsp;
                  <label-box :isChecked="prescription.anticoagulant_name == '无肝素' ? true : false"
                    showValue="无肝素"></label-box>&nbsp;&nbsp;
                  <label-box :isChecked="prescription.anticoagulant_name == '枸橼酸' ? true : false"
                    showValue="枸橼酸"></label-box>
                </div>
              </td>
            </tr>

            <tr>
              <td colspan="2">
                <div style="line-height:30px;">
                  <span v-if="org_id != 9779">处方脱水量: {{ prescription.prescription_water ?
                    prescription.prescription_water : "" }} L&nbsp;&nbsp;</span>
                  <span v-if="org_id == 9779">目标脱水量:{{ prescription.target_ultrafiltration ?
                    prescription.target_ultrafiltration : "" }} L&nbsp;&nbsp;</span>
                  <span>透析液流量: {{ prescription.dialysate_flow ? prescription.dialysate_flow : "" }}
                  </span>ml/h&nbsp;&nbsp;
                  <span>
                    透析(滤)器:
                    {{ prescription.dialysis_dialyszers ? prescription.dialysis_dialyszers : "" }} &nbsp;
                    {{ prescription.dialysis_strainer ? prescription.dialysis_strainer : "" }} &nbsp;
                    {{ prescription.dialysis_irrigation ? prescription.dialysis_irrigation :'' }} &nbsp;
                  </span>

                </div>
              </td>
              <td>
                医师签名:
                <span class="under-line" style="display: inline-block;width: 50%;"
                  v-if="setAdminUserES(prescription.creater) == ''">
                  {{ getAdminUser(prescription.creater) }}
                </span>
                <span class="under-line" style="display: inline-block;width: 50%;" v-else>
                  <img style="height:30px;" :src="setAdminUserES(prescription.creater)" alt srcset />
                </span>
              </td>
            </tr>

          </tbody>
        </table>
        <table border="1" class="table-box" style="border-collapse: collapse;width: 99%;">
          <tr>
            <td colspan="3" style="">
              透析液:钠:<span style="display: inline-block;width: 30px;">
                {{ prescription.sodium ? prescription.sodium : "" }} </span>mmol/L
              钙:
              <label-box :isChecked="prescription.calcium == 1.25 ? true : false"
                showValue="低钙(1.25mmol/L)"></label-box>
              <label-box :isChecked="prescription.calcium == 1.5 ? true : false"
                showValue="普通钙(1.50mmol/L)"></label-box>
              <label-box :isChecked="prescription.calcium == 1.75 ? true : false"
                showValue="高钙(1.75mmol/L)"></label-box>
            </td>
          </tr>

          <tr>
            <td colspan="3">
              <div style="display: inline-block;line-height: 30px;">
                血管通路:
                <label-box :isChecked="predialysis.blood_access_part_opera_name.indexOf('内瘘') != -1 ? true : false"
                  showValue="内瘘"></label-box>&nbsp;
                <label-box :isChecked="predialysis.blood_access_part_opera_name.indexOf('带隧道带绦纶套') != -1 ? true : false"
                  showValue="长期静脉导管"></label-box>&nbsp;
                <label-box :isChecked="predialysis.blood_access_part_opera_name.indexOf('无绦纶套') != -1 ? true : false"
                  showValue="临时(颈、股)静脉导管"></label-box>&nbsp;
                <label-box :isChecked="predialysis.blood_access_part_opera_name.indexOf('人造血管') != -1 ? true : false"
                  showValue="人造血管"></label-box>
              </div>&nbsp;&nbsp;
              <div style="display: inline-block;line-height: 30px;">
                穿刺者:
                <span v-if="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.puncture_nurse) == ''">
                  {{ getAdminUser(dialysisOrder == null ? 0 : dialysisOrder.puncture_nurse) }}
                </span>
                <img class="es-img" style="height:30px;"
                  :src="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.puncture_nurse)" alt="" srcset=""
                  v-else />
              </div>
            </td>
          </tr>
          <tr>
            <td colspan="3">
              <div style="display: flex;">
                <div style="flex: 1;">
                  内瘘穿刺方式:
                  <label-box :isChecked="predialysis.puncture_way.indexOf('绳梯') != -1 ? true : false"
                    showValue="绳梯"></label-box>
                  <label-box :isChecked="predialysis.puncture_way.indexOf('扣眼') != -1 ? true : false"
                    showValue="扣眼"></label-box>
                  <label-box :isChecked="predialysis.puncture_way.indexOf('区域') != -1 ? true : false"
                    showValue="区域"></label-box>
                </div>
                <div style="flex: 1;">
                  内瘘震颤和血管杂音:
                  <label-box :isChecked="predialysis.blood_access_noise == 1 ? true : false" showValue="存在"></label-box>
                  <label-box :isChecked="predialysis.blood_access_noise == 2 ? true : false" showValue="减弱"></label-box>
                  <label-box :isChecked="predialysis.blood_access_noise == 3 ? true : false"
                    showValue="不存在"></label-box>
                </div>
              </div>
            </td>
          </tr>
        </table>

        <table border="1" class="table-box" style="border-collapse: collapse;text-align: center;width: 99%;">
          <tbody>
            <tr>
              <td colspan="13" style="padding: 5px;">治疗过程记录</td>
            </tr>
            <tr>
              <td rowspan="2">时间</td>
              <td colspan="4">透析参数</td>
              <td colspan="5">生命体征</td>
              <td colspan="3">治疗中病情变化</td>
            </tr>
            <tr>
              <td>TMP<br />mmHg</td>
              <td>静脉压<br />mmHg</td>
              <td>血流量<br />ml/min</td>
              <td>脱水量<br />ml</td>
              <td v-if="org_id != 9779 && org_id != 0">超滤率<br />ml/h</td>
              <td v-if="org_id == 9779 || org_id == 0">T<br />℃</td>
              <td>HR<br />bpm</td>
              <td>R<br />bpm</td>
              <td>BP<br />mmHg</td>
              <td>SpO₂<br />%</td>
              <!-- <td>时间</td> -->
              <td width="200">记录</td>
              <td>签名</td>
            </tr>
            <tr v-for="(monitor, monindex) in monitors" :key="monindex">
              <td style="height: 30px;">{{ getTime(monitor.operate_time, "{h}:{i}") }}</td>
              <td>{{
                monitor.transmembrane_pressure ? monitor.transmembrane_pressure : "/"
              }}
              </td>
              <td>{{ monitor.venous_pressure ? monitor.venous_pressure : "/" }}</td>
              <td>{{ monitor.blood_flow_volume ? monitor.blood_flow_volume : "/" }}</td>
              <td>{{ monitor.ultrafiltration_volume ? monitor.ultrafiltration_volume : "/" }}</td>
              <td v-if="org_id != 9779 && org_id != 0">{{ monitor.ultrafiltration_rate ? monitor.ultrafiltration_rate :
                "/" }}</td>
              <td v-if="org_id == 9779 || org_id == 0">{{ monitor.temperature ? monitor.temperature : '/' }}</td>
              <td>{{ monitor.pulse_frequency ? monitor.pulse_frequency : "/" }}</td>
              <td>{{ monitor.breathing_rate ? monitor.breathing_rate : "/" }}</td>
              <td>{{
                monitor.systolic_blood_pressure
                  ? monitor.systolic_blood_pressure
                  : "/"
              }}/{{
                  monitor.diastolic_blood_pressure
                    ? monitor.diastolic_blood_pressure
                    : "/"
                }}
              </td>
              <td>{{ monitor.blood_oxygen_saturation ? monitor.blood_oxygen_saturation : "/" }}</td>
              <!-- <td></td> -->
              <td>
                {{ monitor.end }} {{ monitor.symptom }} &nbsp;
                {{ monitor.dispose }} &nbsp;{{ monitor.result }}
              </td>
              <td>
                <span style="display: inline-block;" v-if="setAdminUserES(monitor.monitoring_nurse) == ''">
                  {{ getAdminUser(monitor.monitoring_nurse) }}
                </span>
                <span style="display: inline-block;" v-else>
                  <img style="height:30px;" :src="setAdminUserES(monitor.monitoring_nurse)" alt srcset />
                </span>
              </td>
            </tr>
          </tbody>
        </table>
        <div>
          <table border="1" class="table-box" style="border-collapse: collapse;text-align: center;width: 99%;">
            <tbody>
              <tr>
                <td style="width:12%;height:25px;">
                  <p style="height:30px;line-height:30px">时间</p>
                </td>
                <td style="width:120px;height:25px">
                  <p style="height:30px;line-height:30px">医嘱执行记录</p>
                </td>
                <td style="width:10%;height:25px">
                  <p style="height:30px;line-height:30px">执行</p>
                </td>
                <td style="width:10%;height:25px">
                  <p style="height:30px;line-height:30px">核对</p>
                </td>
                <td style="width:15%;height:27px">
                  <p style="height:30px;line-height:30px">上次透后体重</p>
                </td>
                <td style="width:10%;line-height:30px">
                  {{ assessmentafter.weight_after ? assessmentafter.weight_after : "0" }}kg
                </td>
              </tr>

              <tr v-for="(advice, advice_index) in tableAdvice" :key="advice_index">
                <td style="height:30px;line-height:30px">{{ getTime(advice.start_time, "{y}-{m}-{d} {h}:{i}") }}</td>
                <td style="height:30px;line-height:30px">
                  <span v-if="advice.parent_id > 0">---></span>
                  <span>{{ advice.advice_name }}</span>
                  <span v-if="advice && advice.advice_desc">({{ advice.advice_desc }}{{ advice.drug_spec_unit }})</span>
                  <span v-if="advice.prescribing_number">&nbsp;&nbsp; {{ advice.prescribing_number }}{{
                    advice.prescribing_number_unit }}</span>
                  <span v-if="advice.single_dose != 0">{{ advice.single_dose }}{{ advice.single_dose_unit }}</span>
                  <span v-if="advice.parent_id == 0">{{ advice.delivery_way }}</span>
                  <span v-if="advice.parent_id == 0">{{ advice.execution_frequency }}</span>
                </td>
                <td style="height:30px;line-height:30px">
                  <span v-if="setAdminUserES(advice.execution_staff) == ''">{{ getAdminUser(advice.execution_staff)
                    }}</span>
                  <img style="height:40px;" :src="setAdminUserES(advice.execution_staff)" alt="" srcset="" v-else />
                </td>
                <td style="height:30px;line-height:30px">
                  <span v-if="setAdminUserES(advice.checker) == ''">{{ getAdminUser(advice.checker) }}</span>
                  <img style="height:40px;" :src="setAdminUserES(advice.checker)" alt="" srcset="" v-else />
                </td>
                <td v-if="advice_index === 0">透前体重:</td>
                <td v-if="advice_index === 0">{{ predialysis.weight_before }}kg</td>
                <td v-if="advice_index === 1">体重增加量:</td>
                <td v-if="advice_index === 1">{{ (predialysis.weight_before - assessmentafter.weight_after).toFixed(1)
                  }}kg</td>
                <td v-if="advice_index === 2">干体重(DW):</td>
                <td v-if="advice_index === 2">{{ predialysis.dry_weight }}kg</td>
                <td v-if="advice_index === 3">较干体重增加量:</td>
                <td v-if="advice_index === 3">
                  {{ patientInfo.total_dialysis + patientInfo.user_sys_before_count > 0 && afterdialysis.weight_after !=
                    0
                    ? (afterdialysis.weight_after - predialysis.dry_weight).toFixed(2) : 0 }}kg
                </td>
                <td v-if="advice_index === 4">净脱水量:</td>
                <td v-if="advice_index === 4">{{ afterdialysis.actual_ultrafiltration }}ml</td>
                <td v-if="advice_index === 5">透后体重:</td>
                <td v-if="advice_index === 5">{{ afterdialysis.weight_after }}kg</td>
                <td v-if="advice_index === 6">本次透析体重下降量:</td>
                <td v-if="advice_index === 6">
                  {{ afterdialysis.weight_after == 0 || predialysis.weight_before == 0 ? '0.00'
                    : (predialysis.weight_before - afterdialysis.weight_after).toFixed(2) }}kg</td>
              </tr>
            </tbody>
          </table>
        </div>
        <div style="border: 1px solid black;width: 99%;">
          <div class="row" style="padding: 2px 0; line-height: 23px; display: flex">
            <div class="inline_block" style="flex: 0.8">
              T：
              <div class="under_line" style="width: 50px; text-align: center">
                {{
                  afterdialysis.temperature
                    ? afterdialysis.temperature
                    : "/"
                }}
              </div>
              °C
            </div>
            <div class="inline_block" style="flex: 0.8">
              P：
              <div class="under_line" style="width: 50px; text-align: center">
                {{
                  afterdialysis.pulse_frequency
                    ? afterdialysis.pulse_frequency
                    : "/"
                }}
              </div>
              次/分
            </div>
            <div class="inline_block" style="flex: 1">
              R：
              <div class="under_line" style="width: 50px; text-align: center">
                {{
                  afterdialysis.breathing_rate
                    ? afterdialysis.breathing_rate
                    : "/"
                }}
              </div>
              次/分
            </div>
            <div class="inline_block" style="flex: 1.5">
              BP：
              <div class="under_line" style="width: 50px; text-align: center">
                {{
                  afterdialysis.systolic_blood_pressure
                    ? afterdialysis.systolic_blood_pressure
                    : "/"
                }}
              </div>
              /
              <div class="under_line" style="width: 50px; text-align: center">
                {{
                  afterdialysis.diastolic_blood_pressure
                    ? afterdialysis.diastolic_blood_pressure
                    : "/"
                }}
              </div>
              mmHg
            </div>
            <div class="inline_block" style="flex: 1.5">
              实际治疗时间：
              <div class="under_line" style="width: 30px; text-align: center">
                {{
                  afterdialysis.actual_treatment_hour
                    ? afterdialysis.actual_treatment_hour
                    : "/"
                }}
              </div>
              h
              <div class="under_line" style="width: 30px; text-align: center">
                {{
                  afterdialysis.actual_treatment_minute
                    ? afterdialysis.actual_treatment_minute
                    : 0
                }}
              </div>
              min
            </div>
          </div>

          <div class="row" style="padding: 2px 0; line-height: 23px; display: flex">
            <div class="inline_block" style="flex: 2.5">
              透析器凝血：
              <div class="under_line" style="
                            width: 170px;
                            text-align: center;
                            white-space: normal;
                          ">
                {{ afterdialysis.cruor ? afterdialysis.cruor : "/" }}
              </div>
            </div>
            <div class="inline_block" style="flex: 2">
              内瘘：
              <div class="under_line" style="
                            width: 170px;
                            text-align: center;
                            white-space: normal;
                          ">
                {{
                  afterdialysis.internal_fistula
                    ? afterdialysis.internal_fistula
                    : "/"
                }}
              </div>
            </div>
            <div class="inline_block" style="flex: 2">
              导管：
              <div class="under_line" style="min-width: 120px; text-align: center">
                {{
                  afterdialysis.catheter ? afterdialysis.catheter : "/"
                }}
              </div>
            </div>
          </div>

          <div class="row" style="padding: 2px 0; line-height: 23px; display: flex">
            <div class="inline_block" style="flex: 1">
              透后体重：
              <div class="under_line" style="width: 70px; text-align: center">
                <span>
                  {{
                    afterdialysis.weight_after
                      ? parseFloat(
                        afterdialysis.weight_after -
                        afterdialysis.additional_weight
                      ).toFixed(1)
                      : "/"
                  }}
                </span>
              </div>
              kg
            </div>

            <div class="inline_block" style="flex: 1">
              体重减少：
              <div class="under_line" style="width: 70px; text-align: center">

                <span
                  v-if="predialysis && predialysis.weight_before > 0 && afterdialysis && afterdialysis.weight_after > 0">
                  {{ (predialysis.weight_before - afterdialysis.weight_after).toFixed(2) }}
                </span>

              </div>
              kg
            </div>

            <div class="inline_block" style="flex: 1">
              <span>
                透析中入量(L)：
              </span>

              <div class="under_line" style="width: 70px; text-align: center">
                {{
                  afterdialysis.dialysis_intakes
                    ? afterdialysis.dialysis_intakes
                    : "/"
                }}
              </div>

              {{ getUnit(afterdialysis.dialysis_intakes_unit) }}
            </div>

            <div class="inline_block" style="flex: 1">
              实际超滤量：
              <div class="under_line" style="width: 70px; text-align: center">
                {{
                  afterdialysis.actual_ultrafiltration
                    ? afterdialysis.actual_ultrafiltration
                    : "/"
                }}
              </div>
              <span> ml</span>

            </div>
          </div>
          <div class="row">
            治疗小结
            <span class="under-line">&nbsp;{{ summary.dialysis_summary }}</span>
          </div>
          <div class="row" style="padding: 2px 0; line-height: 23px; display: flex">
            <div class="inline_block" style="flex: 1; display: inline-block">
              宣教知识：
              <div class="under_line" style="
                            width: 80%;
                            line-height: 25px;
                            text-align: left;
                            margin-left: 2px;
                            display: inline-block;
                            white-space: normal;
                          ">
                {{
                  summary.mission
                    ? summary.mission
                    : "/"
                }}
              </div>
            </div>
          </div>
          <div class="row" style="padding: 2px 0; line-height: 23px; display: flex">
            <div class="inline_block" style="flex: 1; display: inline-block">
              备注：
              <div class="under_line" style="
                            width: 80%;
                            line-height: 25px;
                            text-align: left;
                            margin-left: 2px;
                            display: inline-block;
                            white-space: normal;
                          ">
                {{ afterdialysis.remark ? afterdialysis.remark : "/" }}
              </div>
            </div>
          </div>
          <div style="display: flex;">
            <div style="flex: 1;text-align: right;margin-right: 20px;">
              <div style="display: inline-block;margin-right: 20px;">
                <span style="display: inline-block;">医生签名:</span>
                <span style="display: inline-block;" v-if="setAdminUserES(prescription.creater) == ''">
                  {{ getAdminUser(prescription.creater) }}
                </span>
                <span style="display: inline-block;" v-else>
                  <img style="height:30px;" :src="setAdminUserES(prescription.creater)" alt srcset />
                </span>
              </div>
              <div style="display: inline-block;">
                <span>护士签名:</span>
                <!-- <div class="under-line" style="width: 50%;display: inline-block;"> -->
                <span v-if="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.start_nurse) == ''">
                  {{ getAdminUser(dialysisOrder == null ? 0 : dialysisOrder.start_nurse) }}
                </span>
                <img class="es-img" style="height: 30px"
                  :src="setAdminUserES(dialysisOrder == null ? 0 : dialysisOrder.start_nurse)" alt="" srcset=""
                  v-else />
                <!-- </div> -->
              </div>
            </div>
          </div>
        </div>
      </div>
    </div>
  </div>
</template>

<script>
import { getDialysisRecord } from "@/api/dialysis";
import { getDataConfig } from "@/utils/data";
import { jsGetAge, uParseTime } from "@/utils/tools";
import LabelBox from "../printItem/LabelBox";
import BreadCrumb from "@/xt_pages/components/bread-crumb";
// import DialysisPrintOrderOne from './template/dialysisPrintOrderOne'
// import DialysisPrintOrderTwo from './template/dialysisPrintOrderTwo'
import print from "print-js";

export default {
  name: "dialysisPrintOrderOne",
  components: {
    // DialysisPrintOrderOne,
    // DialysisPrintOrderTwo,
    LabelBox,
    BreadCrumb
  },
  data() {
    return {
      way_arr: [],
      consciousness_arr: [],
      appetite_arr: [],
      posture_arr: [],
      sick_condition_arr: [],
      precaution_arr: [],
      intake_arr: [],
      nutrition_arr: [],

      crumbs: [
        { path: false, name: "透析管理" },
        { path: false, name: "打印单" }
      ],
      operators: [],
      adminUser: [],
      check: {},
      dialysisOrder: {
        DeviceNumber: []
      },
      Order: {},
      operatorMaps: {},
      complications: [
        "低血压",
        "高血压",
        "心律失常",
        "头晕",
        "头痛",
        "呕吐",
        "抽搐",
        "出血",
        "心衰",
        "腹痛",
        "无"
      ],
      jilurow: 0,
      advice_jilurow: 0,
      loading: false,
      orgname: "",
      patientInfo_gender_1: false,
      patientInfo_gender_2: false,
      patientInfo_source_2: false,
      patientInfo_source_1: false,
      modeOptions: {},
      replacementWays: [],
      perfusionApparatus: [],
      anticoagulantsConfit: {},
      bloodAccessParOpera: {},
      dialysateFormulationOptions: {},

      queryParams: {
        xtdate: "",
        xtno: "",
        patient_id: 0,
      },
      patientInfo: {
        birth: "",
        age: "",
        DialysisSchedule: {
          device_number: { number: "" },
          device_zone: { name: "" }
        },
        gender: 0
      },
      predialysis: {
        score: "",
        internal_fistula: "",
        internal_fistula_skin: "",
        catheter: "",
        blood_access_part_opera_name: ""
      },
      afterdialysis: {
        complications_index: ""
      },
      prescription: {
        dialysate_formulation_name: "",
        device: {}
      },
      advices: [],
      users: [],
      monitors: [],
      summary: {},
      receiverTreatmentAccess: {},
      org_template_info: {},
      isShowZero: false,

      doctor_advices: [],
      advice_groups: [],

      AlPanel: {
        id: 0,
        name: "",
        type: 1,
        shouji: 2,
        weichi: 2,
        zongliang: 2,
        gaimingcheng: -1,
        gaijiliang: -1,
        shouji_unit: "mg",
        weichi_unit: "mg/h",
        zongliang_unit: "mg",
        gaimingcheng_unit: "",
        gaijiliang_unit: ""
      },
      total: "",
      doctorForm: {
        doctor: "",
        url: ""
      },
      dialysisDoctor: {
        doctor: "",
        url: ""
      },
      tableAdvice: [],
      assessmentafter: {},
      orderForm: {
        start_nurse: "",
        url: ""
      },
      finshForm: {
        finish_nurse: "",
        url: ""
      },
      displaceLiquiPartOptions: [],
      org_id: 0,
      year: '',
      months: '',
      day: '',
    };
  },
  methods: {
    checkData() {
      var checkDate = []
      if(this.predialysis.dialysis_count==''){
        const obj0 = "透析频次"
        checkDate.push(obj0)
      }if(this.predialysis.temperature == ""){
        const obj1='透前体温'
        checkDate.push(obj1)
      }if(this.predialysis.pulse_frequency == ""){
        const obj2_1='透前脉搏'
        checkDate.push(obj2_1)
      }if(this.predialysis.breathing_rate == ""){
        const obj3_1='透前呼吸频率'
        checkDate.push(obj3_1)
      }if(this.predialysis.systolic_blood_pressure == 0 ||
          this.predialysis.diastolic_blood_pressure == 0
      ){
        const obj4_1='透前血压未填完整'
        checkDate.push(obj4_1)
      }
      if (this.predialysis.symptom_before_dialysis_other == '' &&
        this.predialysis.symptom_before_dialysis == ''
      ) {
        const obj = "上机前病情"
        checkDate.push(obj)
      } if (this.prescription.mode == "") {
        const obj2 = "治疗方式"
        checkDate.push(obj2)
      } if (this.prescription.displace_liqui_value == "" &&
        (this.prescription.mode_id == 2 || this.prescription.mode_id == 5 || this.prescription.mode_id == 12)) {
        const obj3 = "置换量"
        checkDate.push(obj3)
      } if (this.afterdialysis.actual_treatment_hour == '' &&
        this.afterdialysis.actual_treatment_minute == ''
      ) {
        const obj4 = "治疗时间"
        checkDate.push(obj4)
      } if (this.prescription.anticoagulant == '') {
        const obj5 = "抗凝剂未填"
        checkDate.push(obj5)
      } if (this.prescription.anticoagulant_shouji == 0 && this.prescription.anticoagulant == '普通肝素') {
        const obj6 = "首剂"
        checkDate.push(obj6)
      } if (this.prescription.anticoagulant_weichi == 0 && this.prescription.anticoagulant == '普通肝素') {
        const obj7 = "维持"
        checkDate.push(obj7)
      } if (this.prescription.anticoagulant_zongliang == 0 && this.prescription.anticoagulant == '普通肝素') {
        const obj8 = "总量"
        checkDate.push(obj8)
      } if (this.prescription.prescription_water == 0) {
        const obj14 = "处方脱水量"
        checkDate.push(obj14)
      } if (this.prescription.dialysate_flow == '') {
        const obj16 = "透析液流量"
        checkDate.push(obj16)
      } if (this.prescription.creater == "") {
        const obj15 = "医生签名"
        checkDate.push(obj15)
      } if (this.predialysis.machine_type == '') {
        const obj19 = "透析机"
        checkDate.push(obj19)
      } if (
        this.prescription.dialysis_irrigation == '' &&
        this.prescription.dialysis_dialyszers == '' &&
        this.prescription.dialysis_strainer == ''
      ) {
        const obj18 = "透析(滤)器"
        checkDate.push(obj18)
      } if (this.prescription.calcium == 0) {
        const obj37 = "钙"
        checkDate.push(obj37)
      } if (this.prescription.sodium == 0) {
        const obj38 = "钠"
        checkDate.push(obj38)
      } if (this.predialysis.blood_access_part_opera_name == '') {
        const obj20 = "血管通路"
        checkDate.push(obj20)
      } if (this.dialysisOrder == null ||
        this.dialysisOrder.puncture_nurse == 0
      ) {
        const obj21 = "穿刺者"
        checkDate.push(obj21)
      } if(this.predialysis.puncture_way ==''){
        const obj21_1='穿刺方式'
        checkDate.push(obj21_1)
      }
      if(this.predialysis.blood_access_noise ==''){
        const obj22_1='内瘘震颤和血管杂音'
        checkDate.push(obj22_1)
      }
      if (this.summary.dialysis_summary == "") {
        const obj22 = "透析小结"
        checkDate.push(obj22)
      } if (this.assessmentafter.weight_after == 0) {
        const obj9 = "上次透后体重"
        checkDate.push(obj9)
      } if (this.predialysis.weight_before == 0) {
        const obj10 = "透前体重"
        checkDate.push(obj10)
      } if (this.predialysis.dry_weight == 0) {
        const obj11 = "干体重"
        checkDate.push(obj11)
      } if (this.afterdialysis.weight_after == 0) {
        const obj12 = "透后体重"
        checkDate.push(obj12)
      } if (this.afterdialysis.actual_ultrafiltration == 0) {
        const obj33 = "净脱水量"
        checkDate.push(obj33)
      } if (this.afterdialysis.temperature == 0) {
        const obj33_1 = '透后体温'
        checkDate.push(obj33_1)
      }if(this.afterdialysis.pulse_frequency == ""){
        const obj34='透后脉搏'
        checkDate.push(obj34)
      }if(this.afterdialysis.breathing_rate == ""){
        const obj35='透后呼吸频率'
        checkDate.push(obj35)
      }if(this.afterdialysis.systolic_blood_pressure == 0 ||
          this.afterdialysis.diastolic_blood_pressure == 0
      ){
        const obj36='透前血压未填完整'
        checkDate.push(obj36)
      }if (
        this.afterdialysis.actual_treatment_hour == 0 &&
        this.afterdialysis.actual_treatment_minute == 0
      ) {
        const obj37_1='实际治疗时间'
        checkDate.push(obj37_1)
      }if(this.afterdialysis.cruor == ""){
        const obj38_1='透析器凝血'
        checkDate.push(obj38_1)
      }if (this.afterdialysis.internal_fistula == ""&&this.afterdialysis.catheter == "") {
        const obj39='透后内瘘,导管'
        checkDate.push(obj39)
      }if (this.afterdialysis.weight_after == 0) {
        const obj40='透后体重'
        checkDate.push(obj40)
      }if (this.afterdialysis.weight_loss == 0) {
        const obj41='透后体重减少'
        checkDate.push(obj41)
      }if (this.afterdialysis.dialysis_intakes == 0) {
        const obj42='透析中入量'
        checkDate.push(obj42)
      }if (this.afterdialysis.actual_ultrafiltration == 0) {
        const obj42='实际超滤量'
        checkDate.push(obj42)
      }if(this.summary.mission ==''){
        const obj44='宣教知识'
        checkDate.push(obj44)
      }if(this.afterdialysis.remark ==''){
        const obj45='备注'
        checkDate.push(obj45)
      }
      
      if (
        this.dialysisOrder == null ||
        this.dialysisOrder.start_nurse == 0
      ) {
        const obj23 = "护士签名"
        checkDate.push(obj23)
      } if (this.tableAdvice.length > 0) {
        this.tableAdvice.map(item => {
          if (item.id > 0 && (item.created_time || item.start_time)) {
            if (item.execution_staff == 0 || item.checker == 0) {
              const obj24 = '执行,核对'
              checkDate.push(obj24)
            }
          }
        })
      }
      this.getcheckData(checkDate)
    },
    getDisplaceLiquiPart: function (val) {
      let displace_liqui_part_name = "/";
      const displace_liqui_part = this.displaceLiquiPartOptions;
      for (let i = 0; i < displace_liqui_part.length; i++) {
        if (displace_liqui_part[i].id == val) {
          displace_liqui_part_name = displace_liqui_part[i].name;
        }
      }
      return displace_liqui_part_name;
    },
    getAdminUser(id) {
      if (id == 0) {
        return "";
      }
      if (id == undefined) {
        return "";
      }
      for (let i = 0; i < this.adminUser.length; i++) {
        if (this.adminUser[i].id == id) {
          return this.adminUser[i].name;
        }
      }
    },
    getTime(value, temp) {
      if (value == 0) {
        return "";
      }
      if (value != undefined) {
        return uParseTime(value, temp);
      }
      return "";
    },
    printThisPage() {
      var ptime = Math.round(new Date().getTime() / 1000);
      this.print_time = uParseTime(ptime, "{y}-{m}-{d} {h}:{i}");

      const style =
        '@media print {.dialysis-print-order{width:960px;margin:0 auto}.dialysis-print-order .order-yy-name{margin:auto;text-align:center;font-size:20px;letter-spacing:5px}.dialysis-print-order .order-title{margin:auto;font-weight:600;text-align:center;font-size:22px;padding:10px 20px 20px 20px}.dialysis-print-order .table-box{width:100%;line-height:23px;font-size:14px}.dialysis-print-order .print-table{width:100%;text-align:center;border-collapse:collapse;line-height:25px;font-size:14px}.dialysis-print-order .print-table-no{width:100%;text-align:center;border-collapse:collapse;font-size:14px}.dialysis-print-order .under-line{border-bottom:1px solid #999;width:95%;text-align:center;margin-left:2px}.dialysis-print-order .title-box{text-align:center;font-size:16px;border:1px solid #666}.dialysis-print-order .radio-lebel-box{font-weight:400;cursor:pointer}.dialysis-print-order .radio-no{opacity:0;outline:0;position:absolute;margin:0;width:0;height:0;z-index:-1}.dialysis-print-order .radio-inner{white-space:nowrap;cursor:pointer;outline:0;display:inline-block;line-height:1;position:relative;vertical-align:middle}.dialysis-print-order .radio-fang{display:inline-block;position:relative;border:1px solid #000;box-sizing:border-box;width:14px;height:14px;background-color:#fff;z-index:1;transition:border-color .25s cubic-bezier(.71,-.46,.29,1.46),background-color .25s cubic-bezier(.71,-.46,.29,1.46)}.dialysis-print-order .is-checked-radio::after{content:"√";font-size:15px}}.dialysis-print-order .print-table-no tr td { padding: 8px 5px; line-height: 25px; }.es-img{height: 20px; }.advice-name{text-align: left;}.advice-children{display:flex;} .dialysis-print-order .print-table tr td{padding: 0px 0px;} .print-template-two tr {line-height: 30px;}   .title-box-pro{border: 0 #fff;line-height: 40px;height: 40px;text-align: left;padding-left: 10px !important;}  .text-align-left{text-align: left !important;padding-left:10px !important;font-size: 14px !important;line-height: 25px;}';

      if (this.org_template_info.template_id == 1) {
        printJS({
          printable: "dialysis-print-box",
          type: "html",
          style: style,
          scanStyles: false
        });
      } else if (
        this.org_template_info.template_id == 2 ||
        this.org_template_info.template_id == 0
      ) {
        printJS({
          printable: "dialysis-print-box-1",
          type: "html",
          style: style,
          scanStyles: false
        });
      }
    },
    getNumber() {
      if (this.dialysisOrder != null) {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.dialysisOrder.DeviceNumber.number
        );
      } else {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.patientInfo.DialysisSchedule.device_number.number
        );
      }
    },

    getXuserName(id) {
      if (id <= 0) {
        return "";
      }
      var name = "";
      if (this.users == null || typeof this.users.length === "undefined") {
        return name;
      }
      var leng = this.users.length;
      if (leng == 0) {
        return name;
      }
      for (let index = 0; index < leng; index++) {
        if (this.users[index].id == id) {
          name = this.users[index].name;
          break;
        }
      }
      return name;
    },
    setAdminUserES(id) {
      if (id == 0) {
        return "";
      }
      if (id in this.operatorMaps) {
        return this.operatorMaps[id].url;
      } else {
        return "";
      }
    },
    modeName(mode_id) {
      return typeof this.modeOptions[mode_id] !== "undefined" &&
        typeof this.modeOptions[mode_id].name !== "undefined"
        ? this.modeOptions[mode_id].name
        : "";
    },
    // 数据源
    getDialysisRecord() {
      this.loading = true;
      this.queryParams.patient_id = parseInt(this.$route.query.patient_id)
      getDialysisRecord(this.queryParams).then(response => {
        if (response.data.state === 1) {
          this.total = response.data.data.total;

          this.adminUser = response.data.data.users;
          this.users = response.data.data.users;
          var patientInfo = response.data.data.patientInfo;
          if (patientInfo.gender === 1) {
            patientInfo.gender = "男";
          }
          if (patientInfo.gender === 2) {
            patientInfo.gender = "女";
          }
          console.log("response.data.data", response.data.data);
          this.patientInfo = patientInfo;
          this.patientInfo.birth = uParseTime(
            this.patientInfo.birthday,
            "{y}-{m}-{d}"
          );
          // this.patientInfo.age = jsGetAge(this.patientInfo.birth, '-')
          if (response.data.data.patientInfo.first_dialysis_date != 0) {
            this.patientInfo.first_dialysis_date = uParseTime(
              response.data.data.patientInfo.first_dialysis_date,
              "{y}-{m}-{d}"
            );
          } else {
            this.patientInfo.first_dialysis_date = "";
          }
          this.check = response.data.data.check;
          console.log("核对信息", this.check);
          this.predialysis = response.data.data.PredialysisEvaluation;
          console.log("透前评估", this.predialysis);
          this.predialysis.blood_access_part_opera_name = this.bloodAccessParOperaName(
            this.predialysis.blood_access_part_opera_id
          );
          this.assessmentafter = response.data.data.assessmentAfterDislysis;
          console.log("上次透后体重", this.assessmentafter);
          var doctorAdevieInfo = response.data.data.doctorAdevieInfo;
          var tableAdvice = doctorAdevieInfo;

          if (tableAdvice.length === 0) {
            var obj = { advice_name: "", start_time: "" };
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            var obj4 = { advice_name: "", start_time: "" };
            var obj5 = { advice_name: "", start_time: "" };
            var obj6 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            tableAdvice.push(obj4);
            tableAdvice.push(obj5);
            tableAdvice.push(obj6);
            this.tableAdvice = tableAdvice;
          }
          if (tableAdvice.length === 1) {
            var obj = { advice_name: "", start_time: "" };
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            var obj4 = { advice_name: "", start_time: "" };
            var obj5 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            tableAdvice.push(obj4);
            tableAdvice.push(obj5);
            this.tableAdvice = tableAdvice;
          }
          if (tableAdvice.length === 2) {
            var obj = { advice_name: "", start_time: "" };
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            var obj4 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            tableAdvice.push(obj4);
            this.tableAdvice = tableAdvice;
          }
          if (tableAdvice.length === 3) {
            // eslint-disable-next-line no-redeclare
            var obj = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj1 = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            this.tableAdvice = tableAdvice;
          }
          if (tableAdvice.length === 4) {
            // eslint-disable-next-line no-redeclare
            var obj = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj1 = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj2 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            this.tableAdvice = tableAdvice;
          }
          if (tableAdvice.length === 5) {
            // eslint-disable-next-line no-redeclare
            var obj = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            this.tableAdvice = tableAdvice;
          }

          if (tableAdvice.length >= 6) {
            var obj = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            this.tableAdvice = tableAdvice;
          }
          this.afterdialysis = response.data.data.AssessmentAfterDislysis;
          console.log("透后评估", this.afterdialysis);
          this.operators = response.data.data.operators;
          this.dialysisOrder =
            response.data.data.dialysisOrder === null
              ? null
              : response.data.data.dialysisOrder;

          if (this.operators.length > 0) {
            var operatorsLen = this.operators.length;
            for (var index = 0; index < operatorsLen; index++) {
              this.$set(
                this.operatorMaps,
                this.operators[index].creator,
                this.operators[index]
              );
            }
          }

          this.afterdialysis.txqnx = -1;
          if (this.afterdialysis.cruor.indexOf("0度") > -1) {
            this.afterdialysis.txqnx = 0;
          }
          if (this.afterdialysis.cruor.indexOf("Ⅰ度") > -1) {
            this.afterdialysis.txqnx = 1;
          }
          if (this.afterdialysis.cruor.indexOf("Ⅱ度") > -1) {
            this.afterdialysis.txqnx = 2;
          }
          if (this.afterdialysis.cruor.indexOf("Ⅲ度") > -1) {
            this.afterdialysis.txqnx = 3;
          }

          this.afterdialysis.complications = this.afterdialysis.complication.split(
            ","
          );
          this.afterdialysis.complications_other = [];
          this.afterdialysis.complications_index = [];
          var acllen = this.afterdialysis.complications.length;
          for (let index = 0; index < acllen; index++) {
            if (
              this.complications.indexOf(
                this.afterdialysis.complications[index]
              ) >= 0
            ) {
              this.afterdialysis.complications_index.push(
                this.afterdialysis.complications[index]
              );
            } else if (
              this.complications.indexOf(
                this.afterdialysis.complications[index]
              ) < 0 &&
              this.afterdialysis.complications_other.indexOf(
                this.afterdialysis.complications[index]
              ) < 0
            ) {
              this.afterdialysis.complications_other.push(
                this.afterdialysis.complications[index]
              );
            }
          }
          this.afterdialysis.complications_other = this.afterdialysis.complications_other.join(
            ","
          );
          var doctorname = response.data.data.DoctorName;
          //console.log("医师签名", doctorname);
          this.doctorForm.doctor = doctorname.user_name;
          this.doctorForm.url = doctorname.url;
          var prescription = response.data.data.dialysisPrescription;
          console.log("透析处方", prescription);
          if (prescription.blood_access === 1) {
            prescription.blood_access = "正常";
          }
          if (prescription.blood_access === 2) {
            prescription.blood_access = "震颤";
          }
          if (prescription.blood_access === 3) {
            prescription.blood_access = "堵塞";
          }
          if (prescription.blood_access === 4) {
            prescription.blood_access = "血肿";
          }
          if (prescription.blood_access === 5) {
            prescription.blood_access = "淤血";
          }
          if (prescription.blood_access === 6) {
            prescription.blood_access = "感染";
          }
          if (prescription.blood_access === 7) {
            prescription.blood_access = "自体内瘘";
          }
          if (prescription.blood_access === 8) {
            prescription.blood_access = "人工血管内瘘";
          }
          if (prescription.replacement_way === 1) {
            prescription.replacement_way = "前置换";
          }
          if (prescription.replacement_way === 2) {
            prescription.replacement_way = "后置换";
          }
          if (prescription.replacement_way === 3) {
            prescription.replacement_way = "中置换";
          }
          if (prescription.replacement_way === 4) {
            prescription.replacement_way = "混合置换";
          }
          this.prescription = prescription;
          var receiverTreatmentAccess =
            response.data.data.receiverTreatmentAccess;
          if (receiverTreatmentAccess.sick_condition === 1) {
            receiverTreatmentAccess.sick_condition = "一般";
          }
          if (receiverTreatmentAccess.sick_condition === 2) {
            receiverTreatmentAccess.sick_condition = "严重";
          }
          if (receiverTreatmentAccess.sick_condition === 3) {
            receiverTreatmentAccess.sick_condition = "危";
          }
          if (receiverTreatmentAccess.way === 1) {
            receiverTreatmentAccess.way = "步行";
          }
          if (receiverTreatmentAccess.way === 2) {
            receiverTreatmentAccess.way = "扶行";
          }
          if (receiverTreatmentAccess.way === 3) {
            receiverTreatmentAccess.way = "轮椅";
          }
          if (receiverTreatmentAccess.way === 4) {
            receiverTreatmentAccess.way = "平车";
          }
          console.log("接诊评估:", receiverTreatmentAccess);
          this.receiverTreatmentAccess = receiverTreatmentAccess;
          this.prescription.mode = this.modeName(this.prescription.mode_id);
          var rwLen = this.replacementWays.length;
          this.prescription.replacement = "";
          for (let index = 0; index < rwLen; index++) {
            if (
              this.replacementWays[index].id ==
              this.prescription.replacement_way
            ) {
              this.prescription.replacement = this.replacementWays[index].name;
              break;
            }
          }

          this.prescription.dialysate_formulation_name = this.dialysateFormulationName(
            this.prescription.dialysate_formulation
          );

          var paLen = this.perfusionApparatus.length;
          this.prescription.perfusion_apparatus_name = "";
          for (let index = 0; index < paLen; index++) {
            if (
              this.perfusionApparatus[index].id ==
              this.prescription.perfusion_apparatus
            ) {
              this.prescription.perfusion_apparatus_name = this.perfusionApparatus[
                index
              ].name;
              break;
            }
          }

          var acLen = this.anticoagulantsConfit.length;
          var thisALID = this.prescription.anticoagulant;
          this.prescription.anticoagulant_name = "";

          if (
            typeof this.anticoagulantsConfit[thisALID] !== "undefined" &&
            this.anticoagulantsConfit[thisALID] != null
          ) {
            this.prescription.anticoagulant_name = this.anticoagulantsConfit[
              thisALID
            ].name;
            this.AlPanel = this.anticoagulantsConfit[thisALID];
          }

          this.advices = response.data.data.advices;
          this.monitors = response.data.data.monitors;
          console.log("透析监测", this.monitors);
          this.summary = response.data.data.summary;
          this.Order = response.data.data.order;

          var start_nurse = response.data.data.startNuse;
          // console.log('上机护士', start_nurse)
          this.orderForm.start_nurse = start_nurse.user_name;
          this.orderForm.url = start_nurse.url;
          var finish_nurse = response.data.data.FinishNuse;
          // console.log('下机护士', finish_nurse)
          this.finshForm.url = finish_nurse.url;
          this.finshForm.finish_nurse = finish_nurse.user_name;
          var dialysisdoctor = response.data.data.dialysisdocotr;
          //this.dialysisDoctor.doctor = dialysisdoctor.user_name;
          // this.dialysisDoctor.url = dialysisdoctor.url;
          this.org_template_info = response.data.data.org_template_info;
          // 配置超滤量和置换量是否要显示0还是空
          if (this.org_template_info.org_id == 9535) {
            this.isShowZero = true;
          }
          if (this.monitors.length < 7) {
            var nl = 8 - this.monitors.length;
            for (let index = 0; index < nl; index++) {
              this.monitors.push([]);
            }
          }
          this.jilurow = this.monitors.length + 1;

          this.advice_jilurow = this.advices.length + 1;

          var childMap = {};
          for (const index in this.advices) {
            if (this.advices[index].parent_id == 0) {
              continue;
            }
            if (!(this.advices[index].parent_id in childMap)) {
              childMap[this.advices[index].parent_id] = [];
            }
            childMap[this.advices[index].parent_id].push(this.advices[index]);
          }

          var advices = [];
          for (const index in this.advices) {
            if (this.advices[index].parent_id > 0) {
              continue;
            }
            var item = this.advices[index];
            if (item.id in childMap) {
              item.children = childMap[item.id];
            } else {
              item.children = [];
            }
            advices.push(item);
          }

          var leftAdvice = [];
          var rightAdvice = [];
          var adlen = advices.length;

          var halfLen = adlen % 2 == 0 ? adlen / 2 : (adlen + 1) / 2;
          for (var i = 0; i < halfLen; i++) {
            leftAdvice.push(advices[i]);
            rightAdvice.push(advices[i + halfLen]);
          }
          if (halfLen < 5) {
            var nl = 5 - leftAdvice.length;
            for (let index = 0; index < nl; index++) {
              leftAdvice.push([]);
            }
            var nl = 5 - rightAdvice.length;
            for (let index = 0; index < nl; index++) {
              rightAdvice.push([]);
            }
          }

          this.advices = [];
          for (var i = 0; i < halfLen; i++) {
            var item = [];
            item.push(leftAdvice[i]);
            item.push(rightAdvice[i]);
            this.advices.push(item);
          }
          this.loading = false;

          this.doctor_advices =
            response.data.data.advices == null
              ? []
              : response.data.data.advices;

          for (let index = 0; index < this.doctor_advices.length; index++) {
            this.doctor_advices[index]["isShow"] = 2;
          }

          if (this.doctor_advices.length > 0) {
            var group = this.newAdviceGroupObject();
            var initGroupBlock = function (group, advice) {
              group.group_no = advice.groupno;
            };
            for (
              let index = this.doctor_advices.length - 1;
              index >= 0;
              index--
            ) {
              var new_advice_index = 0;

              if (
                "children" in this.doctor_advices[index] &&
                this.doctor_advices[index].children.length > 0
              ) {
                new_advice_index =
                  index + this.doctor_advices[index].children.length + 1;

                var doctor_advice = {
                  delivery_way: this.doctor_advices[index].delivery_way,
                  execution_frequency: this.doctor_advices[index]
                    .execution_frequency,
                  groupno: this.doctor_advices[index].groupno,
                  id: this.doctor_advices[index].id,
                  parent_id: this.doctor_advices[index].parent_id,
                  children: this.doctor_advices[index].children,
                  remark: this.doctor_advices[index].remark
                };
                doctor_advice["isShow"] = 1;
                this.doctor_advices.splice(new_advice_index, 0, doctor_advice);
                // this.doctor_advices.push(doctor_advice)
              }
            }

            for (let index = 0; index < this.doctor_advices.length; index++) {
              const advice = this.doctor_advices[index];
              if (advice.groupno == 0) {
                // 老版本的医嘱没有分组的概念，所以这一个 if 是解决这个问题的，将每个无分组的医嘱各自归为一组
                if (advice.parent_id > 0) {
                  if (this.advice_groups.length > 0) {
                    var parent_group = this.advice_groups[
                      this.advice_groups.length - 1
                    ];
                    if (parent_group.advices.length > 0) {
                      if (parent_group.advices[0].id == advice.parent_id) {
                        parent_group.advices.push(advice);
                      }
                    }
                  }
                  continue;
                } else {
                  if (group.group_no > 0) {
                    this.advice_groups.push(group);
                    group = this.newAdviceGroupObject();
                  }

                  initGroupBlock(group, advice);
                  group.advices.push(advice);
                  this.advice_groups.push(group);
                  group = this.newAdviceGroupObject();
                  continue;
                }
              }

              if (group.group_no > 0 && group.group_no != advice.groupno) {
                this.advice_groups.push(group);
                group = this.newAdviceGroupObject();
              }
              if (group.group_no == 0) {
                initGroupBlock(group, advice);
              }
              if (group.group_no == advice.groupno) {
                group.advices.push(advice);
              }
            }
            if (group.group_no > 0) {
              // 上述的算法会导致最后一组没有加到advice_groups，这里要手动加上
              this.advice_groups.push(group);
            }
          }
          console.log(this.advice_groups);
        } else {
          this.loading = false;
          this.$message.error("请求数据失败");
          return false;
        }
      });
    },
    bloodAccessParOperaName(id) {
      if (id in this.bloodAccessParOpera) {
        return this.bloodAccessParOpera[id].name;
      }
      return "";
    },
    dialysateFormulationName(id) {
      if (id in this.dialysateFormulationOptions) {
        return this.dialysateFormulationOptions[id].name;
      }
      return "";
    },
    getAge: function (val) {
      if (
        this.org_template_info.template_id == 2 ||
        this.org_template_info.template_id == 0
      ) {
        if (val.age == 0) {
          return jsGetAge(val.birth, "-");
        } else {
          return val.age;
        }
      } else {
        return this.getoldAge();
      }
    },
    checkIdCardNo(val) {
      var thisLen = val.length;
      var birth = "";
      if (thisLen == 15) {
        birth = "19" + val.substr(6, 6);
      } else {
        birth = val.substr(6, 8);
      }
      var birthTwo =
        birth.substr(0, 4) +
        "-" +
        birth.substr(4, 2) +
        "-" +
        birth.substr(6, 2);

      var age = jsGetAge(birthTwo, "-");
      return age;
    },
    newAdviceGroupObject: function () {
      return Object.assign(
        {},
        {
          group_no: 0,
          // advice_doctor: 0,
          // start_time: 0,
          advices: []
          // exec_staff: 0,
          // exec_time: 0,
          // checker: 0,
        }
      );
    },
    getcheckData(val) {
      if (val.length > 0) {
        let message = `记录单未填数据:<br/>&nbsp;${val.join("<br/>&nbsp;")}`;
        this.$alert(message, '提示', {
          confirmButtonText: '确定',
          type: 'warning',
          dangerouslyUseHTMLString: true,

        });
      } else {
        this.$message.success('核对完成')
      }
    },
    getanticoagulation(val) {
      const option = this.anticoagulantsConfit
      if (val != '') {
        for (let i in option) {
          if (option[i].id == val) {
            return option[i].name
          }
        }
      }
    },
    // 获取当前年份，用于年龄计算
    getoldAge() {
      let date = new Date();
      let year = date.getFullYear();
      let year_d =
        this.xtdate.split("-")[0] - this.patientInfo.birth.split("-")[0];
      let year_m = this.xtdate.split("-")[1];
      let birth_m = this.patientInfo.birth.split("-")[1];
      let year_date = this.xtdate.split("-")[2];
      let birth_date = this.patientInfo.birth.split("-")[2];
      // console.log(year,'今年年月')
      // console.log(this.xtdate.split('-'),'病人就诊年月')
      console.log(this.patientInfo.birth, "病人生日");
      // console.log(year_d,'year_d')
      if (year_m < birth_m) {
        return year_d - 1;
      } else if (year_m == birth_m) {
        if (year_date < birth_date) {
          return year_d - 1;
        } else {
          return year_d;
        }
      } else {
        return year_d;
      }
    },
    getUnit: function (val) {
      switch (val) {
        case 1:
          return "g";
          break;
        case 2:
          return "ml";
          break;
      }
    },
  },
  watch: {
    "patientInfo.gender": function () {
      if (this.patientInfo.gender == 1) {
        this.patientInfo_gender_1 = true;
        this.patientInfo_gender_2 = false;
      } else if (this.patientInfo.gender == 2) {
        this.patientInfo_gender_2 = true;
        this.patientInfo_gender_1 = false;
      } else {
        this.patientInfo_gender_2 = false;
        this.patientInfo_gender_1 = false;
      }
    },
    "patientInfo.source": function () {
      if (this.patientInfo.source == 1) {
        this.patientInfo_source_1 = true;
        this.patientInfo_source_2 = false;
      } else if (this.patientInfo.source == 2) {
        this.patientInfo_source_2 = true;
        this.patientInfo_source_1 = false;
      } else {
        this.patientInfo_source_2 = false;
        this.patientInfo_source_1 = false;
      }
    }
  },
  created() {
    var xtuser = this.$store.getters.xt_user;
    this.orgname = xtuser.org.org_name;
    // this.orgname = "遂溪方济医院";
    this.modeOptions = this.$store.getters.treatment_mode;
    this.replacementWays = this.$store.getters.replacement_ways;
    this.perfusionApparatus = this.$store.getters.perfusion_apparatus;
    this.anticoagulantsConfit = this.$store.getters.anticoagulants_confit;
    console.log('anticoagulantsConfit', this.anticoagulantsConfit);

    this.way_arr = getDataConfig("hemodialysis", "way");
    this.consciousness_arr = getDataConfig("hemodialysis", "consciousness");
    this.appetite_arr = getDataConfig("hemodialysis", "appetite");
    this.posture_arr = getDataConfig("hemodialysis", "posture");
    this.sick_condition_arr = getDataConfig("hemodialysis", "sick_condition");
    this.precaution_arr = getDataConfig("hemodialysis", "precaution");
    this.intake_arr = getDataConfig("hemodialysis", "intake");
    this.nutrition_arr = getDataConfig("hemodialysis", "nutrition");
    this.displaceLiquiPartOptions = this.$store.getters.displace_liqui;
    // this.bloodAccessParOpera = getDataConfig('hemodialysis', 'vascular_access_desc')
    this.org_id = this.$store.getters.xt_user.org.id;
    var bloodAccessParOpera = getDataConfig(
      "hemodialysis",
      "vascular_access_desc"
    );
    for (var key in bloodAccessParOpera) {
      this.bloodAccessParOpera[bloodAccessParOpera[key].id] =
        bloodAccessParOpera[key];
    }

    var dialysateFormulationOptions = getDataConfig(
      "hemodialysis",
      "dialysate_formulation"
    );
    for (var key in dialysateFormulationOptions) {
      this.dialysateFormulationOptions[dialysateFormulationOptions[key].id] =
        dialysateFormulationOptions[key];
    }

    const xtdate = this.$route.query && this.$route.query.xtdate;
    const xtno = this.$route.query && this.$route.query.xtno;
    if (
      typeof xtdate === "string" &&
      xtdate.length > 0 &&
      typeof xtno === "string" &&
      xtno.length > 0
    ) {
      this.queryParams.xtdate = xtdate;
      this.queryParams.xtno = xtno;
      this.getDialysisRecord();
      const arr = xtdate.split('-')
      this.year = arr[0]
      this.months = arr[1]
      this.day = arr[2]
    } else {
      this.$message.error("参数不齐");
      return false;
    }

  }
};
</script>

<style>
.row {
  font-size: 14px;
  line-height: 20px;
  padding: 5px 0;
}

.inline_block {
  display: inline-block;
}

.under_line {
  display: inline-block;
  border-bottom: 1px solid #999;
  text-align: center;
  white-space: nowrap;
  width: 50%;
}

.dialysis-print-order {
  width: 950px;
  margin: 0 auto;
}

.dialysis-print-order .order-yy-name {
  margin: auto;
  text-align: center;
  font-size: 20px;
  letter-spacing: 5px;
}

.dialysis-print-order .order-title {
  margin: auto;
  font-weight: 600;
  text-align: center;
  font-size: 22px;
  padding: 10px 20px 20px 20px;
}

.dialysis-print-order .table-box {
  width: 100%;
  line-height: 25px;
  font-size: 14px;

}


.dialysis-print-order .print-table {
  width: 100%;
  text-align: center;
  border-collapse: collapse;
  line-height: 40px;
  font-size: 14px;
}

.dialysis-print-order .print-table-no {
  width: 100%;
  text-align: center;
  border-collapse: collapse;
  font-size: 14px;
}

.dialysis-print-order .under-line {
  border-bottom: 1px solid #999;
  width: 95%;
  text-align: center;
  margin-left: 2px;
}

.dialysis-print-order .title-box {
  text-align: center;
  font-size: 16px;
}

.dialysis-print-order .radio-lebel-box {
  font-weight: 400;
  cursor: pointer;
}

.dialysis-print-order .radio-no {
  opacity: 0;
  outline: none;
  position: absolute;
  margin: 0;
  width: 0;
  height: 0;
  z-index: -1;
}

.dialysis-print-order .radio-inner {
  white-space: nowrap;
  cursor: pointer;
  outline: none;
  display: inline-block;
  line-height: 1;
  position: relative;
  vertical-align: middle;
}

.dialysis-print-order .radio-fang {
  display: inline-block;
  position: relative;
  border: 1px solid #000;
  box-sizing: border-box;
  width: 14px;
  height: 14px;
  background-color: #fff;
  z-index: 1;
  transition: border-color 0.25s cubic-bezier(0.71, -0.46, 0.29, 1.46),
    background-color 0.25s cubic-bezier(0.71, -0.46, 0.29, 1.46);
}

.dialysis-print-order .is-checked-radio::after {
  content: "√";
  font-size: 20px;
  font-weight: 200;
}

.dialysis-print-order .print-table-no tr td {
  padding: 8px 5px;
  line-height: 25px;
}

.dialysis-print-order .print-table tr td {
  padding: 1px 1px;
  /*line-height: 25px;*/
}

.table-box .ta_top td {
  padding-top: 10px !important;
}

.es-img {
  height: 25px;
}

.advice-name {
  text-align: left;
}

.advice-children {
  display: flex;
}

.title-box-pro {
  border: 0 #fff;
  line-height: 25px;
  height: 25px;
  text-align: left;
  padding-left: 10px !important;
}

.title-box-pro-tr {
  border: 0 #fff;
}

.text-align-left {
  text-align: left !important;
  padding-left: 10px !important;
  font-size: 14px !important;
  line-height: 25px;
}

.print-table-tr-new td {
  line-height: 20px !important;
}

.border-top-solid {
  border: solid 1px #000;
}

.print-template-two tr {
  line-height: 30px;
}
</style>
