<template>
  <div id="dialysis-print-box" style="position: relative">
    <div class="dialysis-print-order">
      <table class="print-table">
        <thead style="transform: translateY(2px)">
          <tr>
            <td>
              <div class="order-yy-name">{{ orgname }}</div>
              <div class="order-title">血液透析（滤过）记录表单医嘱单</div>
            </td>
          </tr>
          <tr>
            <td>
              <table class="print-table" border="1">
                <tr>
                  <td width="80" colspan="11" style="text-align: center">
                    治 疗 日 期:&nbsp;<span>{{ queryParams.xtdate }}</span>
                  </td>
                </tr>
                <tr>
                  <td colspan="11" style="padding-left: 10px">
                    <div class="list_table">
                      <div>姓 名:&nbsp;{{ patientInfo.name }}</div>
                      <div>
                        性别：{{ patientInfo_gender_1 == true ? "男" : "女" }}
                      </div>
                      <div>年龄：{{ getoldAge() }}</div>
                      <div>透析机号:&nbsp;{{ getNumber() }}</div>
                    </div>
                  </td>
                </tr>
              </table>
            </td>
          </tr>
        </thead>
        <tbody>
          <tr style="transform: translateY(3px)">
            <td>
              <table class="print-table" border="1">
                <tbody>
                  <tr class="list_table_1">
                    <td colspan="11" style="padding-left: 10px">
                      <div style="display: flex">
                        <div style="width: 250px">
                          病情评估:&nbsp;<span>{{
                            sick_condition ? sick_condition : ""
                          }}</span>
                        </div>
                        <div style="width: 250px">
                          入科方式:&nbsp;<span
                            v-for="(item, index) in way_arr"
                            :key="index"
                            class="under_line"
                            v-if="receiverTreatmentAccess.way == item.id"
                            style="width: 180px; text-align: left"
                            >{{ item.name }}
                          </span>
                        </div>
                        <div style="width: 250px">
                          透析次数:&nbsp;第<span>
                            {{
                              patientInfo.total_dialysis +
                              patientInfo.user_sys_before_count
                            }}次
                          </span>
                        </div>
                      </div>
                    </td>
                  </tr>
                  <tr class="list_table_1">
                    <td colspan="11" style="padding-left: 10px">
                      <div style="display: flex">
                        <div style="width: 100%">
                          病情描述:&nbsp;<span>{{
                            receiverTreatmentAccess.sick_condition_other
                              ? receiverTreatmentAccess.sick_condition_other
                              : ""
                          }}</span>
                        </div>
                      </div>
                    </td>
                  </tr>
                  <tr class="list_table_1">
                    <td
                      width="250"
                      style="border-right: none; padding-left: 10px"
                      colspan="2"
                    >
                      治疗方式:
                      <label-box
                        :isChecked="prescription.mode_id == 1 ? true : false"
                        showValue="HD"
                      >
                      </label-box>
                      <label-box
                        :isChecked="prescription.mode_id == 2 ? true : false"
                        showValue="HDF"
                      ></label-box>
                      (<label-box
                        :isChecked="
                          prescription.mode_id == 2 &&
                          prescription.displace_liqui_part == 1
                            ? true
                            : false
                        "
                        showValue="前稀释"
                      ></label-box>
                      <label-box
                        :isChecked="
                          prescription.mode_id == 2 &&
                          prescription.displace_liqui_part == 2
                            ? true
                            : false
                        "
                        showValue="后稀释"
                      ></label-box>
                      ， 置换量：&nbsp;{{
                        prescription.displace_liqui_value
                          ? prescription.displace_liqui_value
                          : "/"
                      }}L&nbsp; )

                      <label-box
                        :isChecked="prescription.mode_id > 2 ? true : false"
                        showValue="其他:"
                      ></label-box>
                      &nbsp;
                      <span v-if="prescription.mode_id > 2">
                        {{ prescription.mode }}
                      </span>
                    </td>
                    <td width="200" style="padding-left: 10px">
                      治疗时间：&nbsp;{{
                        afterdialysis.actual_treatment_hour
                          ? afterdialysis.actual_treatment_hour
                          : "0"
                      }}&nbsp;小时&nbsp;{{
                        afterdialysis.actual_treatment_minute
                          ? afterdialysis.actual_treatment_minute
                          : 0
                      }}&nbsp;分
                    </td>
                  </tr>
                  <tr v-if="org_id == 10249 || org_id == 0">
                    <td colspan="12" style="padding-left: 10px">
                      <div style="display: flex">
                        活动性出血：
                        <label-box
                          :isChecked="
                            predialysis.is_hemorrhage == 2 ? true : false
                          "
                          showValue="无"
                        ></label-box>
                        <label-box
                          :isChecked="
                            predialysis.is_hemorrhage == 1 ? true : false
                          "
                          showValue="有"
                        ></label-box>
                        （&nbsp;<label-box
                          :isChecked="
                            predialysis.is_hemorrhage == 1 &&
                            predialysis.hemorrhage.indexOf('穿刺点渗血') > -1
                              ? true
                              : false
                          "
                          showValue="穿刺点渗血"
                        ></label-box>
                        <label-box
                          :isChecked="
                            predialysis.is_hemorrhage == 1 &&
                            predialysis.hemorrhage.indexOf('牙龈出血') > -1
                              ? true
                              : false
                          "
                          showValue="牙龈出血"
                        ></label-box>
                        <label-box
                          :isChecked="
                            predialysis.is_hemorrhage == 1 &&
                            predialysis.hemorrhage.indexOf('消化道出血') > -1
                              ? true
                              : false
                          "
                          showValue="消化道出血"
                        ></label-box>
                        <label-box
                          :isChecked="
                            predialysis.is_hemorrhage == 1 &&
                            predialysis.hemorrhage.indexOf('女性经期') > -1
                              ? true
                              : false
                          "
                          showValue="女性经期"
                        ></label-box>

                        <div style="display: flex; padding-left: 20px">
                          <label-box
                            :isChecked="
                              predialysis.is_hemorrhage == 1 &&
                              predialysis.hemorrhage.indexOf('女性经期') ==
                                -1 &&
                              predialysis.hemorrhage.indexOf('消化道出血') ==
                                -1 &&
                              predialysis.hemorrhage.indexOf('牙龈出血') ==
                                -1 &&
                              predialysis.hemorrhage.indexOf('穿刺点渗血') == -1
                                ? true
                                : false
                            "
                            showValue="其他"
                          ></label-box>
                          <div
                            style="
                              min-width: 200px;
                              border-bottom: 1px solid #999;
                              height: 35px;
                              text-align: center;
                            "
                          >
                            <span v-if="predialysis.is_hemorrhage == 1">{{
                              predialysis.hemorrhage_other
                            }}</span>
                          </div>
                        </div>
                        &nbsp;）
                      </div>
                    </td>
                  </tr>
                  <tr class="list_table_1">
                    <td colspan="12" style="padding-left: 10px">
                      治疗抗凝:
                      <label-box
                        v-if="prescription.anticoagulant == 3"
                        :isChecked="
                          prescription.anticoagulant == 3 ? true : false
                        "
                        showValue="低分子肝素:"
                      ></label-box>
                      <label-box
                        v-if="prescription.anticoagulant == 6"
                        :isChecked="
                          prescription.anticoagulant == 6 ? true : false
                        "
                        showValue="低分子肝素钙:"
                      ></label-box>
                      <label-box
                        v-if="prescription.anticoagulant == 7"
                        :isChecked="
                          prescription.anticoagulant == 7 ? true : false
                        "
                        showValue="低分子肝素钠:"
                      ></label-box>

                      &nbsp;&nbsp;{{
                        prescription.anticoagulant_zongliang &&
                        (prescription.anticoagulant == 3 ||
                          prescription.anticoagulant == 6 ||
                          prescription.anticoagulant == 7)
                          ? prescription.anticoagulant_zongliang
                          : ""
                      }}iu；&nbsp;&nbsp;
                      <label-box
                        :isChecked="
                          prescription.anticoagulant == 2 ? true : false
                        "
                        showValue="普通肝素:"
                      ></label-box
                      >首剂 &nbsp;&nbsp;<span
                        ><span style="width: 35px; display: inline-block">
                          {{
                            prescription.anticoagulant_shouji &&
                            prescription.anticoagulant != 3 &&
                            prescription.anticoagulant == 2
                              ? prescription.anticoagulant_shouji
                              : ""
                          }}
                        </span></span
                      >
                      &nbsp;mg&nbsp;&nbsp;&nbsp; 追加&nbsp;&nbsp;<span>{{
                        prescription.anticoagulant_weichi &&
                        prescription.anticoagulant == 2
                          ? prescription.anticoagulant_weichi
                          : ""
                      }}</span
                      >&nbsp;&nbsp;mg/h&nbsp; 总量&nbsp;&nbsp;<span>{{
                        prescription.anticoagulant_zongliang &&
                        prescription.anticoagulant == 2
                          ? prescription.anticoagulant_zongliang
                          : ""
                      }}</span
                      >&nbsp;&nbsp;mg；
                      <label-box
                        :isChecked="
                          prescription.anticoagulant == 1 ? true : false
                        "
                        showValue="无肝素"
                      ></label-box
                      >&nbsp;&nbsp;
                      <label-box
                        :isChecked="
                          prescription.anticoagulant != 1 &&
                          prescription.anticoagulant != 2 &&
                          prescription.anticoagulant != 3 &&
                          prescription.anticoagulant != 6 &&
                          prescription.anticoagulant != 7 &&
                          prescription.anticoagulant != 0
                            ? true
                            : false
                        "
                        showValue="其他"
                      ></label-box>
                      <span style="padding-left: 10px">
                        <span
                          style="
                            display: inline-block;
                            min-width: 135px;
                            border-bottom: 1px solid #999;
                            height: 25px;
                            text-align: center;
                          "
                        >
                          <span
                            v-if="
                              prescription.anticoagulant != 1 &&
                              prescription.anticoagulant != 2 &&
                              prescription.anticoagulant != 3 &&
                              prescription.anticoagulant != 6 &&
                              prescription.anticoagulant != 7 &&
                              prescription.anticoagulant != 0
                            "
                            >{{ prescription.anticoagulant_name
                            }}{{
                              prescription.anticoagulant_zongliang &&
                              prescription.anticoagulant != 1 &&
                              prescription.anticoagulant != 2 &&
                              prescription.anticoagulant != 3 &&
                              prescription.anticoagulant != 6 &&
                              prescription.anticoagulant != 7 &&
                              prescription.anticoagulant != 0
                                ? prescription.anticoagulant_zongliang
                                : ""
                            }}iu；</span
                          >
                        </span>
                      </span>
                    </td>
                  </tr>
                  <tr class="list_table_1" style="line-height: 40px">
                    <td
                      width="100"
                      style="border-right: none; padding-left: 10px"
                      colspan="2"
                    >
                      处方脱水量:
                      <span style="display: inline-block; width: 40px">
                        {{
                          prescription.target_ultrafiltration
                            ? prescription.target_ultrafiltration
                            : ""
                        }}
                      </span>
                      ml; 透析液流量：
                      <span style="display: inline-block; width: 40px">
                        {{
                          prescription.dialysate_flow
                            ? prescription.dialysate_flow
                            : ""
                        }}
                      </span>
                      ml/h;
                    </td>
                    <td width="20" style="padding-left: 10px">
                      医师签名：
                      <span
                        style="height: 20px"
                        v-if="setAdminUserES(advices[0].advice_doctor) == ''"
                      >
                        {{ getAdminUser(advices[0].advice_doctor) }}
                      
                      </span>
                      <img
                        class="es-img"
                        style="height: 25px"
                        :src="setAdminUserES(advices[0].advice_doctor)"
                        alt
                        srcset
                        v-else
                      />
                    </td>
                  </tr>
                  <tr colspan="13" class="list_table_1">
                    <td colspan="13" style="padding-left: 10px">
                      <div class="td_div1" style="display: flex">
                        <div
                          style="
                            display: flex;
                            min-width: 150px;
                            border-right: 1px solid;
                          "
                        >
                          透析机：
                          <span v-if="dialysisOrder != null"
                            >{{
                              dialysisOrder &&
                              dialysisOrder.DeviceNumber &&
                              dialysisOrder.DeviceNumber.number.length > 0
                                ? dialysisOrder.DeviceNumber.number
                                : patientInfo.DialysisSchedule.device_number
                                    .number
                            }}
                          </span>
                        </div>
                        <div
                          style="
                            display: flex;
                            border-right: 1px solid;
                            padding: 0 10px;
                          "
                        >
                          透析（滤）器：{{
                            prescription.dialyzer_perfusion_apparatus
                              ? prescription.dialyzer_perfusion_apparatus
                              : ""
                          }}
                        </div>
                        <div style="padding-left: 10px">
                          透析液：钾：
                          <span style="width: 30px; display: inline-block">
                            {{
                              prescription.kalium ? prescription.kalium : ""
                            }} </span
                          >mmol/L&nbsp; 钙：
                          <span style="width: 30px; display: inline-block">
                            {{
                              prescription.calcium ? prescription.calcium : ""
                            }} </span
                          >mmol/L&nbsp; 碳酸氢盐：
                          <span style="width: 30px; display: inline-block">
                            {{
                              prescription.bicarbonate
                                ? prescription.bicarbonate
                                : ""
                            }} </span
                          >mmol/L
                        </div>
                      </div>
                    </td>
                  </tr>
                  <tr class="list_table_1">
                    <td colspan="11" style="padding-left: 10px">
                      <div style="display: flex; justify-content: flex-start">
                        <div style="width: 100%">
                          血管通路: &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '自体内瘘'
                              ) > -1
                                ? true
                                : false
                            "
                            showValue="自体内瘘"
                          ></label-box>
                          &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '人造血管'
                              ) > -1
                                ? true
                                : false
                            "
                            showValue="人造血管"
                          ></label-box>
                          &nbsp; &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '直穿'
                              ) > -1
                                ? true
                                : false
                            "
                            showValue="直穿"
                          ></label-box>
                          &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '颈内静脉'
                              ) > -1
                                ? true
                                : false
                            "
                            showValue="颈内静脉"
                          ></label-box>
                          &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '股静脉'
                              ) > -1
                                ? true
                                : false
                            "
                            showValue="股静脉"
                          ></label-box>
                          &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '锁骨下'
                              ) > -1
                                ? true
                                : false
                            "
                            showValue="锁骨下"
                          ></label-box>
                          &nbsp;
                          <label-box
                            :isChecked="
                              predialysis.blood_access_part_opera_name.indexOf(
                                '锁骨下'
                              ) == -1 &&
                              predialysis.blood_access_part_opera_name.indexOf(
                                '股静脉'
                              ) == -1 &&
                              predialysis.blood_access_part_opera_name.indexOf(
                                '颈内静脉'
                              ) == -1 &&
                              predialysis.blood_access_part_opera_name.indexOf(
                                '人造血管'
                              ) == -1 &&
                              predialysis.blood_access_part_opera_name.indexOf(
                                '自体内瘘'
                              ) == -1 &&
                              predialysis.blood_access_part_opera_name != ''
                                ? true
                                : false
                            "
                            showValue="其他"
                          ></label-box>
                          <span style="padding-left: 20px">
                            <span
                              style="
                                display: inline-block;
                                min-width: 130px;
                                border-bottom: 1px solid #999;
                                height: 35px;
                                text-align: center;
                              "
                            >
                              <span
                                v-if="
                                  predialysis.blood_access_part_opera_name.indexOf(
                                    '锁骨下'
                                  ) == -1 &&
                                  predialysis.blood_access_part_opera_name.indexOf(
                                    '股静脉'
                                  ) == -1 &&
                                  predialysis.blood_access_part_opera_name.indexOf(
                                    '颈内静脉'
                                  ) == -1 &&
                                  predialysis.blood_access_part_opera_name.indexOf(
                                    '直穿'
                                  ) == -1 &&
                                  predialysis.blood_access_part_opera_name.indexOf(
                                    '人造血管'
                                  ) == -1 &&
                                  predialysis.blood_access_part_opera_name.indexOf(
                                    '自体内瘘'
                                  ) == -1
                                "
                              >
                                {{ predialysis.blood_access_part_opera_name }}
                              </span>
                            </span>
                          </span>
                        </div>
                        <div style="width: 25%">
                          穿刺者：
                          <span
                            v-if="
                              setAdminUserES(
                                dialysisOrder == null
                                  ? 0
                                  : dialysisOrder.puncture_nurse
                              ) == ''
                            "
                          >
                            {{
                              getAdminUser(
                                dialysisOrder == null
                                  ? 0
                                  : dialysisOrder.puncture_nurse
                              )
                            }}
                          </span>
                          <img
                            class="es-img"
                            style="height: 30px"
                            :src="
                              setAdminUserES(
                                dialysisOrder == null
                                  ? 0
                                  : dialysisOrder.puncture_nurse
                              )
                            "
                            alt
                            srcset
                            v-else
                          />
                        </div>
                      </div>
                    </td>
                  </tr>
                </tbody>
              </table>
            </td>
          </tr>
          <tr style="transform: translateY(2px)">
            <td>
              <table class="print-table" border="1">
                <tr style="text-align: center">
                  <td
                    :colspan="org_id == 10441 || org_id == 9675 ? 14 : 15"
                    style="margin-left: 15px; font-size: 20px"
                  >
                    治 疗 过 程 记 录
                  </td>
                </tr>
                <tr>
                  <td style="width: 60px" rowspan="2">时间</td>
                  <td colspan="4">透析参数</td>
                  <td :colspan="org_id == 10441 || org_id == 9675 ? 4 : 5">
                    生命体征
                  </td>
                  <td colspan="1">治疗中病情变化</td>
                </tr>
                <tr class="short_tr">
                  <th style="width: 70px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">TMP</p>
                    <p style="height: 20px; line-height: 20px">mmHg</p>
                  </th>

                  <th style="width: 70px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">静脉压</p>
                    <p style="height: 20px; line-height: 20px">mmHg</p>
                  </th>
                  <th style="width: 70px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">血流量</p>
                    <p style="height: 20px; line-height: 20px">(ml·min)⁻¹</p>
                  </th>
                  <th style="width: 70px; font-weight: normal" v-if="org_id!=10430&&org_id!=9675">
                    <p style="height: 20px; line-height: 20px">脱水量</p>
                    <p style="height: 20px; line-height: 20px">ml</p>
                  </th>
                  <th style="width: 70px; font-weight: normal" v-if="org_id==10430||org_id==9675">
                    <p style="height: 20px; line-height: 20px">血温</p>
                    <p style="height: 20px; line-height: 20px">℃</p>
                  </th>

                  <th style="width: 80px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">T</p>
                    <p style="height: 20px; line-height: 20px">℃</p>
                  </th>

                  <th style="width: 60px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">HR</p>
                    <p style="height: 20px; line-height: 20px">bpm</p>
                  </th>

                  <th style="width: 60px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">R</p>
                    <p style="height: 20px; line-height: 20px">bpm</p>
                  </th>

                  <th style="width: 60px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">BP</p>
                    <p style="height: 20px; line-height: 20px">mmHg</p>
                  </th>

                  <th
                    style="width: 80px; font-weight: normal"
                    v-if="org_id != 10441 && org_id != 9675"
                  >
                    <p style="height: 20px; line-height: 20px">SpO₂</p>
                    <p style="height: 20px; line-height: 20px">%</p>
                  </th>
                  <th style="width: 333px; font-weight: normal">
                    <p style="height: 20px; line-height: 20px">
                      记&nbsp;&nbsp;&nbsp;&nbsp;录
                    </p>
                  </th>
                </tr>

                <tr v-for="(monitor, monindex) in monitors" :key="monindex">
                  <td style="min-width: 60px; height: 30px">
                    {{ getTime(monitor.operate_time, "{h}:{i}") }}
                  </td>

                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{
                        monitor.transmembrane_pressure
                          ? monitor.transmembrane_pressure
                          : ""
                      }}
                    </span>
                  </td>

                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      &nbsp;{{
                        monitor.venous_pressure ? monitor.venous_pressure : ""
                      }}
                    </span>
                  </td>
                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{
                        monitor.blood_flow_volume
                          ? monitor.blood_flow_volume
                          : ""
                      }}
                    </span>
                  </td>
                  <td style="min-width: 45px" v-if="org_id!=10430&&org_id!=9675">
                    <span v-if="getTime(monitor.operate_time) != ''&&monindex == 0 && (org_id == 10441||org_id == 9675)">
                      {{'/'}}
                    </span>
                    <span v-else-if="getTime(monitor.operate_time) != ''&&monindex == 0 && (org_id != 10441&&org_id != 9675)">
                      {{monitor.ultrafiltration_volume? monitor.ultrafiltration_volume: ""}}
                    </span>
                    <span v-else>{{monitor.ultrafiltration_volume? monitor.ultrafiltration_volume: ""}}</span>
                  </td>

                  <td style="min-width: 45px" v-if="org_id==10430||org_id==9675">
                    {{monitor.dialysate_temperature?monitor.dialysate_temperature:''}}
                  </td>

                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{ monitor.temperature ? monitor.temperature : "" }}
                    </span>
                  </td>

                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{
                        monitor.pulse_frequency ? monitor.pulse_frequency : ""
                      }}
                    </span>
                  </td>
                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{ monitor.breathing_rate ? monitor.breathing_rate : "" }}
                    </span>
                  </td>

                  <td>
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{
                        monitor.systolic_blood_pressure
                          ? monitor.systolic_blood_pressure
                          : ""
                      }}/{{
                        monitor.diastolic_blood_pressure
                          ? monitor.diastolic_blood_pressure
                          : ""
                      }}
                    </span>
                  </td>
                  <td v-if="org_id != 10441 && org_id != 9675">
                    <span v-if="getTime(monitor.operate_time) != ''">
                      {{
                        monitor.blood_oxygen_saturation
                          ? monitor.blood_oxygen_saturation
                          : ""
                      }}
                    </span>
                  </td>
                  <td>
                    <span
                      v-if="
                        monitor.symptom || monitor.dispose || monitor.result
                      "
                    >
                      {{ monitor.symptom }} &nbsp;{{ monitor.dispose }} &nbsp;{{
                        monitor.result
                      }}
                    </span>
                  </td>
                </tr>
              </table>
            </td>
          </tr>
          <tr style="transform: translateY(4px)" v-if="org_id!=10346 && org_id!=0">
            <td>
              <table class="print-table" border="1" style="text-align: center">
                <tr>
                  <td style="height: 20px" width="60">
                    <p style="height: 20px; line-height: 20px">时间</p>
                  </td>
                  <td
                    style="height: 20px"
                    width="90"
                    v-if="org_id == 10346 || org_id == 9675"
                  >
                    <p style="height: 20px; line-height: 20px">开嘱医生</p>
                  </td>
                  <td style="height: 20px" width="344">
                    <p style="height: 20px; line-height: 20px">医嘱执行记录</p>
                  </td>
                  <td
                    style="height: 20px"
                    width="70"
                    v-if="org_id == 10346 || org_id == 9675"
                  >
                    <p style="height: 20px; line-height: 20px">执行时间</p>
                  </td>
             
                  <td style="height: 20px" width="90">
                    <p style="height: 20px; line-height: 20px">执行</p>
                  </td>
                  <td style="height: 20px" width="90">
                    <p style="height: 20px; line-height: 20px">核对</p>
                  </td>
                  <td style="height: 20px" width="144">
                    <p style="height: 20px; line-height: 20px">上次透后体重</p>
                  </td>
                  <td style="height: 20px" width="60">
                    {{
                      patientInfo.total_dialysis +
                        patientInfo.user_sys_before_count >
                      0
                        ? assessmentafter.weight_after
                        : "/"
                    }}kg
                  </td>
                </tr>
              </table>
            </td>
          </tr>
          <div v-if="org_id!=10346 && org_id!=0">
          <tr
            v-for="(advice, advice_index) in advices"
            :key="advice_index"
            style="transform: translateY(3px)"
          >
            <td>
              <table class="print-table" border="1">
                <tr>
                  <td width="60">
                    {{ getTime(advice.start_time, "{h}:{i}") }}
                  </td>
                  <td
                    style="line-height: 30px"
                    width="90"
                    v-if="org_id == 10346 || org_id == 9675"
                  >
                    <span v-if="setAdminUserES(advice.advice_doctor) == ''">
                      {{ getAdminUser(advice.advice_doctor) }}
                    </span>
                    <img
                      style="height: 30px"
                      :src="setAdminUserES(advice.advice_doctor)"
                      alt=""
                      srcset=""
                      v-else
                    />
                  </td>
                  <td style="text-align: left; padding-left: 5px" width="340">
                    <span v-if="advice.parent_id > 0">---></span>
                    <span>{{ advice.advice_name }}</span>
                    <span v-if="advice && advice.advice_desc"
                      >({{ advice.advice_desc
                      }}{{ advice.drug_spec_unit }})</span
                    >
                    <span v-if="advice.prescribing_number"
                      >&nbsp;&nbsp; {{ advice.prescribing_number
                      }}{{ advice.prescribing_number_unit }}</span
                    >
                    <span v-if="advice.single_dose != 0"
                      >{{ advice.single_dose
                      }}{{ advice.single_dose_unit }}</span
                    >

                    <span v-if="advice.parent_id == 0">{{
                      advice.delivery_way
                    }}</span>
                    <span v-if="advice.parent_id == 0">{{
                      advice.execution_frequency
                    }}</span>
                    <span>{{ advice.remark }}</span>
                  </td>
                  <td
                    style="line-height: 10px"
                    width="70"
                    v-if="org_id == 10346 || org_id == 9675"
                  >
                    <span v-if="advice.execution_time">{{
                      getTime(advice.execution_time, "{h}:{i}")
                    }}</span>
                  </td>
                  <!-- <td
                    style="line-height: 30px"
                    width="90"
                    v-if="org_id == 10249 || org_id == 0"
                  >
                    <span v-if="setAdminUserES(advice.advice_doctor) == ''">
                      {{ getAdminUser(advice.advice_doctor) }}
                    </span>
                    <img
                      style="height: 30px"
                      :src="setAdminUserES(advice.advice_doctor)"
                      alt=""
                      srcset=""
                    />
                  </td> -->
                  <td style="line-height: 10px" width="90">
                    <span v-if="setAdminUserES(advice.execution_staff) == ''">{{
                      getAdminUser(advice.execution_staff)
                    }}</span>
                    <img
                      style="height: 30px"
                      :src="setAdminUserES(advice.execution_staff)"
                      alt=""
                      srcset=""
                      v-else
                    />
                  </td>
                  <td style="line-height: 30px" width="90">
                    <span v-if="setAdminUserES(advice.checker) == ''">{{
                      getAdminUser(advice.checker)
                    }}</span>
                    <img
                      style="height: 30px"
                      :src="setAdminUserES(advice.checker)"
                      alt=""
                      srcset=""
                      v-else
                    />
                  </td>

                  <td v-if="advice_index === 0" width="145">透前体重:</td>
                  <td v-if="advice_index === 0" width="60">
                    {{
                      patientInfo.total_dialysis +
                        patientInfo.user_sys_before_count >
                      0
                        ? predialysis.weight_before
                        : "/"
                    }}kg
                  </td>
                  <td v-if="advice_index === 1" width="145">体重增加量:</td>
                  <td v-if="advice_index === 1" width="60">
                    {{
                      assessmentafter.weight_after == 0 ||
                      predialysis.weight_before == 0
                        ? 0
                        : (
                            predialysis.weight_before -
                            assessmentafter.weight_after
                          ).toFixed(2)
                    }}kg
                  </td>
                  <td v-if="advice_index === 2" width="145">干体重(DW):</td>
                  <td v-if="advice_index === 2" width="60">
                    {{
                      patientInfo.total_dialysis +
                        patientInfo.user_sys_before_count >
                      0
                        ? predialysis.dry_weight
                        : "/"
                    }}kg
                  </td>
                  <td v-if="advice_index === 3" width="145">较干体重增加量:</td>
                  <td v-if="advice_index === 3" width="60">
                    {{
                      patientInfo.total_dialysis +
                        patientInfo.user_sys_before_count >
                        0 && afterdialysis.weight_after != 0
                        ? (
                            afterdialysis.weight_after - predialysis.dry_weight
                          ).toFixed(2)
                        : 0
                    }}kg
                  </td>
                  <td v-if="advice_index === 4" width="145">机器显示脱水量:</td>
                  <td v-if="advice_index === 4" width="60">
                    {{
                      patientInfo.total_dialysis +
                        patientInfo.user_sys_before_count >
                      0
                        ? afterdialysis.actual_ultrafiltration
                        : "/"
                    }}ml
                  </td>
                  <td v-if="advice_index === 5" width="145">透后体重:</td>
                  <td v-if="advice_index === 5" width="60">
                    {{
                      patientInfo.total_dialysis +
                        patientInfo.user_sys_before_count >
                      0
                        ? afterdialysis.weight_after
                        : "/"
                    }}kg
                  </td>
                  <td v-if="advice_index === 6" width="145">
                    本次透析体重下降量:
                  </td>
                  <td v-if="advice_index === 6" width="60">
                    {{
                      afterdialysis.weight_after == 0 ||
                      predialysis.weight_before == 0
                        ? 0
                        : (
                            predialysis.weight_before -
                            afterdialysis.weight_after
                          ).toFixed(2)
                    }}kg
                  </td>
                  <td v-if="advice_index > 6" width="145"></td>
                  <td v-if="advice_index > 6" width="60"></td>
                </tr>
              </table>
            </td>
          </tr>
          </div>

          <tr style="transform: translateY(1px)">
            <td>
              <table class="print-table" border="1">
                <tr style="height: 50px; text-align: left">
                  <td style="padding-left: 5px; border-bottom: none">
                    治疗小结：{{
                      summary.dialysis_summary ? summary.dialysis_summary : ""
                    }}
                  </td>
                </tr>
                <tr style="height: 50px; text-align: left" v-if="org_id==10430||org_id==9675">
                  <td style="padding-left: 5px; border-bottom: none;border-top: none;">
                    透析护理记录：{{
                      summary.nursing_record ? summary.nursing_record : ""
                    }}
                  </td>
                </tr>
                <tr style="height: 40px">
                  <td
                    rowspan="11"
                    style="border-top: none; text-align: right; height: 40px"
                  >
                    医生签名
                    <span
                      style="
                        display: inline-block;
                        width: 100px;
                        text-align: left;
                      "
                    >
                      &nbsp;
                      <span
                        v-if="
                          setAdminUserES(
                            advices == null
                              ? 0
                              : advices[0].advice_doctor
                              ? advices[0].advice_doctor
                              : ''
                          ) == ''
                        "
                      >
                        {{
                          getAdminUser(
                            advices == null
                              ? 0
                              : advices[0].advice_doctor
                              ? advices[0].advice_doctor
                              : ""
                          )
                        }}
                      </span>
                      <img
                        style="height: 30px"
                        :src="
                          setAdminUserES(
                            prescription == null
                              ? 0
                              : prescription.prescription_doctor
                              ? prescription.prescription_doctor
                              : ''
                          )
                        "
                        alt=""
                        srcset=""
                        v-else
                      />
                    </span>
                    护士签名
                    <span
                      style="
                        display: inline-block;
                        width: 100px;
                        text-align: left;
                      "
                    >
                      &nbsp;
                      <span
                        v-if="
                          setAdminUserES(
                            dialysisOrder == null
                              ? 0
                              : dialysisOrder.start_nurse
                          ) == ''
                        "
                        >{{
                          getAdminUser(
                            dialysisOrder == null
                              ? 0
                              : dialysisOrder.start_nurse
                          )
                        }}</span
                      >
                      <img
                        class="es-img"
                        style="height: 30px"
                        :src="
                          setAdminUserES(
                            dialysisOrder == null
                              ? 0
                              : dialysisOrder.start_nurse
                          )
                        "
                        alt=""
                        srcset=""
                        v-else
                      />
                    </span>
                  </td>
                </tr>
              </table>
            </td>
          </tr>
        </tbody>
      </table>
    </div>
  </div>
</template>

<script>
import { getDialysisRecord } from "@/api/dialysis";
import { jsGetAge, uParseTime } from "@/utils/tools";
import LabelBox from "../printItem/LabelBox";
import { getDataConfig } from "@/utils/data";
import BreadCrumb from "@/xt_pages/components/bread-crumb";
// import DialysisPrintOrderOne from './template/dialysisPrintOrderOne'
// import DialysisPrintOrderTwo from './template/dialysisPrintOrderTwo'
import print from "print-js";

export default {
  name: "dialysisPrintOrderFour",
  components: {
    // DialysisPrintOrderOne,
    // DialysisPrintOrderTwo,
    LabelBox,
    BreadCrumb,
  },
  data() {
    return {
      doctor_advices: [],
      doctor_advices_2: [],
      way_arr: [],
      consciousness_arr: [],
      appetite_arr: [],
      posture_arr: [],
      sick_condition_arr: [],
      precaution_arr: [],
      intake_arr: [],
      nutrition_arr: [],
      bloodAccessParOpera: {},
      crumbs: [
        { path: false, name: "透析管理" },
        { path: false, name: "打印单" },
      ],
      operators: [],
      adminUser: [],
      check: {},
      dialysisOrder: {
        DeviceNumber: [],
      },
      operatorMaps: {},
      complications: [
        "低血压",
        "高血压",
        "心律失常",
        "头晕",
        "头痛",
        "呕吐",
        "抽搐",
        "出血",
        "心衰",
        "腹痛",
      ],
      jilurow: 0,
      assessmentafter: {},
      advice_jilurow: 0,
      loading: false,
      orgname: "",
      patientInfo_gender_1: false,
      patientInfo_gender_2: false,
      patientInfo_source_2: false,
      patientInfo_source_1: false,
      modeOptions: {},
      replacementWays: [],
      perfusionApparatus: [],
      anticoagulantsConfit: {},
      bloodAccessParOpera: {},
      dialysateFormulationOptions: {},
      totollength: 0,
      queryParams: {
        xtdate: "",
        xtno: "",
        patient_id:0,
      },
      patientInfo: {
        birth: "",
        age: "",
        DialysisSchedule: {
          device_number: { number: "" },
          device_zone: { name: "" },
        },
        gender: 0,
      },
      predialysis: {
        score: "",
        internal_fistula: "",
        internal_fistula_skin: "",
        catheter: "",
        blood_access_part_opera_name: "",
      },
      afterdialysis: {
        complications_index: "",
      },
      prescription: {
        dialysate_formulation_name: "",
        device: {},
      },
      advices: [],
      users: [],
      monitors: [],
      sick_condition: "",
      summary: {},
      receiverTreatmentAccess: {},
      org_template_info: {},
      anticoagulantsConfitTwo: {},
      doctor_advices: [],
      advice_groups: [],
      org_id: 0,
      anticoagulan_name: "",
      xtdate: "",
      AlPanel: {
        id: 0,
        name: "",
        type: 1,
        shouji: 2,
        weichi: 2,
        zongliang: 2,
        gaimingcheng: -1,
        gaijiliang: -1,
        shouji_unit: "mg",
        weichi_unit: "mg/h",
        zongliang_unit: "mg",
        gaimingcheng_unit: "",
        gaijiliang_unit: "",
      },
    };
  },
  methods: {
    // 获取当前年份，用于年龄计算
    getoldAge() {
      let date = new Date();
      let year = date.getFullYear();
      let year_d =
        this.xtdate.split("-")[0] - this.patientInfo.birth.split("-")[0];
      let year_m = this.xtdate.split("-")[1];
      let birth_m = this.patientInfo.birth.split("-")[1];
      let year_date = this.xtdate.split("-")[2];
      let birth_date = this.patientInfo.birth.split("-")[2];
      // console.log(year,'今年年月')
      // console.log(this.xtdate.split('-'),'病人就诊年月')
      console.log(this.patientInfo.birth, "病人生日");
      // console.log(year_d,'year_d')
      if (year_m < birth_m) {
        return year_d - 1;
      } else if (year_m == birth_m) {
        if (year_date < birth_date) {
          return year_d - 1;
        } else {
          return year_d;
        }
      } else {
        return year_d;
      }
    },
    getAdminUser(id) {
      if (id == 0) {
        return "";
      }
      if (id == undefined) {
        return "";
      }
      for (let i = 0; i < this.adminUser.length; i++) {
        if (this.adminUser[i].id == id) {
          return this.adminUser[i].name;
        }
      }
    },
    getTime(value, temp) {
      if (value == 0) {
        return "";
      }
      if (value != undefined) {
        return uParseTime(value, temp);
      }
      return "";
    },
    printThisPage() {
      var ptime = Math.round(new Date().getTime() / 1000);
      this.print_time = uParseTime(ptime, "{y}-{m}-{d} {h}:{i}");

      const style =
        '@media print {.dialysis-print-order{width:960px;margin:0 auto}.dialysis-print-order .order-yy-name{margin:auto;text-align:center;font-size:20px;letter-spacing:5px}.dialysis-print-order .order-title{margin:auto;font-weight:600;text-align:center;font-size:22px;padding:10px 20px 20px 20px}.dialysis-print-order .table-box{width:100%;line-height:23px;font-size:14px}.dialysis-print-order .print-table{width:100%;text-align:center;border-collapse:collapse;line-height:25px;font-size:14px}.dialysis-print-order .print-table-no{width:100%;text-align:center;border-collapse:collapse;font-size:14px}.dialysis-print-order .under-line{border-bottom:1px solid #999;width:95%;text-align:center;margin-left:2px}.dialysis-print-order .title-box{text-align:center;font-size:16px;border:1px solid #666}.dialysis-print-order .radio-lebel-box{font-weight:400;cursor:pointer}.dialysis-print-order .radio-no{opacity:0;outline:0;position:absolute;margin:0;width:0;height:0;z-index:-1}.dialysis-print-order .radio-inner{white-space:nowrap;cursor:pointer;outline:0;display:inline-block;line-height:1;position:relative;vertical-align:middle}.dialysis-print-order .radio-fang{display:inline-block;position:relative;border:1px solid #000;box-sizing:border-box;width:14px;height:14px;background-color:#fff;z-index:1;transition:border-color .25s cubic-bezier(.71,-.46,.29,1.46),background-color .25s cubic-bezier(.71,-.46,.29,1.46)}.dialysis-print-order .is-checked-radio::after{content:"√";font-size:15px}}.dialysis-print-order .print-table-no tr td { padding: 8px 5px; line-height: 25px; }.es-img{height: 20px; }.advice-name{text-align: left;}.advice-children{display:flex;} .dialysis-print-order .print-table tr td{padding: 0px 0px;} .print-template-two tr {line-height: 30px;}   .title-box-pro{border: 0 #fff;line-height: 40px;height: 40px;text-align: left;padding-left: 10px !important;}  .text-align-left{text-align: left !important;padding-left:10px !important;font-size: 14px !important;line-height: 25px;}';

      if (this.org_template_info.template_id == 1) {
        printJS({
          printable: "dialysis-print-box",
          type: "html",
          style: style,
          scanStyles: false,
        });
      } else if (
        this.org_template_info.template_id == 2 ||
        this.org_template_info.template_id == 0
      ) {
        printJS({
          printable: "dialysis-print-box-1",
          type: "html",
          style: style,
          scanStyles: false,
        });
      }
    },
    getNumber() {
      if (this.dialysisOrder != null) {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.dialysisOrder.DeviceNumber.number
        );
      } else {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.patientInfo.DialysisSchedule.device_number.number
        );
      }
    },

    getXuserName(id) {
      if (id <= 0) {
        return "";
      }
      var name = "";
      if (this.users == null || typeof this.users.length === "undefined") {
        return name;
      }
      var leng = this.users.length;
      if (leng == 0) {
        return name;
      }
      for (let index = 0; index < leng; index++) {
        if (this.users[index].id == id) {
          name = this.users[index].name;
          break;
        }
      }
      return name;
    },
    setAdminUserES(id) {
      console.log(id);
      if (id == 0) {
        return "";
      }
      if (id in this.operatorMaps) {
        return this.operatorMaps[id].url;
      } else {
        return "";
      }
    },
    modeName(mode_id) {
      return typeof this.modeOptions[mode_id] !== "undefined" &&
        typeof this.modeOptions[mode_id].name !== "undefined"
        ? this.modeOptions[mode_id].name
        : "";
    },
    getDialysisRecord() {
      this.loading = true;
      this.queryParams.patient_id = parseInt(this.$route.query.patient_id)
      getDialysisRecord(this.queryParams).then((response) => {
        if (response.data.state == 1) {
          this.adminUser = response.data.data.users;
          this.xtdate = response.data.data.xtdate;
          this.users = response.data.data.users;
          this.patientInfo = response.data.data.patientInfo;
          this.patientInfo.birth = uParseTime(
            this.patientInfo.birthday,
            "{y}-{m}-{d}"
          );
          // this.patientInfo.age = jsGetAge(this.patientInfo.birth, '-')
          if (response.data.data.patientInfo.first_dialysis_date != 0) {
            this.patientInfo.first_dialysis_date = uParseTime(
              response.data.data.patientInfo.first_dialysis_date,
              "{y}-{m}-{d}"
            );
          } else {
            this.patientInfo.first_dialysis_date = "";
          }
          this.check = response.data.data.check;
          this.predialysis = response.data.data.PredialysisEvaluation;
          this.predialysis.blood_access_part_opera_name =
            this.bloodAccessParOperaName(
              this.predialysis.blood_access_part_opera_id
            );

          console.log(
            this.predialysis.blood_access_part_opera_name,
            "this.predialysis.blood_access_part_opera_name"
          );
          this.afterdialysis = response.data.data.AssessmentAfterDislysis;
          this.operators = response.data.data.operators;
          this.dialysisOrder =
            response.data.data.dialysisOrder === null
              ? null
              : response.data.data.dialysisOrder;

          if (this.operators.length > 0) {
            var operatorsLen = this.operators.length;
            for (var index = 0; index < operatorsLen; index++) {
              this.$set(
                this.operatorMaps,
                this.operators[index].creator,
                this.operators[index]
              );
            }
          }

          this.afterdialysis.txqnx = -1;
          if (this.afterdialysis.cruor.indexOf("0度") > -1) {
            this.afterdialysis.txqnx = 0;
          }
          if (this.afterdialysis.cruor.indexOf("Ⅰ度") > -1) {
            this.afterdialysis.txqnx = 1;
          }
          if (this.afterdialysis.cruor.indexOf("Ⅱ度") > -1) {
            this.afterdialysis.txqnx = 2;
          }
          if (this.afterdialysis.cruor.indexOf("Ⅲ度") > -1) {
            this.afterdialysis.txqnx = 3;
          }

          this.afterdialysis.complications =
            this.afterdialysis.complication.split(",");
          this.afterdialysis.complications_other = [];
          this.afterdialysis.complications_index = [];
          var acllen = this.afterdialysis.complications.length;
          for (let index = 0; index < acllen; index++) {
            if (
              this.complications.indexOf(
                this.afterdialysis.complications[index]
              ) >= 0
            ) {
              this.afterdialysis.complications_index.push(
                this.afterdialysis.complications[index]
              );
            } else if (
              this.complications.indexOf(
                this.afterdialysis.complications[index]
              ) < 0 &&
              this.afterdialysis.complications_other.indexOf(
                this.afterdialysis.complications[index]
              ) < 0
            ) {
              this.afterdialysis.complications_other.push(
                this.afterdialysis.complications[index]
              );
            }
          }
          this.afterdialysis.complications_other =
            this.afterdialysis.complications_other.join(",");

          this.prescription = response.data.data.dialysisPrescription;
          this.receiverTreatmentAccess =
            response.data.data.receiverTreatmentAccess;
          this.assessmentafter = response.data.data.assessmentAfterDislysis;

          this.sick_condition_arr.forEach((o) => {
            if (this.receiverTreatmentAccess.sick_condition == o.id) {
              this.sick_condition = o.name;
            }
          });

          this.prescription.mode = this.modeName(this.prescription.mode_id);
          var rwLen = this.replacementWays.length;
          this.prescription.replacement = "";
          for (let index = 0; index < rwLen; index++) {
            if (
              this.replacementWays[index].id ==
              this.prescription.replacement_way
            ) {
              this.prescription.replacement = this.replacementWays[index].name;
              break;
            }
          }

          this.prescription.dialysate_formulation_name =
            this.dialysateFormulationName(
              this.prescription.dialysate_formulation
            );

          var paLen = this.perfusionApparatus.length;
          this.prescription.perfusion_apparatus_name = "";
          for (let index = 0; index < paLen; index++) {
            if (
              this.perfusionApparatus[index].id ==
              this.prescription.perfusion_apparatus
            ) {
              this.prescription.perfusion_apparatus_name =
                this.perfusionApparatus[index].name;
              break;
            }
          }
          console.log(this.prescription, "透析处方");

          var acLen = this.anticoagulantsConfit.length;
          var thisALID = this.prescription.anticoagulant;
          this.prescription.anticoagulant_name = "";

          if (
            typeof this.anticoagulantsConfit[thisALID] !== "undefined" &&
            this.anticoagulantsConfit[thisALID] != null
          ) {
            this.prescription.anticoagulant_name =
              this.anticoagulantsConfit[thisALID].name;
            this.AlPanel = this.anticoagulantsConfit[thisALID];
          }

          this.advices = response.data.data.advices;
          this.monitors = response.data.data.monitors;
          this.summary = response.data.data.summary;
          this.org_template_info = response.data.data.org_template_info;
          console.log(this.advices, "this.advices");
          if (this.monitors.length <= 0) {
            var nl = 8 - this.monitors.length;
            for (let index = 0; index < nl; index++) {
              this.monitors.push([]);
            }
          }
          // if (this.monitors.length < 8) {
          //   var nl = 8 - this.monitors.length;
          //   for (let index = 0; index < nl; index++) {
          //     this.monitors.push([]);
          //   }
          // }
          this.jilurow = this.monitors.length + 1;

          this.advice_jilurow = this.advices.length + 1;

          var childMap = {};
          for (const index in this.advices) {
            if (this.advices[index].parent_id == 0) {
              continue;
            }
            if (!(this.advices[index].parent_id in childMap)) {
              childMap[this.advices[index].parent_id] = [];
            }
            childMap[this.advices[index].parent_id].push(this.advices[index]);
          }

          var advices = [];
          for (const index in this.advices) {
            if (this.advices[index].parent_id > 0) {
              continue;
            }
            var item = this.advices[index];
            if (item.id in childMap) {
              item.children = childMap[item.id];
            } else {
              item.children = [];
            }
            advices.push(item);
          }

          var tableAdvice = this.advices;
          // console.log("医生", tableAdvice);
          if (tableAdvice.length === 0) {
            var obj = { advice_name: "", start_time: "" };
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            var obj4 = { advice_name: "", start_time: "" };
            var obj5 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            tableAdvice.push(obj4);
            tableAdvice.push(obj5);
            this.advices = tableAdvice;
          }
          if (tableAdvice.length === 1) {
            var obj = { advice_name: "", start_time: "" };
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            var obj4 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            tableAdvice.push(obj4);
            this.advices = tableAdvice;
          }
          if (tableAdvice.length === 2) {
            var obj = { advice_name: "", start_time: "" };
            var obj1 = { advice_name: "", start_time: "" };
            var obj2 = { advice_name: "", start_time: "" };
            var obj3 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);
            tableAdvice.push(obj3);
            this.advices = tableAdvice;
          }
          if (tableAdvice.length === 3) {
            // eslint-disable-next-line no-redeclare
            var obj = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj1 = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj2 = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            tableAdvice.push(obj2);

            this.advices = tableAdvice;
          }
          if (tableAdvice.length === 4) {
            // eslint-disable-next-line no-redeclare
            var obj = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj1 = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare

            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            this.advices = tableAdvice;
          }
          if (tableAdvice.length === 5) {
            // eslint-disable-next-line no-redeclare
            var obj = { advice_name: "", start_time: "" };
            // eslint-disable-next-line no-redeclare
            var obj1 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj);
            tableAdvice.push(obj1);
            this.advices = tableAdvice;
          }
          if (tableAdvice.length === 6) {
            var obj1 = { advice_name: "", start_time: "" };
            tableAdvice.push(obj1);
            this.advices = tableAdvice;
          }

          // console.log(this.advices, "this.advices");

          // this.totollength = this.advices.length + this.monitors.length;
          // console.log(this.totollength, "this.totollength");
          // if (this.totollength > 21) {
          //   var temp_advice_length = 21 - this.monitors.length;
          //   var doctor_advices_1 = [];
          //   var doctor_advices_2 = [];
          //   for (let index = 0; index < this.advices.length; index++) {
          //     const element = this.advices[index];
          //     if (temp_advice_length > index) {
          //       doctor_advices_1.push(element);
          //     } else {
          //       doctor_advices_2.push(element);
          //     }
          //   }
          //   this.advices = doctor_advices_1;
          //   this.doctor_advices_2 = doctor_advices_2;
          // }

          this.loading = false;

          // this.doctor_advices =
          //   response.data.data.advices == null
          //     ? []
          //     : response.data.data.advices;

          // for (let index = 0; index < this.doctor_advices.length; index++) {
          //   this.doctor_advices[index]["isShow"] = 2;
          // }

          // if (this.doctor_advices.length > 0) {
          //   var group = this.newAdviceGroupObject();
          //   var initGroupBlock = function (group, advice) {
          //     group.group_no = advice.groupno;
          //   };
          //   for (
          //     let index = this.doctor_advices.length - 1;
          //     index >= 0;
          //     index--
          //   ) {
          //     var new_advice_index = 0;

          //     if (
          //       "children" in this.doctor_advices[index] &&
          //       this.doctor_advices[index].children.length > 0
          //     ) {
          //       new_advice_index =
          //         index + this.doctor_advices[index].children.length + 1;

          //       var doctor_advice = {
          //         delivery_way: this.doctor_advices[index].delivery_way,
          //         execution_frequency:
          //           this.doctor_advices[index].execution_frequency,
          //         groupno: this.doctor_advices[index].groupno,
          //         id: this.doctor_advices[index].id,
          //         parent_id: this.doctor_advices[index].parent_id,
          //         children: this.doctor_advices[index].children,
          //         remark: this.doctor_advices[index].remark,
          //       };
          //       doctor_advice["isShow"] = 1;
          //       this.doctor_advices.splice(new_advice_index, 0, doctor_advice);
          //       // this.doctor_advices.push(doctor_advice)
          //     }
          //   }

          //   for (let index = 0; index < this.doctor_advices.length; index++) {
          //     const advice = this.doctor_advices[index];
          //     if (advice.groupno == 0) {
          //       // 老版本的医嘱没有分组的概念，所以这一个 if 是解决这个问题的，将每个无分组的医嘱各自归为一组
          //       if (advice.parent_id > 0) {
          //         if (this.advice_groups.length > 0) {
          //           var parent_group =
          //             this.advice_groups[this.advice_groups.length - 1];
          //           if (parent_group.advices.length > 0) {
          //             if (parent_group.advices[0].id == advice.parent_id) {
          //               parent_group.advices.push(advice);
          //             }
          //           }
          //         }
          //         continue;
          //       } else {
          //         if (group.group_no > 0) {
          //           this.advice_groups.push(group);
          //           group = this.newAdviceGroupObject();
          //         }

          //         initGroupBlock(group, advice);
          //         group.advices.push(advice);
          //         this.advice_groups.push(group);
          //         group = this.newAdviceGroupObject();
          //         continue;
          //       }
          //     }

          //     if (group.group_no > 0 && group.group_no != advice.groupno) {
          //       this.advice_groups.push(group);
          //       group = this.newAdviceGroupObject();
          //     }
          //     if (group.group_no == 0) {
          //       initGroupBlock(group, advice);
          //     }
          //     if (group.group_no == advice.groupno) {
          //       group.advices.push(advice);
          //     }
          //   }
          //   if (group.group_no > 0) {
          //     // 上述的算法会导致最后一组没有加到advice_groups，这里要手动加上
          //     this.advice_groups.push(group);
          //   }
          // }
          console.log(this.advice_groups);
        } else {
          this.loading = false;
          this.$message.error("请求数据失败");
          return false;
        }
      });
    },
    bloodAccessParOperaName(id) {
      console.log(this.bloodAccessParOpera);
      if (id in this.bloodAccessParOpera) {
        return this.bloodAccessParOpera[id].name;
      }
      return "";
    },
    dialysateFormulationName(id) {
      if (id in this.dialysateFormulationOptions) {
        return this.dialysateFormulationOptions[id].name;
      }
      return "";
    },
    getAge: function (val) {
      if (val.birthday != 0) {
        return jsGetAge(val.birth, "-");
      } else {
        return "";
      }
    },
    newAdviceGroupObject: function () {
      return Object.assign(
        {},
        {
          group_no: 0,
          // advice_doctor: 0,
          // start_time: 0,
          advices: [],
          // exec_staff: 0,
          // exec_time: 0,
          // checker: 0,
        }
      );
    },
  },
  watch: {
    "patientInfo.gender": function () {
      if (this.patientInfo.gender == 1) {
        this.patientInfo_gender_1 = true;
        this.patientInfo_gender_2 = false;
      } else if (this.patientInfo.gender == 2) {
        this.patientInfo_gender_2 = true;
        this.patientInfo_gender_1 = false;
      } else {
        this.patientInfo_gender_2 = false;
        this.patientInfo_gender_1 = false;
      }
    },
    "patientInfo.source": function () {
      if (this.patientInfo.source == 1) {
        this.patientInfo_source_1 = true;
        this.patientInfo_source_2 = false;
      } else if (this.patientInfo.source == 2) {
        this.patientInfo_source_2 = true;
        this.patientInfo_source_1 = false;
      } else {
        this.patientInfo_source_2 = false;
        this.patientInfo_source_1 = false;
      }
    },
  },
  created() {
    this.org_id = this.$store.getters.xt_user.org_id;
    this.way_arr = getDataConfig("hemodialysis", "way");
    this.consciousness_arr = getDataConfig("hemodialysis", "consciousness");
    this.appetite_arr = getDataConfig("hemodialysis", "appetite");
    this.posture_arr = getDataConfig("hemodialysis", "posture");
    this.sick_condition_arr = getDataConfig("hemodialysis", "sick_condition");
    this.precaution_arr = getDataConfig("hemodialysis", "precaution");
    this.intake_arr = getDataConfig("hemodialysis", "intake");
    this.nutrition_arr = getDataConfig("hemodialysis", "nutrition");
    var bloodAccessParOpera = getDataConfig(
      "hemodialysis",
      "vascular_access_desc"
    );

    var xtuser = this.$store.getters.xt_user;
    this.orgname = xtuser.org.org_name;
    // this.orgname = "遂溪方济医院";
    this.modeOptions = this.$store.getters.treatment_mode;
    this.replacementWays = this.$store.getters.replacement_ways;
    this.perfusionApparatus = this.$store.getters.perfusion_apparatus;
    this.anticoagulantsConfit = this.$store.getters.anticoagulants_confit;

    // this.bloodAccessParOpera = getDataConfig('hemodialysis', 'vascular_access_desc')

    var bloodAccessParOpera = getDataConfig(
      "hemodialysis",
      "vascular_access_desc"
    );
    for (var key in bloodAccessParOpera) {
      this.bloodAccessParOpera[bloodAccessParOpera[key].id] =
        bloodAccessParOpera[key];
    }

    var dialysateFormulationOptions = getDataConfig(
      "hemodialysis",
      "dialysate_formulation"
    );
    for (var key in dialysateFormulationOptions) {
      this.dialysateFormulationOptions[dialysateFormulationOptions[key].id] =
        dialysateFormulationOptions[key];
    }

    const xtdate = this.$route.query && this.$route.query.xtdate;
    const xtno = this.$route.query && this.$route.query.xtno;
    if (
      typeof xtdate === "string" &&
      xtdate.length > 0 &&
      typeof xtno === "string" &&
      xtno.length > 0
    ) {
      this.queryParams.xtdate = xtdate;
      this.queryParams.xtno = xtno;
      this.xtdate = xtdate;

      this.getDialysisRecord();
    } else {
      this.$message.error("参数不齐");
      return false;
    }
  },
};
</script>

<style>
.dialysis-print-order {
  width: 960px;
  margin: 0 auto;
}

.dialysis-print-order .order-yy-name {
  margin: auto;
  text-align: center;
  font-size: 20px;
  letter-spacing: 5px;
}

.dialysis-print-order .order-title {
  margin: auto;
  font-weight: 600;
  text-align: center;
  font-size: 22px;
  padding: 10px 20px 20px 20px;
}

.dialysis-print-order .table-box {
  width: 100%;
  line-height: 23px;
  font-size: 14px;
}

.dialysis-print-order .print-table {
  width: 100%;
  text-align: center;
  border-collapse: collapse;
  line-height: 39px;
  font-size: 14px;
}

.dialysis-print-order .print-table-2 {
  width: 100%;
  text-align: left;
  border-collapse: collapse;
  line-height: 38px;
  font-size: 14px;
}
.print-table-3 {
  text-align: center;
  width: 300px;
  border-collapse: inherit;
  height: 90px !important;
  border: none;
}
.print-table-3 .tr_3 {
  border-bottom: 1px solid;
  height: 20px;
  line-height: 20px;
}

.print-table-3 .td_3_1 {
  border-right: 1px solid;
  height: 20px;
  line-height: 20px;
}

.print-table-3 .td_3_2 {
  border-right: 1px solid;
  height: 20px;
  line-height: 20px;
}

.print-table-3 .td_3 {
  border-right: 1px solid;
  height: 20px;
  line-height: 20px;
}

.dialysis-print-order .print-table-no {
  width: 100%;
  text-align: left;
  border-collapse: collapse;
  font-size: 14px;
}

.dialysis-print-order .under-line {
  border-bottom: 1px solid #999;
  width: 95%;
  text-align: center;
  margin-left: 2px;
}

.dialysis-print-order .title-box {
  text-align: center;
  font-size: 16px;
}

.dialysis-print-order .radio-lebel-box {
  font-weight: 400;
  cursor: pointer;
}

.dialysis-print-order .radio-no {
  opacity: 0;
  outline: none;
  position: absolute;
  margin: 0;
  width: 0;
  height: 0;
  z-index: -1;
}

.dialysis-print-order .radio-inner {
  white-space: nowrap;
  cursor: pointer;
  outline: none;
  display: inline-block;
  line-height: 1;
  position: relative;
  vertical-align: middle;
}

.dialysis-print-order .radio-fang {
  display: inline-block;
  position: relative;
  border: 1px solid #000;
  box-sizing: border-box;
  width: 14px;
  height: 14px;
  background-color: #fff;
  z-index: 1;
  transition: border-color 0.25s cubic-bezier(0.71, -0.46, 0.29, 1.46),
    background-color 0.25s cubic-bezier(0.71, -0.46, 0.29, 1.46);
}

.dialysis-print-order .is-checked-radio::after {
  content: "√";
  font-size: 15px;
}

.dialysis-print-order .print-table-no tr td {
  padding: 8px 5px;
  line-height: 25px;
}

.print-table {
  text-align: center;
}

.dialysis-print-order .print-table tr td {
  padding: 0px 0px;
  /*line-height: 25px;*/
}

.es-img {
  height: 25px;
}

.advice-name {
  text-align: left;
}

.advice-children {
  display: flex;
}

.title-box-pro {
  border: 0 #fff;
  line-height: 25px;
  height: 25px;
  text-align: left;
  padding-left: 10px !important;
}
.title-box-pro-tr {
  border: 0 #fff;
}
.text-align-left {
  text-align: left !important;
  padding-left: 10px !important;
  font-size: 14px !important;
  line-height: 25px;
}
.print-table-tr-new td {
  line-height: 20px !important;
}
.border-top-solid {
  border: solid 1px #000;
}
.print-template-two tr {
  line-height: 30px;
}

.list_table {
  display: flex;
  justify-content: flex-start;
}
.list_table div {
  text-align: left;
  flex: 1;
}
.print-table-list {
  width: 100%;
  text-align: left;
  border-collapse: collapse;
  line-height: 40px;
  font-size: 14px;
  border-spacing: 0;
}

.print-table-list tr td {
  padding: 0;
  border: 1px solid #dcdfe6;
}
.list_table_1 {
  text-align: left;
}
</style>
