<template>
  <div>
    <div id="dialysis-print-box-1">
      <div
        id="dialysis-print-box-1-1"
        class="dialysis-print-order print-template-two print_page_main_content"
      >
        <div style="display: inline-block; width: 100%; text-align: center">
          <div
            class="order-yy-name"
            style="
              letter-spacing: 0;
              font-weight: 600;
              font-size: 22px;
              display: inline-block;
            "
          >
          {{ orgname }}
          </div>
          <div
            class="order-title"
            style="
              letter-spacing: 0;
              font-weight: 600;
              font-size: 22px;
              display: inline-block;
            "
          >
            血液净化治疗记录单
          </div>

          <div class="infoTitle"> 透前情况</div>
          <div style="margin: 10px 0px;">
            <table class="table" border="1"
              style="border-collapse: collapse;text-align: left;width: 100%;
            ">
              <tr>
                <td>姓名：{{ patientInfo.name }}</td>
                <td>性别： {{ patientInfo_gender_1 ? "男" : "女" }}</td>
                <td>年龄：{{ getAge(patientInfo) }}岁</td>
                <td>门诊号： {{
                    patientInfo.dialysis_no
                      ? patientInfo.dialysis_no
                      : "/"
                  }}</td>
              </tr>
              <tr>
                <td>病床床号：
                  <span>
                  {{
                    dialysisOrder &&
                    dialysisOrder.DeviceNumber &&
                    dialysisOrder.DeviceNumber.number.length > 0
                      ? dialysisOrder.DeviceNumber.number
                      : patientInfo.DialysisSchedule.device_number.number
                    }}
                  </span>
                </td>
                <td>治疗时间：{{getTime(prescription.record_date,"{y}-{m}-{d}") }}</td>
                <td>干体重：{{ predialysis.dry_weight ? predialysis.dry_weight : "/" }}kg</td>
                <td>上次透后体重：
                  {{lastafterdialysis.weight_after?lastafterdialysis.weight_after:"未称重"}}kg
                </td>
              </tr>
              <tr>
                <td>透前体重：
                  {{
                    predialysis.weight_before ? predialysis.weight_before : "/"
                  }}kg
                </td>
                <td>透析总次数：{{ patientInfo.total_dialysis + patientInfo.user_sys_before_count }}次</td>
                <td colspan="2">患者评估：
                  入科方式:
                  <span v-if="receiverTreatmentAccess.way == 1">步行</span>
                  <span v-if="receiverTreatmentAccess.way == 2">扶行</span>
                  <span v-if="receiverTreatmentAccess.way == 3">轮椅</span>
                  <span v-if="receiverTreatmentAccess.way == 4">平车</span>

                  意识:
                  <span v-if="receiverTreatmentAccess.consciousness == 1">清醒</span>
                  <span v-if="receiverTreatmentAccess.consciousness == 2">嗜睡</span>
                  <span v-if="receiverTreatmentAccess.consciousness == 4">模糊</span>
                  <span v-if="receiverTreatmentAccess.consciousness == 3">昏迷</span>
                </td>
              </tr>
              <tr>
                <td colspan="4">
                  <span style="width: 14%;">血管通路： {{ predialysis.blood_access_part_opera_name }}</span>
                  <span style="width: 14%;">部位：{{ predialysis.blood_access_part_id }}</span>
                  <span style="width: 14%;">通路评估：
                    内瘘：
                     <span v-if="predialysis.internal_fistula.indexOf('自体内瘘') >-1">自体内瘘</span>
                     <span v-if="predialysis.internal_fistula.indexOf('震颤-存在') >-1">震颤-存在</span>
                     <span v-if="predialysis.internal_fistula.indexOf('震颤-减弱') >-1">震颤-减弱</span>
                     <span v-if="predialysis.internal_fistula.indexOf('震颤-无') >-1">震颤-无</span>

                  </span>
                  <!-- <span style="width: 14%;">震颤：</span>
                  <span style="width: 14%;">外观：</span> -->
                  <span style="width: 14%;">置换方式：
                    {{
                      getDisplaceLiquiPart(prescription.displace_liqui_part)
                    }}
                  </span>
                  <span style="width: 14%;">置换总量：
                    {{ prescription.displace_liqui_value ? prescription.displace_liqui_value : "/" }}L
                  </span>
                </td>
              </tr>
              <tr>
                <td colspan="4">
                  <div>
                    透前生命体征：
                    T <span>
                        {{predialysis.temperature
                        ? predialysis.temperature : "/"
                          }} ℃
                      </span>&nbsp;
                    P <span>
                        {{
                          predialysis.pulse_frequency
                            ? predialysis.pulse_frequency
                            : "/"
                        }}次/分
                      </span>&nbsp;
                    R <span>
                        {{
                          predialysis.breathing_rate
                            ? predialysis.breathing_rate
                            : "/"
                        }}次/分
                      </span>&nbsp;
                    BP <span>
                        {{predialysis.systolic_blood_pressure ? predialysis.systolic_blood_pressure : "/"}} /
                        {{ predialysis.diastolic_blood_pressure ? predialysis.diastolic_blood_pressure : '/' }}mmHg
                      </span>&nbsp;
                  </div>
                </td>
              </tr>
            </table>
          </div>

          <div class="infoTitle">透析处方</div>
          <div style="margin: 10px 0px;">
            <table class="table" border="1"
              style="border-collapse: collapse;text-align: left;width: 100%;
            ">
              <tr>
                <td>治疗模式：
                  <span v-if="prescription.mode_id == 1">HD</span>
                  <span v-if="prescription.mode_id == 2">HDF</span>
                  <span v-if="prescription.mode_id == 3">HD+HP</span>
                  <span v-if="prescription.mode_id == 4">HP</span>
                  <span v-if="prescription.mode_id == 5">HF</span>
                  <span v-if="prescription.mode_id == 6">SCUF</span>
                  <span v-if="prescription.mode_id == 7">IUF</span>
                  <span v-if="prescription.mode_id == 8">HFHD</span>
                  <span v-if="prescription.mode_id == 9"> HFHD+HP</span>
                  <span v-if="prescription.mode_id == 10">PHF</span>
                  <span v-if="prescription.mode_id == 11">HFR</span>
                  <span v-if="prescription.mode_id == 12">HDF+HP</span>
                  <span v-if="prescription.mode_id == 13">CRRT</span>
                  <span v-if="prescription.mode_id == 14">腹水回输</span>
                  <span v-if="prescription.mode_id == 15">HD前置换</span>
                  <span v-if="prescription.mode_id == 16">HD后置换</span>
                  <span v-if="prescription.mode_id == 17">HDF前置换</span>
                  <span v-if="prescription.mode_id == 18">HDF后置换</span>
                  <span v-if="prescription.mode_id == 19"> IUF+HD</span>
                  <span v-if="prescription.mode_id == 22"> 血浆胆红素吸附+HDF</span>
                  <span v-if="prescription.mode_id == 23"> 血浆胆红素吸附</span>
                  <span v-if="prescription.mode_id == 24">I-HDF</span>
                  <span v-if="prescription.mode_id == 25"> HD高通</span>
                  <span v-if="prescription.mode_id == 29"> PE</span>
                  <span v-if="prescription.mode_id == 30">血浆胆红素吸附+HP</span>
                </td>
                <td>
                  透析时长：
                  {{ prescription.dialysis_duration_hour ? prescription.dialysis_duration_hour : "0" }} h
                  {{ prescription.dialysis_duration_minute ? prescription.dialysis_duration_minute : "0" }} min
                </td>
                <td>预超：{{prescription.target_ultrafiltration }}L</td>
                <td>血流量：{{ prescription.blood_flow_volume ? prescription.blood_flow_volume : "/" }}ml/min</td>
              </tr>
              <tr>
                <td colspan="4">抗凝剂：
                  {{prescription.anticoagulant_name?prescription.anticoagulant_name : "/"}}
                  首剂：{{ prescription.anticoagulant_shouji ? prescription.anticoagulant_shouji: ""}}
                  <span>
                    <span v-if="prescription.anticoagulant == 4">iu</span>
                    <span v-if="prescription.anticoagulant == 3">iu</span>
                    <span v-if="prescription.anticoagulant == 2">mg</span>
                    <span v-if="prescription.anticoagulant == 5">ml</span>
                    <span v-if="prescription.anticoagulant == 6">iu</span>
                    <span v-if="prescription.anticoagulant == 7">iu</span>
                    <span v-if="prescription.anticoagulant == 8">iu</span>
                    <span v-if="prescription.anticoagulant == 9">iu</span>
                    <span v-if="prescription.anticoagulant == 10">iu</span>
                    <span v-if="prescription.anticoagulant == 11">iu</span>
                    <span v-if="prescription.anticoagulant == 13">iu</span>
                  </span>
                  维持:{{prescription.anticoagulant_weichi? prescription.anticoagulant_weichi : ""}}
                  <span v-if="prescription.anticoagulant == 2">mg/h</span>
                  <span v-if="prescription.anticoagulant == 3">iu/h</span>
                  <span v-if="prescription.anticoagulant == 4">ml</span>
                  <span v-if="prescription.anticoagulant == 5">ml/h</span>
                  <span v-if="prescription.anticoagulant == 6">iu/h</span>
                  <span v-if="prescription.anticoagulant == 7">iu/h</span>
                  <span v-if="prescription.anticoagulant == 8">iu/h</span>
                  <span v-if="prescription.anticoagulant == 9">iu/h</span>
                  <span v-if="prescription.anticoagulant == 10">iu/h</span>
                  <span v-if="prescription.anticoagulant == 11">iu/h</span>
                  <span v-if="prescription.anticoagulant == 13">iu/h</span>
                  总量:{{prescription.anticoagulant_zongliang? prescription.anticoagulant_zongliang: ""}}
                  <span v-if="prescription.anticoagulant == 2">mg</span>
                  <span v-if="prescription.anticoagulant == 3">iu</span>
                  <span v-if="prescription.anticoagulant == 4">ml</span>
                  <span v-if="prescription.anticoagulant == 5">ml</span>
                  <span v-if="prescription.anticoagulant == 6">iu</span>
                  <span v-if="prescription.anticoagulant == 7">iu</span>
                  <span v-if="prescription.anticoagulant == 8">iu</span>
                  <span v-if="prescription.anticoagulant == 9">iu</span>
                  <span v-if="prescription.anticoagulant == 10">iu</span>
                <span v-if="prescription.anticoagulant == 11">iu</span>
                <span v-if="prescription.anticoagulant == 13">iu</span>
                </td>
              </tr>
              <tr>
                <td colspan="2">透析机：{{predialysis.machine_type ? predialysis.machine_type : ""}}</td>
                <td colspan="2">透析器/灌流器：
                  {{ prescription.dialysis_dialyszers ? prescription.dialysis_dialyszers : "/" }}

                  {{ prescription.dialysis_irrigation ? prescription.dialysis_irrigation : "/" }}
                </td>
              </tr>
              <tr>
                <td colspan="4">
                  <span style="width: 14%;">透析液：
                   流量： {{prescription.dialysate_flow?prescription.dialysate_flow:"" }} ml/min
                   温度: {{ prescription.dialysate_temperature }} ℃
                   钾：{{ prescription.kalium }} mmol/L
                   钠：{{ prescription.sodium }} mmol/L
                   钙:{{ prescription.calcium }} mmol/L
                   碳酸氢盐: {{ prescription.bicarbonate }} mmol/L
                   CI : 109  mmol/L
                   Mg: 0.5mmol/L
                  </span>
                </td>
              </tr>
              <tr>
                <td colspan="2"></td>
                <td colspan="2">
                  处方医生：
                  <span
                    style="height: 30px; display: inline-block">
                     {{ getAdminUser(doctor_advices[0].advice_doctor) }}
                  </span>
                  <!-- <img
                    style="height: 60px; width:30%"
                    :src="setAdminUserES(doctor_advices[0].advice_doctor)"
                    alt=""
                    srcset=""
                    v-else
                  /> -->
                </td>
              </tr>
            </table>
          </div>

          <div class="infoTitle">透析记录</div>
          <div style="margin: 10px 0px;">
            <table class="table" border="1"
            style="border-collapse: collapse;width: 100%;"
            >
              <tr>
                <th rowspan="2" width="50">时间</th>
                <th colspan="3" style="text-align: center;">生命体征</th>
                <th colspan="7" style="text-align: center;">机器数据</th>
                <th rowspan="2" width="170">备注</th>
                <th rowspan="2" width="80">签名</th>
              </tr>
              <tr>
                <th width="70">血压<br>mmHg</th>
                <th width="40">呼吸<br>次/分</th>
                <th width="40">心率<br>次/分</th>
                <th width="50">血流量<br>ml/min</th>
                <th width="50">静脉压<br>mmHg</th>
                <th width="50">透析液<br>温度℃</th>
                <th width="50">置换率<br>L/h</th>
                <th width="50">超滤量<br>ml</th>
                <th width="50">超滤率<br>ml/h</th>
                <th width="50">电导率<br>ms/cm</th>
              </tr>
               <tr v-for="(monitor, monindex) in monitors" :key="monindex">
                <td>{{ getTime(monitor.operate_time, "{h}:{i}") }}</td>
                <td>{{monitor.systolic_blood_pressure? monitor.systolic_blood_pressure + "/": ""}}
                {{monitor.diastolic_blood_pressure? monitor.diastolic_blood_pressure: ""}}</td>
                <td>{{monitor.breathing_rate ? monitor.breathing_rate : ""}}</td>
                <td>{{ monitor.pulse_frequency? monitor.pulse_frequency: ""}}</td>
                <td>{{monitor.blood_flow_volume? monitor.blood_flow_volume: ""}}</td>
                <td>{{monitor.venous_pressure? monitor.venous_pressure: ""}}</td>
                <td>{{monitor.dialysate_temperature? monitor.dialysate_temperature: ""}}</td>
                <td>{{monitor.replacement_rate? monitor.replacement_rate: ""}}</td>
                <td>{{monitor.ultrafiltration_volume? monitor.ultrafiltration_volume: ""}}</td>
                <td>{{monitor.ultrafiltration_rate? monitor.ultrafiltration_rate: ""}}</td>
                <td>{{monitor.conductivity? monitor.conductivity: ""}}</td>
               <td>
                  {{monitor.symptom?monitor.symptom:"" }}&nbsp;
                  {{monitor.dispose? monitor.dispose: ""}}&nbsp;
                  {{monitor.result? monitor.result: ""}}
                </td>
                <td>
                  <span
                    style="height: 30px; display: inline-block">
                     {{ getAdminUser(monitor.monitoring_nurse) }}
                  </span>
                  <!-- <img  v-if="setAdminUserES(monitor.monitoring_nurse) != ''"
                    style="height: 60px"
                    :src="setAdminUserES(monitor.monitoring_nurse)"
                    alt=""
                    srcset=""
                    v-else
                  /> -->

                </td>
                </tr>
            </table>
          </div>
          <div style="margin-bottom: 10px;" v-if="org_id!=0&& org_id!=10375">
            <table class="table" border="1"
              style="border-collapse: collapse;text-align: center;width: 100%;"
            >
              <tr>
                <th width="10%">开立时间</th>
                <th width="45%">医嘱内容</th>
                <th width="10%">医生签名</th>
                <th width="10%">执行时间</th>
                <th width="10%">护士签名</th>
              </tr>
              <tr
                v-for="(advice, advice_index) in doctor_advices"
                :key="advice_index"
              >
                <td height="32px">
                  <span v-if="advice.start_time">
                    {{ getTime(advice.start_time, "{h}:{i}") }}
                  </span>
                </td>
                <td
                  height="32px"
                  class="advice-name"
                  style="padding-left: 7px"
                 
                >
                 <div :rowspan="advice.prescriptionChild.length"  v-for="(it,key)  in advice.prescriptionChild" style="border: none;">
                   <div style="border: none;">
                    <span>{{ it.advice_name }}</span>
                          <span v-if="it && it.advice_desc"
                            >({{ it.advice_desc
                            }}{{ it.drug_spec_unit }})</span
                          >
                          <span v-if="it.prescribing_number"
                            >&nbsp;&nbsp; {{ it.prescribing_number
                            }}{{ it.prescribing_number_unit }}</span
                          >
                          <span v-if="it.single_dose != 0"
                            >{{ it.single_dose
                            }}{{ it.single_dose_unit }}</span
                          >
                          <span>{{ it.delivery_way}}</span>
                          <span>{{
                            it.execution_frequency
                          }}</span>
                          <span v-if="it.remark.length > 0"
                            >({{ it.remark }})</span
                          >
                   </div>
                 </div>
                </td>

                <td height="32px">
                  <span>
                    {{ getAdminUser(advice.advice_doctor) }}
                  </span>
                </td>
                <td height="32px">
                  <span v-if="advice.execution_time">{{
                    getTime(advice.execution_time, "{h}:{i}")
                  }}</span>
                </td>
                <td height="32px">
                  <span>
                    {{ getAdminUser(advice.execution_staff) }}
                  </span>
                </td>
              </tr>
            </table>
          </div>

          <div class="infoTitle">透后情况</div>
          <div style="margin: 10px 0px;">
            <table class="table" border="1"
              style="border-collapse: collapse;text-align: left;width: 100%;
            ">
              <tr>
                <td>透后体重：
                  {{
                    afterdialysis.weight_after
                      ? parseFloat(
                          afterdialysis.weight_after -
                            afterdialysis.additional_weight
                        ).toFixed(1)
                      : "/"
                  }} kg
                </td>
                <td>实超：{{ afterdialysis.actual_ultrafiltration }}ml</td>
                <td>实际治疗时长：
                  {{
                    afterdialysis.actual_treatment_hour
                      ? afterdialysis.actual_treatment_hour
                      : "0"
                  }}小时{{
                    afterdialysis.actual_treatment_minute
                      ? afterdialysis.actual_treatment_minute
                      : "0"
                  }}分钟
                </td>
                <td>下机时间：
                  {{ getTime(dialysisOrder.end_time, "{y}-{m}-{d} {h}:{i}") ? getTime(dialysisOrder.end_time, "{y}-{m}-{d} {h}:{i}") : "0" }}
                </td>
              </tr>
              <tr>
                <td colspan="4">
                  <div>
                    透后生命体征：
                    T: <span>
                      {{ afterdialysis.temperature }}  ℃
                    </span>&nbsp;
                    P: <span>
                     {{ afterdialysis.pulse_frequency }} 次/分
                    </span>&nbsp;
                    R: <span>
                      {{ afterdialysis.breathing_rate }} 次/分
                    </span>&nbsp;
                    BP: <span>
                      {{ afterdialysis.systolic_blood_pressure }}  / {{ afterdialysis.diastolic_blood_pressure }}mmHg
                    </span>&nbsp;
                  </div>
                </td>
              </tr>
              <tr>
                <td colspan="2">
                  <span>通路评估：
                    内瘘:{{
                      afterdialysis.internal_fistula
                        ? afterdialysis.internal_fistula
                        : ""
                     }}

                  导管:{{
                        afterdialysis.catheter ? afterdialysis.catheter : ""
                    }}
                  </span>
                </td>
                <td>
                  <span>透析器凝血：
                   
                    {{
                     afterdialysis &&
                     afterdialysis
                        ? afterdialysis.cruor
                        : "/"
                     }}

                 
                  </span>
                </td>
                <td>
                  <span>实际置换量：
                   
                    {{
                      afterdialysis.actual_displacement
                        ? afterdialysis.actual_displacement
                        : ""
                     }}L

                 
                  </span>
                </td>
              </tr>
            </table>
          </div>

          <div class="infoTitle">治疗小结</div>
          <div style="height: 80px;margin: 10px 0px;text-align: left;">
            <span>治疗小结：{{summary.dialysis_summary?summary.dialysis_summary:'/'}}</span>
          </div>
          <div style="text-align: left;width: 100%;">
            <table>
              <tr>
                <td width="8%">上机护士：</td>
                <td width="10%">
                  <div>
                    <span>
                      {{
                        getAdminUser(
                          dialysisOrder == null
                            ? 0
                            : dialysisOrder.start_nurse
                        )
                      }}</span>
                  </div>
                </td>
                <td width="8%">核对护士：</td>
                <td width="10%">
                  <span>{{getAdminUser(check==null?0:check.modifier)}}</span>
                  <!-- <img style="height:65px;width: 90%;" :src="setAdminUserES(dialysisOrder==null?0:dialysisOrder.finish_nurse)" alt="" srcset="" v-else> -->
                </td>
                <td width="8%">下机护士：</td>
                <td width="10%">
                  <span>{{getAdminUser(dialysisOrder==null?0:dialysisOrder.finish_nurse)}}</span>
                  <!-- <img style="height:65px;width: 90%;" :src="setAdminUserES(dialysisOrder==null?0:dialysisOrder.finish_nurse)" alt="" srcset="" v-else> -->
                </td>
                <td width="5%">医生：</td>
                <td width="10%">
                  <span>{{getAdminUser(prescription.creater)}}</span>
                  <!-- <img style="height:65px;width: 90%;" :src="setAdminUserES(prescription.creater)" alt="" srcset="" v-else> -->
                </td>
              </tr>
            </table>

          </div>
        </div>
      </div>
    </div>
  </div>
</template>

<script>
import CheckBox from "../batch_print/option_check_box";
import { getDialysisRecord } from "@/api/dialysis";
import { getDataConfig } from "@/utils/data";
import { jsGetAge, uParseTime } from "@/utils/tools";
import LabelBox from "../printItem/LabelBox";
import BreadCrumb from "@/xt_pages/components/bread-crumb";
// import DialysisPrintOrderOne from './template/dialysisPrintOrderOne'
// import DialysisPrintOrderTwo from './template/dialysisPrintOrderTwo'
import print from "print-js";

export default {
  name: "dialysisPrintOrderSix",
  props: ["childResponse"],
  components: {
    // DialysisPrintOrderOne,
    // DialysisPrintOrderTwo,
    CheckBox,
    LabelBox,
    BreadCrumb,
  },
  data() {
    return {
      way_arr: [],
      consciousness_arr: [],
      appetite_arr: [],
      posture_arr: [],
      sick_condition_arr: [],
      precaution_arr: [],
      intake_arr: [],
      nutrition_arr: [],

      crumbs: [
        { path: false, name: "透析管理" },
        { path: false, name: "打印单" },
      ],
      operators: [],
      adminUser: [],
      check: {},
      xtdate: "",
      dialysisOrder: {
        DeviceNumber: [],
      },
      displaceLiquiPartOptions: [],
      operatorMaps: {},
      complications: [
        "低血压",
        "高血压",
        "心律失常",
        "头晕",
        "头痛",
        "呕吐",
        "抽搐",
        "出血",
        "心衰",
        "腹痛",
      ],
      jilurow: 0,
      advice_jilurow: 0,
      loading: false,
      orgname: "",
      patientInfo_gender_1: false,
      patientInfo_gender_2: false,
      patientInfo_source_2: false,
      patientInfo_source_1: false,
      modeOptions: {},
      replacementWays: [],
      perfusionApparatus: [],
      anticoagulantsConfit: {},
      bloodAccessParOpera: {},
      dialysateFormulationOptions: {},
      totollength: 0,
      queryParams: {
        xtdate: "",
        xtno: "",
        patient_id:0,
      },
      patientInfo: {
        birth: "",
        age: "",
        DialysisSchedule: {
          device_number: { number: "" },
          device_zone: { name: "" },
        },
        gender: 0,
      },
      predialysis: {
        score: "",
        internal_fistula: "",
        internal_fistula_skin: "",
        catheter: "",
        blood_access_part_opera_name: "",
      },
      afterdialysis: {
        complications_index: "",
      },
      lastafterdialysis: {},
      prescription: {
        dialysate_formulation_name: "",
        device: {},
      },
      advices: [],
      users: [],
      monitors: [],
      monitors2: [],
      summary: {},
      receiverTreatmentAccess: {},
      org_template_info: {},

      doctor_advices: [],
      doctor_advices_2: [],
      advice_groups: [],
      advice_groups_2: [],
      print_length: 0,
      blood_access_part: [],
      blood_access_part_opera: [],

      AlPanel: {
        id: 0,
        name: "",
        type: 1,
        shouji: 2,
        weichi: 2,
        zongliang: 2,
        gaimingcheng: -1,
        gaijiliang: -1,
        shouji_unit: "mg",
        weichi_unit: "mg/h",
        zongliang_unit: "mg",
        gaimingcheng_unit: "",
        gaijiliang_unit: "",
      },
      org_id: 0,
    };
  },
  methods: {
    // 获取当前年份，用于年龄计算
    getoldAge() {
      let date = new Date();
      let year = date.getFullYear();
      let year_d =
        this.xtdate.split("-")[0] - this.patientInfo.birth.split("-")[0];
      let year_m = this.xtdate.split("-")[1];
      let birth_m = this.patientInfo.birth.split("-")[1];
      let year_date = this.xtdate.split("-")[2];
      let birth_date = this.patientInfo.birth.split("-")[2];
      // console.log(year,'今年年月')
      // console.log(this.xtdate.split('-'),'病人就诊年月')
      console.log(this.patientInfo.birth, "病人生日");
      // console.log(year_d,'year_d')
      if (year_m < birth_m) {
        return year_d - 1;
      } else if (year_m == birth_m) {
        if (year_date < birth_date) {
          return year_d - 1;
        } else {
          return year_d;
        }
      } else {
        return year_d;
      }
    },

    checkData() {
      if (this.receiverTreatmentAccess.way == 0) {
        this.$message.error("入科方式未填");
      } else if (this.predialysis.symptom_before_dialysis == "") {
        this.$message.error("透前症状未填");
      } else if (this.predialysis.temperature == "") {
        this.$message.error("透前体温未填");
      } else if (this.predialysis.pulse_frequency == "") {
        this.$message.error("透前脉搏未填");
      } else if (this.predialysis.breathing_rate == "") {
        this.$message.error("透前呼吸频率未填");
      } else if (
        this.predialysis.systolic_blood_pressure == 0 ||
        this.predialysis.diastolic_blood_pressure == 0
      ) {
        this.$message.error("透前血压未填完整");
      } else if (this.predialysis.puncture_way == "") {
        this.$message.error("穿刺方式未填");
      } else if (this.predialysis.puncture_needle == "") {
        this.$message.error("穿刺针未填");
      } else if (
        this.predialysis.blood_access_part_id == "" &&
        this.predialysis.blood_access_part_opera_name == ""
      ) {
        this.$message.error("血管通路未填");
      } else if (this.predialysis.internal_fistula == "") {
        this.$message.error("透前内瘘未填");
      } else if (this.predialysis.catheter == "") {
        this.$message.error("透前导管未填");
      } else if (this.prescription.mode_id == "") {
        this.$message.error("透析方式未填");
      } else if (
        this.prescription.displace_liqui_part == 0 &&
        this.prescription.mode_id == 2
      ) {
        this.$message.error("置换方式未填");
      } else if (
        this.prescription.displace_liqui_value == 0 &&
        this.prescription.mode_id == 2
      ) {
        this.$message.error("置换量未填");
      } else if (this.prescription.blood_flow_volume == 0) {
        this.$message.error("血流量未填");
      } else if (
        this.prescription.dialysis_duration_hour == 0 &&
        this.prescription.dialysis_duration_minute == 0
      ) {
        this.$message.error("透析时间未填");
      } else if (
        this.prescription.dialyzer_perfusion_apparatus == "" &&
        this.prescription.dialysis_dialyszers == ""
      ) {
        this.$message.error("透析器未填");
      } else if (this.prescription.dialysis_irrigation == "") {
        this.$message.error("灌流器未填");
      } else if (
        this.prescription.plasma_separator == "" &&
        this.org_id == 9538
      ) {
        this.$message.error("血浆分离器未填");
      } else if (
        this.prescription.bilirubin_adsorption_column == "" &&
        this.org_id == 9538
      ) {
        this.$message.error("胆红素吸附柱未填");
      } else if (this.predialysis.weight_before == 0) {
        this.$message.error("透前体重未填");
      } else if (this.predialysis.dry_weight == 0) {
        this.$message.error("干体重未填");
      } else if (this.prescription.target_ultrafiltration == 0) {
        this.$message.error("计划超滤量未填");
      } else if (this.prescription.calcium == 0) {
        this.$message.error("钙未填");
      } else if (this.prescription.sodium == 0) {
        this.$message.error("钠未填");
      } else if (this.prescription.kalium == 0) {
        this.$message.error("钾未填");
      } else if (this.prescription.bicarbonate == 0) {
        this.$message.error("碳酸氢根未填");
      } else if (this.prescription.dialysate_flow == 0) {
        this.$message.error("透析液流量未填");
      } else if (this.prescription.anticoagulant == 0) {
        this.$message.error("抗凝剂未填");
      } else if (
        this.prescription.anticoagulant_gaimingcheng == "" &&
        this.prescription.anticoagulant == 5
      ) {
        this.$message.error("钙名称未填");
      } else if (
        this.prescription.anticoagulant_gaijiliang == "" &&
        this.prescription.anticoagulant == 5
      ) {
        this.$message.error("钙剂量未填");
      } else if (this.afterdialysis.temperature == 0) {
        this.$message.error("透后体温未填");
      } else if (this.afterdialysis.pulse_frequency == 0) {
        this.$message.error("透后脉搏未填");
      } else if (this.afterdialysis.breathing_rate == 0) {
        this.$message.error("透后呼吸频率未填");
      } else if (
        this.afterdialysis.systolic_blood_pressure == 0 ||
        this.afterdialysis.diastolic_blood_pressure == 0
      ) {
        this.$message.error("透后血压未填完整");
      } else if (
        this.afterdialysis.actual_treatment_hour == 0 &&
        this.afterdialysis.actual_treatment_minute == 0
      ) {
        this.$message.error("实际治疗时间未填");
      } else if (this.afterdialysis.cruor == "") {
        this.$message.error("透析器凝血未填");
      } else if (this.afterdialysis.internal_fistula == "") {
        this.$message.error("透后内瘘未填");
      } else if (this.afterdialysis.catheter == "") {
        this.$message.error("透后导管未填");
      } else if (this.afterdialysis.weight_after == 0) {
        this.$message.error("透后体重未填");
      } else if (this.afterdialysis.weight_loss == 0) {
        this.$message.error("透后体重减少未填");
      } else if (this.afterdialysis.dialysis_intakes == 0) {
        this.$message.error("透析中入量未填");
      } else if (this.afterdialysis.actual_ultrafiltration == 0) {
        this.$message.error("实际超滤量未填");
      } else if (this.summary.dialysis_summary == "") {
        this.$message.error("透析小结未填");
      } else if (
        this.dialysisOrder == null ||
        this.dialysisOrder.puncture_nurse == 0
      ) {
        this.$message.error("穿刺护士未填");
      } else if (
        this.dialysisOrder == null ||
        this.dialysisOrder.start_nurse == 0
      ) {
        this.$message.error("治疗护士未填");
      } else if (this.dialysisOrder == null && this.check.creater == 0) {
        this.$message.error("核对人员未填");
      } else if (
        this.dialysisOrder != null &&
        this.dialysisOrder.start_nurse == this.check.modifier &&
        this.check.creater == 0
      ) {
        this.$message.error("核对人员未填");
      } else if (
        this.dialysisOrder != null &&
        this.dialysisOrder.start_nurse == this.check.creater &&
        this.check.modifier == 0
      ) {
        this.$message.error("核对人员未填");
      } else if (
        this.dialysisOrder != null &&
        this.dialysisOrder.start_nurse != this.check.creater &&
        this.dialysisOrder.start_nurse != this.check.modifier &&
        this.check.creater == 0
      ) {
        this.$message.error("核对人员未填");
      } else if (
        this.dialysisOrder == null ||
        this.dialysisOrder.finish_nurse == 0
      ) {
        this.$message.error("下机护士未填");
      } else if (this.prescription.creater == 0) {
        this.$message.error("医生签名未填");
      } else if (this.tableAdvice.length > 0) {
        let num = 0;
        this.tableAdvice.map((item) => {
          if (item.id > 0 && (item.created_time || item.start_time)) {
            this.users.map((it) => {
              if (it.id == item.advice_doctor) {
                if (it.user_type == 3) {
                  num++;
                  this.$message.closeAll();
                  this.$message.error("存在不是医生保存的医嘱");
                } else if (
                  it.id == item.execution_staff &&
                  item.execution_staff > 0
                ) {
                  if (it.user_type == 2) {
                    num++;
                    this.$message.closeAll();
                    this.$message.error("存在不是护士执行的医嘱");
                  }
                } else if (it.id == item.checker && item.checker > 0) {
                  if (it.user_type == 2) {
                    num++;
                    this.$message.closeAll();
                    this.$message.error("存在不是护士核对的医嘱");
                  }
                }
              } else if (
                it.id == item.execution_staff &&
                item.execution_staff > 0
              ) {
                if (it.user_type == 2) {
                  num++;
                  this.$message.closeAll();
                  this.$message.error("存在不是护士执行的医嘱");
                }
              } else if (it.id == item.checker && item.checker > 0) {
                if (it.user_type == 2) {
                  num++;
                  this.$message.closeAll();
                  this.$message.error("存在不是护士核对的医嘱");
                }
              }
            });
          }
        });
        if (num == 0) {
          this.$message.success("核对完成");
        }
      } else {
        this.$message.success("核对完成");
      }
    },
    getDisplaceLiquiPart: function (val) {
      let displace_liqui_part_name = "/";
      const displace_liqui_part = this.displaceLiquiPartOptions;
      for (let i = 0; i < displace_liqui_part.length; i++) {
        if (displace_liqui_part[i].id == val) {
          displace_liqui_part_name = displace_liqui_part[i].name;
        }
      }
      return displace_liqui_part_name;
    },
    replacementWaysById: function (val) {
      let replacementWaysname = "/";
      // let vascular_access = getDataConfig('hemodialysis', 'vascular_access')

      for (let i = 0; i < this.replacementWays.length; i++) {
        if (this.replacementWays[i].id == val) {
          replacementWaysname = this.replacementWays[i].name;
        }
      }
      return replacementWaysname;
    },
    QueryPartById: function (val) {
      let vascular_access_part_name = "/";
      const vascular_access = getDataConfig("hemodialysis", "vascular_access");

      for (let i = 0; i < vascular_access.length; i++) {
        if (vascular_access[i].id == val) {
          vascular_access_part_name = vascular_access[i].name;
        }
      }
      return vascular_access_part_name;
    },
    getAdminUser(id) {
      if (id == 0) {
        return "";
      }
      if (id == undefined) {
        return "";
      }
      for (let i = 0; i < this.adminUser.length; i++) {
        if (this.adminUser[i].id == id) {
          return this.adminUser[i].name;
        }
      }
    },
    getTime(value, temp) {
      if (value == 0) {
        return "";
      }
      if (value != undefined) {
        return uParseTime(value, temp);
      }
      return "";
    },
    getUnit: function (val) {
      switch (val) {
        case 1:
          return "g";
          break;
        case 2:
          return "ml";
          break;
      }
    },
    printThisPage() {
      var ptime = Math.round(new Date().getTime() / 1000);
      this.print_time = uParseTime(ptime, "{y}-{m}-{d} {h}:{i}");

      const style =
        '@media print {.dialysis-print-order{width:960px;margin:0 auto}.dialysis-print-order .order-yy-name{margin:auto;text-align:center;font-size:20px;letter-spacing:5px}.dialysis-print-order .order-title{margin:auto;font-weight:600;text-align:center;font-size:22px;padding:10px}.dialysis-print-order .table-box{width:100%;line-height:23px;font-size:14px}.dialysis-print-order .print-table{width:100%;text-align:center;border-collapse:collapse;line-height:25px;font-size:14px}.dialysis-print-order .print-table-no{width:100%;text-align:left;border-collapse:collapse;font-size:14px} .dialysis-print-order .under_line {display: inline-block;border-bottom: 1px solid #999;text-align:left;white-space: nowrap;width: 50%;} .dialysis-print-order .title-box{text-align:center;font-size:16px;border:1px solid #666}.dialysis-print-order .radio-lebel-box{font-weight:400;cursor:pointer}.dialysis-print-order .radio-no{opacity:0;outline:0;position:absolute;margin:0;width:0;height:0;z-index:-1}.dialysis-print-order .radio-inner{white-space:nowrap;cursor:pointer;outline:0;display:inline-block;line-height:1;position:relative;vertical-align:middle}.dialysis-print-order .radio-fang{display:inline-block;position:relative;border:1px solid #000;box-sizing:border-box;width:14px;height:14px;background-color:#fff;z-index:1;transition:border-color .25s cubic-bezier(.71,-.46,.29,1.46),background-color .25s cubic-bezier(.71,-.46,.29,1.46)}.dialysis-print-order .is-checked-radio::after{content:"√";font-size:15px}}.dialysis-print-order .print-table-no tr td { padding: 8px 5px; line-height: 25px; }.es-img{height: 20px; }.advice-name{text-align: left;}.advice-children{display:flex;} .dialysis-print-order .print-table tr td{padding: 0px 0px;} .print-template-two tr {line-height: 30px;}   .title-box-pro{border: 0 #fff;line-height: 40px;height: 40px;text-align: left;padding-left: 10px !important;}  .text-align-left{text-align: left !important;padding-left:10px !important;font-size: 14px !important;line-height: 25px;}';

      if (this.org_template_info.template_id == 1) {
        printJS({
          printable: "dialysis-print-box",
          type: "html",
          style: style,
          scanStyles: false,
        });
      } else if (
        this.org_template_info.template_id == 2 ||
        this.org_template_info.template_id == 0
      ) {
        printJS({
          printable: "dialysis-print-box-1",
          type: "html",
          style: style,
          scanStyles: false,
        });
      }
    },
    getNumber() {
      if (this.dialysisOrder != null) {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.dialysisOrder.DeviceNumber.number
        );
      } else {
        return (
          this.patientInfo.DialysisSchedule.device_zone.name +
          this.patientInfo.DialysisSchedule.device_number.number
        );
      }
    },

    getXuserName(id) {
      if (id <= 0) {
        return "";
      }
      var name = "";
      if (this.users == null || typeof this.users.length === "undefined") {
        return name;
      }
      var leng = this.users.length;
      if (leng == 0) {
        return name;
      }
      for (let index = 0; index < leng; index++) {
        if (this.users[index].id == id) {
          name = this.users[index].name;
          break;
        }
      }
      return name;
    },
    setAdminUserES(id) {
      if (id == 0) {
        return "";
      }
      if (id in this.operatorMaps) {
        return this.operatorMaps[id].url;
      } else {
        return "";
      }
    },
    modeName(mode_id) {
      return typeof this.modeOptions[mode_id] !== "undefined" &&
        typeof this.modeOptions[mode_id].name !== "undefined"
        ? this.modeOptions[mode_id].name
        : "";
    },
    getDialysisRecord() {
      this.loading = true;

      // getDialysisRecord(this.queryParams).then(response => {
      var response = this.childResponse;
      if (response.data.state == 1) {
        this.adminUser = response.data.data.users;

        this.users = response.data.data.users;
        this.patientInfo = response.data.data.patientInfo;

        this.patientInfo.birth = uParseTime(
          this.patientInfo.birthday,
          "{y}-{m}-{d}"
        );
        // console.log(this.patientInfo.birth,'测试生日')
        // this.patientInfo.age = jsGetAge(this.patientInfo.birth, '-')
        if (response.data.data.patientInfo.first_dialysis_date != 0) {
          this.patientInfo.first_dialysis_date = uParseTime(
            response.data.data.patientInfo.first_dialysis_date,
            "{y}-{m}-{d}"
          );
        } else {
          this.patientInfo.first_dialysis_date = "";
        }
        this.check = response.data.data.check;
        this.xtdate = response.data.data.xtdate;
        this.predialysis = response.data.data.PredialysisEvaluation;
        // console.log('透前评估', this.predialysis)
        this.predialysis.blood_access_part_opera_name =
          this.bloodAccessParOperaName(
            this.predialysis.blood_access_part_opera_id
          );
        this.afterdialysis = response.data.data.AssessmentAfterDislysis;
        // console.log('透后体重', this.afterdialysis)
        this.lastafterdialysis = response.data.data.assessmentAfterDislysis;
        // console.log("上次透后体重", this.lastafterdialysis.weight_after);
        this.operators = response.data.data.operators;
        // console.log("operators", this.operators);
        this.dialysisOrder =
          response.data.data.dialysisOrder === null
            ? null
            : response.data.data.dialysisOrder;
        // console.log("上机233232323232", this.dialysisOrder);
        if (this.operators.length > 0) {
          var operatorsLen = this.operators.length;
          for (var index = 0; index < operatorsLen; index++) {
            this.$set(
              this.operatorMaps,
              this.operators[index].creator,
              this.operators[index]
            );
          }
        }

        this.afterdialysis.txqnx = -1;
        if (this.afterdialysis.cruor.indexOf("0度") > -1) {
          this.afterdialysis.txqnx = 0;
        }
        if (this.afterdialysis.cruor.indexOf("Ⅰ度") > -1) {
          this.afterdialysis.txqnx = 1;
        }
        if (this.afterdialysis.cruor.indexOf("Ⅱ度") > -1) {
          this.afterdialysis.txqnx = 2;
        }
        if (this.afterdialysis.cruor.indexOf("Ⅲ度") > -1) {
          this.afterdialysis.txqnx = 3;
        }

        this.afterdialysis.complications =
          this.afterdialysis.complication.split(",");
        this.afterdialysis.complications_other = [];
        this.afterdialysis.complications_index = [];
        var acllen = this.afterdialysis.complications.length;
        for (let index = 0; index < acllen; index++) {
          if (
            this.complications.indexOf(
              this.afterdialysis.complications[index]
            ) >= 0
          ) {
            this.afterdialysis.complications_index.push(
              this.afterdialysis.complications[index]
            );
          } else if (
            this.complications.indexOf(
              this.afterdialysis.complications[index]
            ) < 0 &&
            this.afterdialysis.complications_other.indexOf(
              this.afterdialysis.complications[index]
            ) < 0
          ) {
            this.afterdialysis.complications_other.push(
              this.afterdialysis.complications[index]
            );
          }
        }
        this.afterdialysis.complications_other =
          this.afterdialysis.complications_other.join(",");

        this.prescription = response.data.data.dialysisPrescription;
        // console.log("透析处方", this.prescription);
        this.receiverTreatmentAccess =
          response.data.data.receiverTreatmentAccess;
        this.prescription.mode = this.modeName(this.prescription.mode_id);
        var rwLen = this.replacementWays.length;
        this.prescription.replacement = "";
        for (let index = 0; index < rwLen; index++) {
          if (
            this.replacementWays[index].id == this.prescription.replacement_way
          ) {
            this.prescription.replacement = this.replacementWays[index].name;
            break;
          }
        }

        this.prescription.dialysate_formulation_name =
          this.dialysateFormulationName(
            this.prescription.dialysate_formulation
          );

        var paLen = this.perfusionApparatus.length;
        this.prescription.perfusion_apparatus_name = "";
        for (let index = 0; index < paLen; index++) {
          if (
            this.perfusionApparatus[index].id ==
            this.prescription.perfusion_apparatus
          ) {
            this.prescription.perfusion_apparatus_name =
              this.perfusionApparatus[index].name;
            break;
          }
        }

        var acLen = this.anticoagulantsConfit.length;
        var thisALID = this.prescription.anticoagulant;
        this.prescription.anticoagulant_name = "";

        if (
          typeof this.anticoagulantsConfit[thisALID] !== "undefined" &&
          this.anticoagulantsConfit[thisALID] != null
        ) {
          this.prescription.anticoagulant_name =
            this.anticoagulantsConfit[thisALID].name;
          this.AlPanel = this.anticoagulantsConfit[thisALID];
        }

        this.advices = response.data.data.advices;
        this.tableAdvice = response.data.data.advices;
        // console.log("医嘱数据2222222222", this.advices);
        this.monitors = response.data.data.monitors;
        this.summary = response.data.data.summary;
        this.org_template_info = response.data.data.org_template_info;

        if (this.monitors.length <= 6) {
          var nl = 6;
          this.print_length = 6;

          for (let index = 0; index < nl; index++) {
            if (
              this.monitors[index] == undefined ||
              this.monitors[index].length <= 0
            ) {
              this.monitors2.push([]);
            } else {
              continue;
            }
          }
        }

        var tempmonitorflag = true;
        for (let index = 0; index < this.monitors.length; index++) {
          const monitor = this.monitors[index];
          this.monitors[index].end = "";
          if (Object.keys(monitor).length > 0 && index > 1) {
            if (
              (this.dialysisOrder &&
              monitor.operate_time == this.dialysisOrder.end_time)&&(this.org_id!=10414)
            ) {
              this.monitors[index].end = "【结束透析】";
              tempmonitorflag = false;
            }
            if ((tempmonitorflag && index == this.monitors.length - 1)&&(this.org_id!=10414)) {
              this.monitors[index].end = "【结束透析】";
            }
          }
        }

        this.jilurow = this.monitors.length + 1;

        this.advice_jilurow = this.advices.length + 1;

        var childMap = {};
        for (const index in this.advices) {
          if (this.advices[index].parent_id == 0) {
            continue;
          }
          if (!(this.advices[index].parent_id in childMap)) {
            childMap[this.advices[index].parent_id] = [];
          }
          childMap[this.advices[index].parent_id].push(this.advices[index]);
        }

        var advices = [];
        for (const index in this.advices) {
          if (this.advices[index].parent_id > 0) {
            continue;
          }
          var item = this.advices[index];
          if (item.id in childMap) {
            item.children = childMap[item.id];
          } else {
            item.children = [];
          }
          advices.push(item);
        }

        var leftAdvice = [];
        var rightAdvice = [];
        var adlen = advices.length;

        var halfLen = adlen % 2 == 0 ? adlen / 2 : (adlen + 1) / 2;
        for (var i = 0; i < halfLen; i++) {
          leftAdvice.push(advices[i]);
          rightAdvice.push(advices[i + halfLen]);
        }
        if (halfLen < 5) {
          var nl = 5 - leftAdvice.length;
          for (let index = 0; index < nl; index++) {
            leftAdvice.push([]);
          }
          var nl = 5 - rightAdvice.length;
          for (let index = 0; index < nl; index++) {
            rightAdvice.push([]);
          }
        }

        this.advices = [];
        for (var i = 0; i < halfLen; i++) {
          var item = [];
          item.push(leftAdvice[i]);
          item.push(rightAdvice[i]);
          this.advices.push(item);
        }
        this.loading = false;
        this.doctor_advices =
          response.data.data.advices == null ? [] : response.data.data.advices;
        for (let index = 0; index < this.doctor_advices.length; index++) {
          this.doctor_advices[index]["isShow"] = 2;
        }


        if (this.doctor_advices.length <= 6) {
          var nl = 6;
          this.print_length = 6;

          for (let index = 0; index < nl; index++) {
            if (
              this.doctor_advices[index] == undefined ||
              this.doctor_advices[index].length <= 0
            ) {
              this.doctor_advices.push([]);
            } else {
              continue;
            }
          }
        }

        this.totollength = this.doctor_advices.length + this.monitors.length;
        console.log("this.totollength",this.totollength)
        if (this.totollength > 18) {
          var temp_advice_length = 17 - this.monitors.length;
          var doctor_advices_1 = [];
          var doctor_advices_2 = [];
          for (let index = 0; index < this.doctor_advices.length; index++) {
            const element = this.doctor_advices[index];
            if (temp_advice_length > index) {
              doctor_advices_1.push(element);
            } else {
              doctor_advices_2.push(element);
            }
          }
          this.doctor_advices = doctor_advices_1;
          this.doctor_advices_2 = doctor_advices_2;
        }

        var docArr = []
        if(this.doctor_advices!=null && this.doctor_advices.length>0){
           for(let i=0;i<this.doctor_advices.length;i++){
             if(this.doctor_advices[i].delivery_way!='口服'){
                docArr.push(this.doctor_advices[i])
             }
           }
        }
        this.doctor_advices = [] 
        this.doctor_advices = docArr
      


       
          
        if(this.doctor_advices!=null && this.doctor_advices.length>0){

            for(let i=0;i<this.doctor_advices.length;i++){
              this.doctor_advices[i].groupPrescriptionId = this.doctor_advices[i].prescription_id + "_"  + this.doctor_advices[i].groupno 
            }
            console.log("医嘱内容我我哦我我哦doctor_advices",this.doctor_advices)

            let dataInfo = {}
            this.doctor_advices.forEach((item, index) => {
        
            let { groupPrescriptionId } = item
            if (!dataInfo[groupPrescriptionId]) {
              dataInfo[groupPrescriptionId] = {
                groupPrescriptionId:item.groupPrescriptionId,
                start_time:item.start_time,
                advice_name:item.advice_name,
                advice_desc:item.advice_desc,
                parent_id:item.parent_id,
                drug_spec_unit:item.drug_spec_unit,
                prescribing_number:item.prescribing_number,
                prescribing_number_unit:item.prescribing_number_unit,
                single_dose:item.single_dose,
                single_dose_unit:item.single_dose_unit,
                delivery_way:item.delivery_way,
                execution_frequency:item.execution_frequency,
                remark:item.remark,
                execution_time:item.execution_time,
                execution_staff:item.execution_staff,
                prescriptionChild:[],
                advice_doctor:item.advice_doctor,
              }
            }
          })
          let newArr = Object.values(dataInfo)
          
          if(newArr!=null && newArr.length >0){
             for(let i=0;i<newArr.length;i++){
               for(let j=0;j<this.doctor_advices.length;j++){
                 if(newArr[i].groupPrescriptionId == this.doctor_advices[j].groupPrescriptionId){
                    newArr[i].prescriptionChild.push(this.doctor_advices[j])
                 }
               }
             }
          }
          console.log("newArr",newArr)
            
          this.doctor_advices = []
          this.doctor_advices = newArr
         
        }
        

      } else {
        this.loading = false;
        this.$message.error("请求数据失败");
        return false;
      }
      // })
    },

    bloodAccessParOperaName(id) {
      if (id in this.bloodAccessParOpera) {
        return this.bloodAccessParOpera[id].name;
      }
      return "";
    },
    dialysateFormulationName(id) {
      if (id in this.dialysateFormulationOptions) {
        return this.dialysateFormulationOptions[id].name;
      }
      return "";
    },
    // getAge: function (val) {
    //   if (
    //     this.org_template_info.template_id == 2 ||
    //     this.org_template_info.template_id == 0
    //   ) {
    //     if (val.age == 0) {
    //       return jsGetAge(val.birth, "-");
    //     } else {
    //       return val.age;
    //     }
    //   } else {
    //     return this.getoldAge();
    //   }
    // },
    getAge: function(val) {

      if (val.id_card_no) {
        var thisLen = val.id_card_no.length

        var birth = ''
        if (thisLen == 15) {
          birth = '19' + val.id_card_no.substr(6, 6)
        } else {
          birth = val.id_card_no.substr(6, 8)
        }
        var birthtwo =
          birth.substr(0, 4) +
          '-' +
          birth.substr(4, 2) +
          '-' +
          birth.substr(6, 2)

        var age = jsGetAge(birthtwo, '-')
        return age
      }
    },
    newAdviceGroupObject: function () {
      return Object.assign(
        {},
        {
          group_no: 0,
          // advice_doctor: 0,
          // start_time: 0,
          advices: [],
          // exec_staff: 0,
          // exec_time: 0,
          // checker: 0,
        }
      );
    },
    getFloat: function (x) {
      if (x == 0) {
        return "/";
      }
      if (x != ".") {
        var f = Math.round(x * 100) / 100;
        var s = f.toString();
        var rs = s.indexOf(".");
        if (rs <= 0) {
          rs = s.length;
          s += ".";
        }
        while (s.length <= rs + 1) {
          s += "0";
        }
        return s;
      } else {
        return "0.0";
      }
    },
  },
  watch: {
    "patientInfo.gender": function () {
      if (this.patientInfo.gender == 1) {
        this.patientInfo_gender_1 = true;
        this.patientInfo_gender_2 = false;
      } else if (this.patientInfo.gender == 2) {
        this.patientInfo_gender_2 = true;
        this.patientInfo_gender_1 = false;
      } else {
        this.patientInfo_gender_2 = false;
        this.patientInfo_gender_1 = false;
      }
    },
    "patientInfo.source": function () {
      if (this.patientInfo.source == 1) {
        this.patientInfo_source_1 = true;
        this.patientInfo_source_2 = false;
      } else if (this.patientInfo.source == 2) {
        this.patientInfo_source_2 = true;
        this.patientInfo_source_1 = false;
      } else {
        this.patientInfo_source_2 = false;
        this.patientInfo_source_1 = false;
      }
    },
  },
  created() {
    this.way_arr = getDataConfig("hemodialysis", "way");
    this.consciousness_arr = getDataConfig("hemodialysis", "consciousness");
    this.appetite_arr = getDataConfig("hemodialysis", "appetite");
    this.posture_arr = getDataConfig("hemodialysis", "posture");
    this.sick_condition_arr = getDataConfig("hemodialysis", "sick_condition");
    this.precaution_arr = getDataConfig("hemodialysis", "precaution");
    this.intake_arr = getDataConfig("hemodialysis", "intake");
    this.nutrition_arr = getDataConfig("hemodialysis", "nutrition");

    var xtuser = this.$store.getters.xt_user;
    this.orgname = xtuser.org.org_name;
    // this.orgname = "遂溪方济医院";
    this.modeOptions = this.$store.getters.treatment_mode;
    this.replacementWays = this.$store.getters.replacement_ways;
    this.perfusionApparatus = this.$store.getters.perfusion_apparatus;
    this.anticoagulantsConfit = this.$store.getters.anticoagulants_confit;
    this.displaceLiquiPartOptions = this.$store.getters.displace_liqui;

    this.blood_access_part = getDataConfig("hemodialysis", "vascular_access");
    this.blood_access_part_opera = getDataConfig(
      "hemodialysis",
      "vascular_access_desc"
    );
    this.org_id = this.$store.getters.xt_user.org.id;

    // this.bloodAccessParOpera = getDataConfig('hemodialysis', 'vascular_access_desc')

    var bloodAccessParOpera = getDataConfig(
      "hemodialysis",
      "vascular_access_desc"
    );
    for (var key in bloodAccessParOpera) {
      this.bloodAccessParOpera[bloodAccessParOpera[key].id] =
        bloodAccessParOpera[key];
    }

    var dialysateFormulationOptions = getDataConfig(
      "hemodialysis",
      "dialysate_formulation"
    );
    for (var key in dialysateFormulationOptions) {
      this.dialysateFormulationOptions[dialysateFormulationOptions[key].id] =
        dialysateFormulationOptions[key];
    }

    const xtdate = this.$route.query && this.$route.query.xtdate;
    // console.log("xtdate", xtdate);
    const xtno = this.$route.query && this.$route.query.xtno;
    // console.log("xtno", xtno);
    if (
      typeof xtdate === "string" &&
      xtdate.length > 0 &&
      typeof xtno === "string" &&
      xtno.length > 0
    ) {
      this.queryParams.xtdate = xtdate;
      this.queryParams.xtno = xtno;
      this.getDialysisRecord();
    } else {
      this.$message.error("参数不齐");
      return false;
    }
  },
};
</script>
<style lang="scss">
.print_page_main_content {
  background-color: white;
  width: 960px;
  margin: 0 auto 50px;
  padding: 0 0 0 0;
  page-break-after: always;
  .order-yy-name {
    margin: auto;
    text-align: center;
    font-size: 20px;
    letter-spacing: 5px;
  }
  .order-title {
    margin: auto;
    font-weight: 600;
    text-align: center;
    font-size: 22px;
    padding: 10px;
  }
  .infoTitle{
    // background: #efe7e7;
    // border-top: 1px solid black;
    padding: 5px 0px;
    font-weight:bolder;
  }
  .table tr td{
    padding: 5px;
  }


}
</style>
