<template>
  <div>

    <div v-if="isShowDialog" class="Dialog">
      <div class="DialogTit">
        <span @click="close()" class="iconfont">&#xe6e9;</span>
        <h1 class="name">透析处方</h1>
        <button @click="showmsgtip">{{patient.name}}  [透析号 {{patient.dialysis_no}} ]</button>
        <span @click="commitInfo" class="success" v-if="isPermission()">完成</span>
        <span @click="commitInfo" class="success" v-if="!isPermission()"></span>

      </div>

      <div class="DialogContent" id="dialogTop">
        <div @click="showSubMenu('mode')" class="item" ref="mode" v-if="isShow('透析模式')">
          <label class="name" for="txms">透析模式</label>
          <div class="content">
            <span class="text" id="txms">{{GetModeByModeId(dialysisPrescription.mode_id)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>
        <div class="item" @click="openPicker" v-if="isShow('透析时长')">
          <label class="name" for="txsc">透析时长</label>
          <div class="content">
            <span class="text" style="width: 100px">{{timeValue}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" v-if="isShow('血流量')">
          <label class="name" for="xll">血流量(ml/min)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="xll" v-model="dialysisPrescription.blood_flow_volume"/>
          </div>
        </div>

        <div class="item" v-if="isShow('目标超滤量')">
          <label class="name" for="mbcll">目标超滤量(L)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="mbcll" v-model="dialysisPrescription.target_ultrafiltration"/>
          </div>
        </div>
        <div @click="showSubMenu('dialysate_formulation')" class="item" ref="dialysate_formulation"
             v-if="isShow('透析液配方')">
          <label class="name" for="txypf">透析液配方</label>
          <div class="content">
            <span class="text"
                  id="txypf">{{GetDialysateFormulationById(dialysisPrescription.dialysate_formulation)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div @click="showSubMenu('anticoagulant')" class="item" ref="anticoagulant" v-if="isShow('抗凝剂')">
          <label class="name" for="knj">抗凝剂</label>
          <div class="content">
            <span class="text" id="knj">{{GetAnticoagulantById(dialysisPrescription.anticoagulant)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" v-if="anticoagulant.shouji != -1&&isShow('首剂')">
          <label class="name" for="sj">首剂({{anticoagulant.shouji_unit}})</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="sj" v-model="dialysisPrescription.anticoagulant_shouji"
                   :disabled="anticoagulant.shouji==1?false:true"/>
          </div>
        </div>
        <div class="item" v-if="anticoagulant.weichi != -1&&isShow('维持')">
          <label class="name" for="wz">维持({{anticoagulant.weichi_unit}})</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="wz" class="inputBox"
                   v-model="dialysisPrescription.anticoagulant_weichi"
                   :disabled="anticoagulant.weichi==1?false:true">
          </div>
        </div>
        <div class="item" v-if="anticoagulant.zongliang != -1 && isShow('总量')">
          <label class="name" for="zl" v-if="dialysisPrescription.anticoagulant == 2">总量(mg)</label>
          <label class="name" for="zl" v-if="dialysisPrescription.anticoagulant == 3">总量(IU)</label>
          <label class="name" for="zl" v-if="dialysisPrescription.anticoagulant == 4">总量(mg)</label>
          <label class="name" for="zl" v-if="dialysisPrescription.anticoagulant == 5">总量(mg)</label>
          <label class="name" for="zl" v-if="dialysisPrescription.anticoagulant == 1">总量(mg)</label>


          <div class="content">
            <input type="tel" @focus="inputFocus" id="zl" class="inputBox"
                   v-model="dialysisPrescription.anticoagulant_zongliang"
                   :disabled="anticoagulant.zongliang==1?false:true">
          </div>
        </div>

        <div class="item" v-if="anticoagulant.gaimingcheng != -1 && isShow('钙名称')">
          <label class="name" for="g">钙名称({{anticoagulant.gaimingcheng_unit}})</label>
          <div class="content">
            <input type="text" id="g" class="inputBox" v-model="dialysisPrescription.anticoagulant_gaimingcheng"
                   :disabled="anticoagulant.gaimingcheng==1?false:true">
          </div>
        </div>

        <div class="item" v-if="anticoagulant.gaijiliang != -1 && isShow('钙剂量')">
          <label class="name" for="gjl">钙剂量</label>
          <div class="content">
            <input type="text" id="gjl" class="inputBox" v-model="dialysisPrescription.anticoagulant_gaimingcheng"
                   :disabled="anticoagulant.gaimingcheng==1?false:true">
          </div>
        </div>
        <!-- <div class="item">
          <label class="name" for="gtz">干体重(kg)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="gtz" v-model="dialysisPrescription.dry_weight"/>
          </div>
        </div> -->

        <div class="line"></div>
        <div class="item" v-if="isShow('置换量')">
          <label class="name" for="zhy">置换量(L)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="zhy" v-model="dialysisPrescription.replacement_total"/>
          </div>
        </div>

        <!-- <div class="line"></div> -->
        <div class="item" v-if="isShow('钾')">
          <label class="name" for="j">钾(mmol/L)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="j" v-model="dialysisPrescription.kalium"/>
          </div>
        </div>
        <div class="item" v-if="isShow('钠')">
          <label class="name" for="n">钠(mmol/L):</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="n" v-model="dialysisPrescription.sodium"/>
          </div>
        </div>
        <div class="item" v-if="isShow('钙')">
          <label class="name" for="gg">钙(mmol/L)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="gg" v-model="dialysisPrescription.calcium"/>
          </div>
        </div>
        <div class="item" v-if="isShow('碳酸氢盐')">
          <label class="name" for="tsqy">碳酸氢盐(mmol/L)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="tsqy" v-model="dialysisPrescription.bicarbonate"/>

          </div>
        </div>
        <div class="item" v-if="isShow('葡萄糖')">
          <label class="name" for="ptt">葡萄糖(mmol/L)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="ptt" v-model="dialysisPrescription.glucose"/>
          </div>
        </div>

        <div class="line"></div>

        <div class="item" v-if="isShow('透析液流量')">
          <label class="name" for="txyll">透析液流量(ml/min)</label>
          <div class="content">
            <input type="tel" @focus="inputFocus" id="txyll" v-model="dialysisPrescription.dialysate_flow"/>
          </div>
        </div>
        <div class="item" v-if="isShow('透析液温度')">
          <label class="name" for="txywd">透析液温度(℃)</label>
          <div class="content">
            <!--<span class="text">HD</span>-->
            <!--<span class="iconfont">&#xe6f9;</span>-->
            <input type="tel" @focus="inputFocus" id="txywd" v-model="dialysisPrescription.dialysate_temperature"/>

          </div>
        </div>
        <div class="item" v-if="isShow('电导度')">
          <label class="name" for="dtl">电导度(mS/m)</label>
          <div class="content">

            <input type="tel" @focus="inputFocus" id="dtl" v-model="dialysisPrescription.conductivity"/>
          </div>
        </div>
        <div class="item" v-if="isShow('透析器/灌流器')">
          <label class="name" for="dtl">透析器/灌流器</label>
          <div class="content">

            <input @focus="inputFocus" id="dt" v-model="dialysisPrescription.dialyzer_perfusion_apparatus"/>
          </div>
        </div>
        <div class="line"></div>

        <div @click="showSubMenu('body_fluid')" class="item" ref="body_fluid" v-if="isShow('体液过多症状')">
          <label class="name" for="knj">体液过多症状</label>
          <div class="content">
            <span class="text" id="knja">{{getBodyFluid(dialysisPrescription.body_fluid)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" v-if="isShow('体液过多其他症状')">
          <label class="name" for="knj">体液过多其他症状</label>
          <div class="content">
            <input @focus="inputFocus" id="dt" v-model="dialysisPrescription.body_fluid_other"/>
          </div>
        </div>

        <div @click="showSubMenu('special_medicine')" class="item" ref="special_medicine" v-if="isShow('透析前使用特殊药物')">
          <label class="name" for="knj">透析前使用特殊药物</label>
          <div class="content">
            <span class="text" id="knjaa">{{getSpecialMedicine(dialysisPrescription.special_medicine)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" v-if="isShow('透析前使用其他特殊药物')">
          <label class="name" for="knj">透析前使用其他特殊药物</label>
          <div class="content">
            <input @focus="inputFocus" id="dt" v-model="dialysisPrescription.special_medicine_other"/>
          </div>
        </div>

        <div @click="showSubMenu('displace_liqui_part')" class="item" ref="displace_liqui_part" v-if="isShow('置换液')">
          <label class="name" for="knj">置换液</label>
          <div class="content">
            <span class="text" id="knjaa">{{getDisplaceLiquiPart(dialysisPrescription.displace_liqui_part)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" v-if="isShow('置换液总量')">
          <label class="name" for="knj">置换液总量(L)</label>
          <div class="content">
            <input @focus="inputFocus" id="dt" v-model="dialysisPrescription.displace_liqui_value"/>
          </div>
        </div>

        <div class="item" v-if="isShow('目标KT/V')">
          <label class="name" for="knj">目标KT/V</label>
          <div class="content">
            <input @focus="inputFocus" id="dt" v-model="dialysisPrescription.target_ktv"/>
          </div>
        </div>

        <div @click="showSubMenu('blood_access')" class="item" ref="blood_access" v-if="isShow('血管通路')">
          <label class="name" for="knj">血管通路</label>
          <div class="content">
            <span class="text" id="knjaa">{{getBloodAccess(dialysisPrescription.blood_access)}}</span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" v-if="isShow('实际超滤量')">
          <label class="name" for="knj">实际超滤量(L)</label>
          <div class="content">
            <input @focus="inputFocus" id="dt" v-model="dialysisPrescription.ultrafiltration"/>
          </div>
        </div>

        <div @click="dialysisGoodsClick()" class="item" ref="consumable_material" v-if="config.is_open == 1">
          <label class="name" for="knj">透析耗材</label>
          <div class="content">
            <span class="text" id="knjaa"></span>
            <span class="iconfont">&#xe6f9;</span>
          </div>
        </div>

        <div class="item" style="display: none">
          <label class="name" for="dtl">医生签名</label>
          <div class="content">
            <div v-if="isShowDesc">医生尚未签名</div>
            <img v-if="isShowDoctorSign" style="width: 100px;height: 30px" :src="signUrl"
                 alt="" srcset="">
          </div>
        </div>

        <div class="line"></div>
        <div>
          <div class="item">
            <label class="name" for="bz">备注</label>
            <div class="content">
              <span class="text"></span>
            </div>
          </div>
          <textarea class="textarea" id="bz" placeholder="请输入内容" v-model="dialysisPrescription.remark"
                    @focus="lastInputFocus" @blur="lastInputBlur"></textarea>
        </div>

        <!--<div class="footer">-->
        <!--处方医生：刘小军 医生-->
        <!--</div>-->
        <div class="PrescSubmit">
          <button style="display: none" class="tj" @click="sign()">医生签名</button>
          <button class="tjcq" @click="commitSolutionInfo" v-if="isPermission()">保存并设为长期处方</button>
          <button class="tj" @click="commitInfo" v-if="isPermission()">保存</button>
        </div>
      </div>
    </div>
    <!--<two-menu title="二级菜单" v-show="isShowModeSubMenu"></two-menu>-->
    <check-box-sub-menu :visibility="visibility" v-on:menu-cancle="menuCancle" v-on:menu-comfirm="menuComfirm"
                        v-on:menu-empty="menuEmpty"
                        :propsForm="propForm"></check-box-sub-menu>
    <!--<multiple-sub-menu :goodTypes="types" :visibility="is_show" v-on:menu-cancle="menuCancle" v-on:menu-comfirm="menuComfirm" :propsForm="propForm"></multiple-sub-menu>-->
    <multiple-sub-menu :goodTypes="types" :info="info" :visibility="is_show" v-on:menu-cancel-two="menuCancleTwo"
                       v-on:menu-comfirm-two="menuComfirmTwo" :propsForm="propForm"
                       :dialysisPrescription="dialysisPrescription"></multiple-sub-menu>

    <mt-datetime-picker
      ref="picker"
      type="time"
      hourFormat="{value}小时"
      minuteFormat="{value}分钟"
      @confirm="handleTimeConfirm"
      v-model="time">
    </mt-datetime-picker>

    <long-advice-sub-menu :visibility="advice_visibility" v-on:menu-cancle-three="menuCancleThree"
                          v-on:menu-comfirm-three="menuComfirmThree" :propsForm="advicePropForm"></long-advice-sub-menu>

    <msg-tip style="width:500px;" :visibility="msgtip_visibility" :predialysis="predialysis"
                           :last_predialysis="last_predialysis"
                           :record="record"
                           :last_record="last_record"
                           :patient_prop="patient"
                           :prescription_prop="prescription_prop"
                           v-on:menu-msg-tip="menuMsgTip"></msg-tip>

  </div>
</template>

<script>
import CheckBoxSubMenu from './subMenu/checkBoxSubMenu'
import MultipleSubMenu from './subMenu/multipleSubMenu'
import {commitDialysisPrescription, CreateGroupAdvice, postSign, postSolution} from '@/api/dialysis'

import {Toast} from 'vant'
import {getDataConfig} from '@/utils/data'

import {parseTime} from '@/utils'
import LongAdviceSubMenu from './subMenu/LongAdviceSubMenu'
import MsgTip from './subMenu/MsgTip'

  export default {
    name: 'PrescriptionDialog',
    props: {
      admin_users_prop: {
        type: Array,
        default: function () {
          return new Array()
        }
      },
      predialysis:{
        type:Object
      },
      last_predialysis: {
        type:Object
      },
      record:{
        type:Object
      },
      last_record: {
        type:Object
      },
      patient_prop: {
        type: Object
      },
      solution_prop: {
        type: Object
      },
      config: {
        type: Object
      },
      operators: {
        type: Array,
        default: function () {
          return new Array()
        }
      },
      types: {
        type: Array,
        default: function () {
          return new Array()
        }
      },
      info: {
        type: Array,
        default: function () {
          return new Array()
        }
      },
      prescription_prop: {
        type: Object,
      }, is_open: {
        type: Number,
      }, targetAdvices: {
        type: Array,
        default: function () {
          return new Array()
        }
      }, waitUploadAdvices: {
        type: Array,
        default: function () {
          return new Array()
        }
      },
      machines_prop: {
        type: Array,
        default: function () {
          return new Array()
        }
      }
    },
    data () {
      return {
        is_pre:0,
        loading: false,
        signUrl: '',
        isShowDesc: true,
        advice_visibility: false,
        msgtip_visibility: false,
        time: '03:00',
        timeValue: '',
        isShowSign: false,
        anticoagulantsConfit: {},
        dialysateFormulationOptions: [],
        bodyFluidOptions: [],
        specialMedicineOptions: [],
        displaceLiquiPartOptions: [],
        bloodAccessOptions: [],
        advicePropForm: {
          list: [],
          result: [],
          operators: [],

      },
      is_show: false,

        perfusion_apparatus: {},
        replacementWays: [],
        dialyserList: [],
        modeOption: [],
        isShowDoctorBtn: true,
        isShowDoctorSign: false,
        visibility: false,
        isShowDialog: true,
        isShowModeSubMenu: false,
        dialysisPrescription: {
          mode_id: '',
          dialysis_duration: '',
          dialysis_duration_hour: '',
          dialysis_duration_minute: '',
          mode_name: '',
          dialyzer: '',
          perfusion_apparatus: '',
          blood_flow_volume: '',
          dewater_amount: '',
          displace_liqui: '',
          replacement_total: '',
          replacement_way: '',
          anticoagulant: '',
          anticoagulant_shouji: '',
          anticoagulant_weichi: '',
          anticoagulant_zongliang: '',
          anticoagulant_gaimingcheng: '',
          anticoagulant_gaijiliang: '',
          dialyzer_perfusion_apparatus: '',
          kalium: '',
          sodium: '',
          calcium: '',
          bicarbonate: '',
          glucose: '',
          prescription_doctor: '',
          // dry_weight: "",
          dialysate_flow: '',
          dialysate_temperature: '',
          target_ultrafiltration: '',
          dialysate_formulation: '',
          conductivity: '',
          doctor: '',
          remark: '',
          body_fluid: '',
          special_medicine: '',
          special_medicine_other: '',
          displace_liqui_part: '',
          displace_liqui_value: '',
          blood_access: '',
          ultrafiltration: '',
          body_fluid_other: '',
          niprocart: '',
          jms: '',
          fistula_needle_set: '',
          fistula_needle_set_16: '',
          hemoperfusion: '',
          dialyser_sterilised: '',
          filtryzer: '',
          target_ktv: '',
          dialyzers: '',
          injector: '',
          bloodlines: '',
          tubing_hemodialysis: '',
          package: '',
          a_liquid: '',
          creater: '',
          modifier: '',

        },
        anticoagulant: {
          id: 0,
          name: '',
          type: 1,
          shouji: 1,
          weichi: 1,
          zongliang: 1,
          gaimingcheng: -1,
          gaijiliang: -1,
          shouji_unit: 'mg',
          weichi_unit: 'mg/h',
          zongliang_unit: 'mg',
          gaimingcheng_unit: '',
          gaijiliang_unit: ''
        },
        zhiShow: true,
        totalShow: true,
        huShow: true,
        propForm: {
          title: '',
          list: [],
          optionList: [],
          isMultiple: 2,
          result: [], //选中的值
          type: 1, //用来区分不同子菜单，方便对返回值进行赋值
          selectId: 0
        }
      }
    },


  methods: {
    showmsgtip(){
        this.msgtip_visibility = true
        this.isShowDialog = false

    },
    isPermission () {
      if (this.$store.getters.user.user.user_type == 3 && (this.$store.getters.user.template_info.template_id == 2 || this.$store.getters.user.template_info.template_id == 6)) {
        return false
      } else{
        return true
      }
    },
    isShow (name) {
      var filedList = this.$store.getters.user.fileds

        for (let i = 0; i < filedList.length; i++) {
          if (filedList[i].module == 1 && filedList[i].filed_name_cn == name && filedList[i].is_show == 1) {
            return true
          }
        }
        return false
      },
      openPicker: function () {
        this.$refs.picker.open()
      },
      handleTimeConfirm: function (val) {
        val = val.replace('小时')
        val = val.replace('分钟')
        let timeArray = val.split(':')
        if (parseInt(timeArray[0].substring(0, 1)) == 0) {
          this.dialysisPrescription.dialysis_duration_hour = timeArray[0].charAt(timeArray[0].length - 1)
        } else {
          this.dialysisPrescription.dialysis_duration_hour = timeArray[0]
        }

        if (parseInt(timeArray[1].substring(0, 1)) == 0) {
          this.dialysisPrescription.dialysis_duration_minute = timeArray[1].charAt(timeArray[1].length - 1)
        } else {
          this.dialysisPrescription.dialysis_duration_minute = timeArray[1]
        }
        this.timeValue = this.dialysisPrescription.dialysis_duration_hour + '小时' + this.dialysisPrescription.dialysis_duration_minute + '分钟'

        this.dialysisPrescription.dialysis_duration = this.dialysisPrescription.dialysis_duration_hour + '.' + (this.dialysisPrescription.dialysis_duration_minute)

      },
      inputFocus: function (event) {
        var input = event.target
        setTimeout(function () {
          input.scrollIntoView()
        }, 0)

        if (input.setSelectionRange) {
          setTimeout(function () {
            input.setSelectionRange(0, input.value.length)
          }, 0)
        } else if (input.createTextRange) {
          var rng = input.createTextRange()
          rng.move('character', input.value.length)
          rng.select()
        }
      },
      lastInputFocus: function (event) {
        var input = event.target
        setTimeout(function () {
          input.style.marginBottom = '2rem'
          input.parentNode.scrollIntoView()
        }, 0)
      },
      lastInputBlur: function (event) {
        var input = event.target
        setTimeout(function () {
          input.style.marginBottom = ''
        }, 0)
      },
      showSubMenu: function (val) {
        switch (val) {
          case 'mode':
            this.propForm.type = 1
            this.isShowDialog = false
            this.propForm.title = '透析模式'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.modeOption
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.mode_id
            this.propForm.click_ref = 'mode'

            break
          case 'dialyzer':
            this.propForm.type = 2
            this.isShowDialog = false
            this.propForm.title = '透析器'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.machines_prop
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.dialyzer
            this.propForm.click_ref = 'dialyzer'

            break

          case 'perfusion_apparatus':
            this.propForm.type = 3
            this.isShowDialog = false
            this.propForm.title = '灌流器'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.perfusion_apparatus
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.perfusion_apparatus
            this.propForm.click_ref = 'perfusion_apparatus'

            break
          case 'replacement_way':
            this.propForm.type = 4
            this.isShowDialog = false
            this.propForm.title = '置换方式'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.replacementWays
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.replacement_way
            this.propForm.click_ref = 'replacement_way'

            break

          case 'anticoagulant':
            this.propForm.type = 5
            this.isShowDialog = false
            this.propForm.title = '抗疑剂'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.anticoagulantsConfit
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.anticoagulant
            this.propForm.click_ref = 'anticoagulant'
            break
          case 'dialysate_formulation':
            this.propForm.type = 6
            this.isShowDialog = false
            this.propForm.title = '透析液配方'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.dialysateFormulationOptions
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.dialysate_formulation
            this.propForm.click_ref = 'dialysate_formulation'
            break
          case 'body_fluid':
            this.propForm.type = 7
            this.isShowDialog = false
            this.propForm.title = '体液过多症状'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.bodyFluidOptions
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.body_fluid
            this.propForm.click_ref = 'body_fluid'
            break
          case 'special_medicine':
            this.propForm.type = 8
            this.isShowDialog = false
            this.propForm.title = '透析前使用特殊药物'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.specialMedicineOptions
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.special_medicine
            this.propForm.click_ref = 'special_medicine'
            break
          case 'displace_liqui_part':
            this.propForm.type = 9
            this.isShowDialog = false
            this.propForm.title = '置换液'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.displaceLiquiPartOptions
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.displace_liqui_part
            this.propForm.click_ref = 'displace_liqui_part'
            break
          case 'blood_access':
            this.propForm.type = 10
            this.isShowDialog = false
            this.propForm.title = '血管通路'
            this.visibility = true
            this.propForm.list = []
            this.propForm.optionList = this.bloodAccessOptions
            this.propForm.isMultiple = 1
            this.propForm.selectId = this.dialysisPrescription.blood_access
            this.propForm.click_ref = 'blood_access'
            break

        }
      },
      menuCancle: function () {
        this.visibility = false
        this.isShowDialog = true
        this.$nextTick(() => {
          if (this.$refs[this.propForm.click_ref] != undefined && this.$refs[this.propForm.click_ref] != null) {
            this.$refs[this.propForm.click_ref].scrollIntoView()
          }
        })
      },
      menuCancleThree: function () {
        this.advice_visibility = false
        this.isShowDialog = true

      },
    menuMsgTip: function () {
      this.msgtip_visibility = false
      this.isShowDialog = true
    },

    menuComfirmThree: function (targetAdvices) {
        if (targetAdvices.length > 0) {
          let params = {
            advices: targetAdvices,
            advice_date: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
            advice_doctor: targetAdvices[0].advice_doctor,
            advice_type: targetAdvices[0].advice_type,
            parent_id: this.patient_id,
            start_time: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
            remark: '',
          }
          CreateGroupAdvice(this.$route.query.patient_id, 0, params).then(rs => {
            var resp = rs.data
            if (resp.state == 1) {

            } else {

            }
          })

          if (this.is_pre == 1) {
            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            commitDialysisPrescription(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')

                this.$emit('prescription', response.data.data.prescription)
                this.finish()
              }
            })

          } else if (this.is_pre == 2) {
            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            postSolution(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')

                this.$emit('advice')
                this.$emit('longSolution', response.data.data.solution)
                this.$emit('prescription', response.data.data.prescription)
                this.finish()
              }
            })
          }
        }else{

          if (this.is_pre == 1) {
            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            commitDialysisPrescription(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')

                this.$emit('prescription', response.data.data.prescription)
                this.finish()
              }
            })

          } else if (this.is_pre == 2) {
            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            postSolution(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')

                this.$emit('advice')
                this.$emit('longSolution', response.data.data.solution)
                this.$emit('prescription', response.data.data.prescription)
                this.finish()
              }
            })
          }

        }

      },
      menuComfirm: function (val) {
        this.visibility = false
        this.isShowDialog = true
        this.$nextTick(() => {
          if (this.$refs[this.propForm.click_ref] != undefined && this.$refs[this.propForm.click_ref] != null) {
            this.$refs[this.propForm.click_ref].scrollIntoView()
          }
        })
        switch (val.type) {
          case 1:
            this.dialysisPrescription.mode_id = val.selectId

            break
          case 2:
            this.dialysisPrescription.dialyzer = val.selectId
            break

          case 3:
            this.dialysisPrescription.perfusion_apparatus = val.selectId
            break
          case 4:
            this.dialysisPrescription.replacement_way = val.selectId
            break
          case 5:
            this.dialysisPrescription.anticoagulant = val.selectId

            if (typeof this.anticoagulantsConfit[val.selectId] == 'undefined' || this.anticoagulantsConfit[val.selectId] == null) {
              return
            }
            this.anticoagulant = this.anticoagulantsConfit[val.selectId]
            break
          case 6:
            this.dialysisPrescription.dialysate_formulation = val.selectId
            break
          case 7:
            this.dialysisPrescription.body_fluid = val.selectId
            break
          case 8:
            this.dialysisPrescription.special_medicine = val.selectId
            break
          case 9:
            this.dialysisPrescription.displace_liqui_part = val.selectId
            break
          case 10:
            this.dialysisPrescription.blood_access = val.selectId
            break
        }
      },
      GetModeByModeId: function (val) {
        let treatment_mode_name = ''
        let treatment_mode = this.modeOption

        for (let keys in treatment_mode) {
          if (treatment_mode[keys].id == val) {
            treatment_mode_name = treatment_mode[keys].name
          }
        }
      for (let keys in treatment_mode) {
        if (treatment_mode[keys].id == val) {
          treatment_mode_name = treatment_mode[keys].name
          console.log('这是什么', treatment_mode[keys].name)
          if (treatment_mode_name == 'HD') {
            this.zhiShow = false
            this.totalShow = false
            this.huShow = false
          } else {
            this.zhiShow = true
            this.totalShow = true
            this.huShow = true
          }
        }
      }

        return treatment_mode_name
      },

      GetDialysateFormulationById: function (val) {
        let name = ''
        let dfl = this.dialysateFormulationOptions.length
        for (let index = 0; index < dfl; index++) {
          if (this.dialysateFormulationOptions[index].id == val) {
            name = this.dialysateFormulationOptions[index].name
            break
          }
        }
        return name
      },
      GetDialyzerById: function (val) {
        let dialyzer_name = ''
        let machines = this.machines_prop

        for (let i = 0; i < machines.length; i++) {
          if (machines[i].id == val) {
            dialyzer_name = machines[i].name
          }
        }

        return dialyzer_name
      },
      GetPerfusionApparatusById: function (val) {
        let perfusion_apparatus_name = ''
        let perfusion_apparatus = this.perfusion_apparatus
        for (let i = 0; i < perfusion_apparatus.length; i++) {
          if (perfusion_apparatus[i].id == val) {
            perfusion_apparatus_name = perfusion_apparatus[i].name
          }
        }

        return perfusion_apparatus_name
      },
      GetReplacementWayById: function (val) {
        let replacement_ways_name = ''
        let replacement_ways = this.replacementWays
        for (let i = 0; i < replacement_ways.length; i++) {
          if (replacement_ways[i].id == val) {
            replacement_ways_name = replacement_ways[i].name
          }
        }
        return replacement_ways_name
      },
      GetAnticoagulantById: function (val) {
        let anticoagulan_name = ''
        let anticoagulant = this.anticoagulantsConfit
        for (let keys in anticoagulant) {
          if (anticoagulant[keys].id == val) {
            anticoagulan_name = anticoagulant[keys].name
          }
        }
        return anticoagulan_name
      },
      commitInfo: function () {
        this.is_pre = 1
        if (this.prescription_prop.id == '') {

          if (this.is_open == 0) {
            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            commitDialysisPrescription(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')
                this.dialysisPrescription.creater = response.data.data.prescription.creater

                this.$emit('prescription', response.data.data.prescription)
                this.finish()
              }
            })
          } else if (this.is_open == 1) {
            if (this.targetAdvices.length > 0) {
              //弹框推送提醒
              this.advicePropForm.list = this.targetAdvices
              this.advicePropForm.operators = this.admin_users_prop
              this.advice_visibility = true
              this.isShowDialog = false
              for (let i = 0; i < this.advicePropForm.list.length; i++) {
                if (this.advicePropForm.list[i].parent_id == 0 && this.advicePropForm.list[i].isCheck == 1) {
                  this.advicePropForm.result.push(this.advicePropForm.list[i].id)
                }
              }
            } else {
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              commitDialysisPrescription(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')
                  this.dialysisPrescription.creater = response.data.data.prescription.creater

                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()
                }
              })
            }
          } else if (this.is_open == 2) {
            if (this.waitUploadAdvices.length > 0) {
              this.advice_visibility = false
              let params = {
                advices: this.waitUploadAdvices,
                advice_date: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                advice_doctor: this.waitUploadAdvices[0].advice_doctor,
                advice_type: this.waitUploadAdvices[0].advice_type,
                parent_id: this.patient_id,
                start_time: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                remark: '',
              }
              CreateGroupAdvice(this.$route.query.patient_id, 0, params).then(rs => {
                var resp = rs.data
                if (resp.state == 1) {

                } else {

                }
              })
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              commitDialysisPrescription(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')
                  this.dialysisPrescription.creater = response.data.data.prescription.creater

                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()
                }
              })
            } else {
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              commitDialysisPrescription(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')
                  this.dialysisPrescription.creater = response.data.data.prescription.creater

                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()
                }
              })
            }

          }

        } else {
          if (this.dialysisPrescription.creater == 0) {
            if (this.is_open == 0) {
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              commitDialysisPrescription(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')

                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()

                }
              })

            } else if (this.is_open == 1) {
              if (this.targetAdvices.length > 0) {

                //弹框推送提醒
                this.advicePropForm.list = this.targetAdvices
                this.advicePropForm.operators = this.admin_users_prop
                this.advice_visibility = true
                this.isShowDialog = false

                for (let i = 0; i < this.advicePropForm.list.length; i++) {
                  if (this.advicePropForm.list[i].parent_id == 0 && this.advicePropForm.list[i].isCheck == 1) {
                    this.advicePropForm.result.push(this.advicePropForm.list[i].id)
                  }
                }
              } else {
                Toast.loading({forbidClick: true, duration: 0})
                let ParamsQuery = this.dialysisPrescription
                ParamsQuery['patient'] = this.$route.query.patient_id
                ParamsQuery['record_date'] = this.record_date
                commitDialysisPrescription(ParamsQuery).then(response => {
                  if (response.data.state == 0) {
                    Toast.fail(response.data.msg)
                    return false
                  } else {
                    Toast.success('提交成功')

                    this.$emit('prescription', response.data.data.prescription)
                    this.finish()

                  }
                })

              }

            } else if (this.is_open == 2) {
              if (this.waitUploadAdvices.length > 0) {

                this.advice_visibility = false
                let params = {
                  advices: this.waitUploadAdvices,
                  advice_date: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                  advice_doctor: this.waitUploadAdvices[0].advice_doctor,
                  advice_type: this.waitUploadAdvices[0].advice_type,
                  parent_id: this.patient_id,
                  start_time: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                  remark: '',
                }
                CreateGroupAdvice(this.$route.query.patient_id, 0, params).then(rs => {
                  var resp = rs.data
                  if (resp.state == 1) {

                  } else {

                  }
                })
                Toast.loading({forbidClick: true, duration: 0})
                let ParamsQuery = this.dialysisPrescription
                ParamsQuery['patient'] = this.$route.query.patient_id
                ParamsQuery['record_date'] = this.record_date
                commitDialysisPrescription(ParamsQuery).then(response => {
                  if (response.data.state == 0) {
                    Toast.fail(response.data.msg)
                    return false
                  } else {
                    Toast.success('提交成功')
                    this.$emit('prescription', response.data.data.prescription)
                    this.finish()

                  }
                })
              } else {
                Toast.loading({forbidClick: true, duration: 0})
                let ParamsQuery = this.dialysisPrescription
                ParamsQuery['patient'] = this.$route.query.patient_id
                ParamsQuery['record_date'] = this.record_date
                commitDialysisPrescription(ParamsQuery).then(response => {
                  if (response.data.state == 0) {
                    Toast.fail(response.data.msg)
                    return false
                  } else {
                    Toast.success('提交成功')
                    this.$emit('prescription', response.data.data.prescription)
                    this.finish()

                  }
                })

              }
            }
          }else{

            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            commitDialysisPrescription(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')
                this.$emit('prescription', response.data.data.prescription)
                this.finish()

              }
            })




          }


        }
      }, commitSolutionInfo: function () {
        this.is_pre = 2

        if (this.prescription_prop.id == '') {
          if (this.is_open == 0) {
            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            postSolution(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')

                this.$emit('advice')
                this.$emit('longSolution', response.data.data.solution)
                this.$emit('prescription', response.data.data.prescription)
                this.finish()

              }
            })

          } else if (this.is_open == 1) {
            if (this.targetAdvices.length > 0) {
              //弹框推送提醒
              this.advicePropForm.list = this.targetAdvices
              this.advicePropForm.operators = this.admin_users_prop
              this.advice_visibility = true
              this.isShowDialog = false

              for (let i = 0; i < this.advicePropForm.list.length; i++) {
                if (this.advicePropForm.list[i].parent_id == 0 && this.advicePropForm.list[i].isCheck == 1) {
                  this.advicePropForm.result.push(this.advicePropForm.list[i].id)
                }
              }
            } else {

              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              postSolution(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')

                  this.$emit('advice')
                  this.$emit('longSolution', response.data.data.solution)
                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()

                }
              })

            }

          } else if (this.is_open == 2) {
            if (this.waitUploadAdvices.length > 0) {
              this.advice_visibility = false
              let params = {
                advices: this.waitUploadAdvices,
                advice_date: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                advice_doctor: this.waitUploadAdvices[0].advice_doctor,
                advice_type: this.waitUploadAdvices[0].advice_type,
                parent_id: this.patient_id,
                start_time: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                remark: '',
              }
              CreateGroupAdvice(this.$route.query.patient_id, 0, params).then(rs => {
                var resp = rs.data
                if (resp.state == 1) {

                } else {

                }
              })
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              postSolution(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')

                  this.$emit('advice')
                  this.$emit('longSolution', response.data.data.solution)
                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()

                }
              })
            } else {
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              postSolution(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')

                  this.$emit('advice')
                  this.$emit('longSolution', response.data.data.solution)
                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()

                }
              })
            }

          }

        } else {
          if (this.dialysisPrescription.creater == 0) {
            if (this.is_open == 0) {
              Toast.loading({forbidClick: true, duration: 0})
              let ParamsQuery = this.dialysisPrescription
              ParamsQuery['patient'] = this.$route.query.patient_id
              ParamsQuery['record_date'] = this.record_date
              postSolution(ParamsQuery).then(response => {
                if (response.data.state == 0) {
                  Toast.fail(response.data.msg)
                  return false
                } else {
                  Toast.success('提交成功')

                  this.$emit('advice')
                  this.$emit('longSolution', response.data.data.solution)
                  this.$emit('prescription', response.data.data.prescription)
                  this.finish()

                }
              })

            } else if (this.is_open == 1) {
              if (this.targetAdvices.length > 0) {

                //弹框推送提醒
                this.advicePropForm.list = this.targetAdvices
                this.advicePropForm.operators = this.admin_users_prop
                this.advice_visibility = true
                this.isShowDialog = false

                for (let i = 0; i < this.advicePropForm.list.length; i++) {
                  if (this.advicePropForm.list[i].parent_id == 0 && this.advicePropForm.list[i].isCheck == 1) {
                    this.advicePropForm.result.push(this.advicePropForm.list[i].id)
                  }
                }
              } else {

                Toast.loading({forbidClick: true, duration: 0})
                let ParamsQuery = this.dialysisPrescription
                ParamsQuery['patient'] = this.$route.query.patient_id
                ParamsQuery['record_date'] = this.record_date
                postSolution(ParamsQuery).then(response => {
                  if (response.data.state == 0) {
                    Toast.fail(response.data.msg)
                    return false
                  } else {
                    Toast.success('提交成功')

                    this.$emit('advice')
                    this.$emit('longSolution', response.data.data.solution)
                    this.$emit('prescription', response.data.data.prescription)
                    this.finish()

                  }
                })

              }

            } else if (this.is_open == 2) {
              if (this.waitUploadAdvices.length > 0) {
                this.advice_visibility = false
                let params = {
                  advices: this.waitUploadAdvices,
                  advice_date: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                  advice_doctor: this.waitUploadAdvices[0].advice_doctor,
                  advice_type: this.waitUploadAdvices[0].advice_type,
                  parent_id: this.patient_id,
                  start_time: parseTime(this.$route.query.date, '{y}-{m}-{d}'),
                  remark: '',
                }
                CreateGroupAdvice(this.$route.query.patient_id, 0, params).then(rs => {
                  var resp = rs.data
                  if (resp.state == 1) {

                  } else {

                  }
                })
                Toast.loading({forbidClick: true, duration: 0})
                let ParamsQuery = this.dialysisPrescription
                ParamsQuery['patient'] = this.$route.query.patient_id
                ParamsQuery['record_date'] = this.record_date
                postSolution(ParamsQuery).then(response => {
                  if (response.data.state == 0) {
                    Toast.fail(response.data.msg)
                    return false
                  } else {
                    Toast.success('提交成功')

                    this.$emit('advice')
                    this.$emit('longSolution', response.data.data.solution)
                    this.$emit('prescription', response.data.data.prescription)
                    this.finish()

                  }
                })
              } else {
                Toast.loading({forbidClick: true, duration: 0})
                let ParamsQuery = this.dialysisPrescription
                ParamsQuery['patient'] = this.$route.query.patient_id
                ParamsQuery['record_date'] = this.record_date
                postSolution(ParamsQuery).then(response => {
                  if (response.data.state == 0) {
                    Toast.fail(response.data.msg)
                    return false
                  } else {
                    Toast.success('提交成功')
                    this.$emit('advice')
                    this.$emit('longSolution', response.data.data.solution)
                    this.$emit('prescription', response.data.data.prescription)
                    this.finish()
                  }
                })
              }
            }
          }else{

            Toast.loading({forbidClick: true, duration: 0})
            let ParamsQuery = this.dialysisPrescription
            ParamsQuery['patient'] = this.$route.query.patient_id
            ParamsQuery['record_date'] = this.record_date
            postSolution(ParamsQuery).then(response => {
              if (response.data.state == 0) {
                Toast.fail(response.data.msg)
                return false
              } else {
                Toast.success('提交成功')
                this.$emit('longSolution', response.data.data.solution)
                this.$emit('prescription', response.data.data.prescription)
                this.finish()

              }
            })

          }

        }

      }, finish: function () {
        this.$emit('finish')
      }, close: function () {
        this.$emit('close')
      }, open: function () {
        this.isShowDialog = true
        this.visibility = false
        this.$refs.picker.close()
        var dialogTop = document.querySelector('#dialogTop')
        if (dialogTop != null) {
          this.$nextTick(() => {
            dialogTop.scrollTop = 0
          })
        }
      }, sign: function () {
        let params = {
          patient_id: this.$route.query.patient_id,
          date: this.record_date,
        }
        postSign(params).then(response => {
          if (response.data.state == 0) {
            Toast.fail(response.data.msg)
            return false
          } else {
            this.isShowDesc = false
            this.isShowDoctorSign = true
            this.dialysisPrescription.prescription_doctor = response.data.data.doctor_id
            for (let i = 0; i < this.operators.length; i++) {
              if (this.operators[i].creator == response.data.data.doctor_id) {
                console.log(this.operators[i].url)
                this.signUrl = this.operators[i].url
              }
            }
            Toast.success('签名成功')
          }
        })
      }, getBodyFluid: function (val) {
        let body_fluid_name = ''
        let body_fluid = this.bodyFluidOptions
        for (let i = 0; i < body_fluid.length; i++) {
          if (body_fluid[i].id == val) {
            body_fluid_name = body_fluid[i].name
          }
        }
        return body_fluid_name
      }, getSpecialMedicine: function (val) {
        let special_medicine_name = ''
        let special_medicine = this.specialMedicineOptions
        for (let i = 0; i < special_medicine.length; i++) {
          if (special_medicine[i].id == val) {
            special_medicine_name = special_medicine[i].name
          }
        }
        return special_medicine_name

      }, getDisplaceLiquiPart: function (val) {
        let displace_liqui_part_name = ''
        let displace_liqui_part = this.displaceLiquiPartOptions
        for (let i = 0; i < displace_liqui_part.length; i++) {
          if (displace_liqui_part[i].id == val) {
            displace_liqui_part_name = displace_liqui_part[i].name
          }
        }
        return displace_liqui_part_name
      }, getBloodAccess: function (val) {
        let blood_access_name = ''
        let blood_access = this.bloodAccessOptions
        for (let i = 0; i < blood_access.length; i++) {
          if (blood_access[i].id == val) {
            blood_access_name = blood_access[i].name
          }
        }
        return blood_access_name

      }, menuEmpty: function (val) {
        this.visibility = false
        this.isShowDialog = true
        switch (val.type) {
          case 1:
            this.dialysisPrescription.mode_id = ''

            break
          case 2:
            this.dialysisPrescription.dialyzer = ''
            break

          case 3:
            this.dialysisPrescription.perfusion_apparatus = ''
            break
          case 4:
            this.dialysisPrescription.replacement_way = ''
            break
          case 5:
            this.anticoagulant = ''
            break
          case 6:
            this.dialysisPrescription.dialysate_formulation = ''
            break
          case 7:
            this.dialysisPrescription.body_fluid = ''
            break
          case 8:
            this.dialysisPrescription.special_medicine = ''
            break
          case 9:
            this.dialysisPrescription.displace_liqui_part = ''
            break
          case 10:
            this.dialysisPrescription.blood_access = ''
            break
        }

      }, getFloat: function (x) {
        if (x != '.') {
          var f = Math.round(x * 100) / 100
          var s = f.toString()
          var rs = s.indexOf('.')
          if (rs <= 0) {
            rs = s.length
            s += '.'
          }
          while (s.length <= rs + 1) {
            s += '0'
          }
          return s
        } else {
          return '0.0'
        }
      }, dialysisGoodsClick: function () {
        this.isShowDialog = false
        this.is_show = true
      }, menuCancleTwo: function () {
        this.isShowDialog = true
        this.is_show = false

      }, menuComfirmTwo: function (dialysisPrescription) {
        this.isShowDialog = true
        this.is_show = false
        this.dialysisPrescription.niprocart = dialysisPrescription.niprocart
        this.dialysisPrescription.jms = dialysisPrescription.jms
        this.dialysisPrescription.fistula_needle_set = dialysisPrescription.fistula_needle_set
        this.dialysisPrescription.fistula_needle_set_16 = dialysisPrescription.fistula_needle_set_16
        this.dialysisPrescription.hemoperfusion = dialysisPrescription.hemoperfusion
        this.dialysisPrescription.dialyser_sterilised = dialysisPrescription.dialyser_sterilised
        this.dialysisPrescription.filtryzer = dialysisPrescription.filtryzer

        this.dialysisPrescription.dialyzers = dialysisPrescription.dialyzers
        this.dialysisPrescription.injector = dialysisPrescription.injector
        this.dialysisPrescription.bloodlines = dialysisPrescription.bloodlines
        this.dialysisPrescription.tubing_hemodialysis = dialysisPrescription.tubing_hemodialysis
        this.dialysisPrescription.package = dialysisPrescription.package
        this.dialysisPrescription.a_liquid = dialysisPrescription.a_liquid

      }
    },
    created () {
      if (this.$store.getters.user.user.user_type == 2) {
        this.isShowSign = true

      }
      this.modeOption = this.$store.getters.treatment_mode
      delete this.modeOption['0']

      var perfusion_apparatus = getDataConfig('hemodialysis', 'perfusion_apparatus')
      this.perfusion_apparatus = perfusion_apparatus

      this.anticoagulantsConfit = this.$store.getters.anticoagulants_confit
      this.bodyFluidOptions = this.$store.getters.body_fluid
      this.specialMedicineOptions = this.$store.getters.special_medicine
      this.displaceLiquiPartOptions = this.$store.getters.displace_liqui
      this.bloodAccessOptions = this.$store.getters.blood_access

      this.dialysateFormulationOptions = getDataConfig('hemodialysis', 'dialysate_formulation')
      this.replacementWays = getDataConfig('hemodialysis', 'replacement_ways')

      this.patient = this.patient_prop
      if (this.prescription_prop != null && typeof (this.prescription_prop.id) != 'undefined' && this.prescription_prop.id > 0) {
        for (const key in this.prescription_prop) {
          this.dialysisPrescription[key] = this.prescription_prop[key]
        }
      } else if (this.solution_prop != null && typeof this.solution_prop.id != 'undefined' && this.solution_prop.id) {
        for (const key in this.solution_prop) {
          this.dialysisPrescription[key] = this.solution_prop[key]
        }
      }

      if (this.dialysisPrescription.dialysis_duration_hour.length == 0 || this.dialysisPrescription.dialysis_duration_minute.length == 0) {
        this.timeValue = ''
        this.time = '03:00'
      } else {
        this.timeValue = this.dialysisPrescription.dialysis_duration_hour + '小时' + this.dialysisPrescription.dialysis_duration_minute + '分钟'
        this.time = (this.dialysisPrescription.dialysis_duration_hour > 10 ? this.dialysisPrescription.dialysis_duration_hour : '0' + this.dialysisPrescription.dialysis_duration_hour) + ':' + (this.dialysisPrescription.dialysis_duration_minute > 10 ? this.dialysisPrescription.dialysis_duration_minute : '0' + this.dialysisPrescription.dialysis_duration_minute)
      }

      this.dialyserList = this.machines_prop
      // this.doctor = this.$store.getters.user.user.user_type;

      var date = this.$route.query && this.$route.query.date
      date *= 1000
      var newDate = new Date(date)

      var y = newDate.getFullYear()
      var m = newDate.getMonth() + 1
      var d = newDate.getDate()
      if (isNaN(y) || isNaN(m) || isNaN(d)) {
        newDate = new Date()
        y = newDate.getFullYear()
        m = newDate.getMonth() + 1
        d = newDate.getDate()
      }
      this.record_date =
        y + '-' + (m < 10 ? '0' + m : m) + '-' + (d < 10 ? '0' + d : d)
      // this.patient.id = this.patient_prop.id

      if (this.dialysisPrescription.prescription_doctor == '') {
        this.isShowDesc = true
        this.isShowDoctorSign = false
      } else {
        this.isShowDesc = false
        this.isShowDoctorSign = true

        for (let i = 0; i < this.operators.length; i++) {
          if (this.operators[i].creator == this.dialysisPrescription.prescription_doctor) {
            this.signUrl = this.operators[i].url
          }
        }

      }
      this.dialysisPrescription.kalium = this.getFloat(this.dialysisPrescription.kalium)
      this.dialysisPrescription.sodium = this.getFloat(this.dialysisPrescription.sodium)
      this.dialysisPrescription.calcium = this.getFloat(this.dialysisPrescription.calcium)
      this.dialysisPrescription.ultrafiltration = this.getFloat(this.dialysisPrescription.ultrafiltration)
      this.dialysisPrescription.target_ultrafiltration = this.getFloat(this.dialysisPrescription.target_ultrafiltration)

    },

    components: {
      LongAdviceSubMenu,
      MultipleSubMenu,
      MsgTip,
      // MultipleSubMenu,
      CheckBoxSubMenu
    },
    watch: {
      isShowDialog (val) {
        if (val) {
          this.advice_visibility = false
        }
      }
    }
  }
</script>

<style style="stylesheet/scss" lang="scss" scoped>
  .DialogContent {
  // padding-bottom:2rem !important;

  .textarea {
  width: 100%;
  height: 2.4rem;
  line-height: 0.6rem;
  color: $pgh-color;
  font-size: 0.28rem;
  padding-left: 0.36rem;
  border: none;
  border-bottom: 1px #e5e5e5 solid;
  }
  }
</style>

